Contents

Introdução

A mensagem de erro

Troubleshooting

Vazamento de memória

Ltrace

Fornecer saída

Introdução

Este documento descreve como solucionar problemas do erro "OS-SHMWIN-2-ERROR_ENCOUNTERED" em um roteador Cisco IOS® XR.

A mensagem de erro

Exemplos da mensagem de erro são:

"%OS-SHMWIN-2-ERROR_ENCOUNTERED"

LC/0/0/CPU0:Dec 16 09:45:58 : fib_mgr[260]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: System memory state is severe, please check the availability of the system memory

LC/0/0/CPU0:Dec 16 09:45:39 : l2fib[328]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: System memory state is severe, please check the availability of the system memory

RP/0/RSP0/CPU0:Aug 11 21:15:47.174 IST: show_ip_interface[65961]: %OS-SHMWIN-2-ERROR_ENCOUNTERED : SHMWIN: Error encountered: 'shmwin' detected the 'fatal' condition 'mutex operation failed'

O erro indica que o estado da memória do sistema é grave. Especificamente, a memória compartilhada, que armazena os dados dinâmicos entre vários processos, apresenta um problema.

Troubleshooting

Comece identificando a placa de linha (ou RP/RSP) e os principais consumidores de memória.

A mensagem de erro pode ter um processo ou até mesmo um comando incorporado. No entanto, se a condição de memória for baixa, qualquer coisa poderá falhar se não houver memória suficiente disponível. Você precisa identificar o que faz com que a memória disponível fique baixa.

A placa de linha é indicada na própria mensagem de erro. Tente encontrar os principais consumidores da memória.

show memory location 0/x/CPUx

show memory summary location 0/x/CPUx

show watchdog memory-state location 0/x/CPUx

show processes memory location 0/x/CPUx

Observação: talvez haja outras mensagens de erro indicando possivelmente quais são os processos culpados.

Por exemplo:

RP/0/RSP0/CPU0:Apr 24 11:34:33.599 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_ALARM : Memory threshold crossed: Normal with 892.125MB free

RP/0/RSP0/CPU0:Apr 24 13:23:12.947 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_ALARM : Memory threshold crossed: Minor with 819.199MB free

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-MEMORY_STATE_CHANGE : New memory state: Severe

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USERS_WARNING : Top 5 consumers of system memory (671084 Kbytes free):

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 0: Process Name: eth_server[61], pid: 57385, Heap usage 54632 Kbytes, Virtual Shared memory usage: 73116 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.086 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 1: Process Name: bgp[1051], pid: 553285, Heap usage 28556 Kbytes, Virtual Shared memory usage: 90512 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 2: Process Name: instdir[252], pid: 184387, Heap usage 24808 Kbytes, Virtual Shared memory usage: 24800 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 3: Process Name: parser_server[352], pid: 204908, Heap usage 21896 Kbytes, Virtual Shared memory usage: 4184784 Kbytes.

RP/0/RSP0/CPU0:Apr 24 14:32:10.087 EST: wdsysmon[450]: %HA-HA_WD-4-TOP_MEMORY_USER_WARNING : 4: Process Name: ipv6_rib[1144], pid: 549174, Heap usage 21600 Kbytes, Virtual Shared memory usage: 24688 Kbytes.

Se o processo for BGP ou qualquer outro protocolo de roteamento, verifique se você não fez nenhuma alteração na rede que contribuiu para isso.

Use esses comandos para obter uma visão geral da memória usada e identificar os principais processos que a utilizam.

0/x/CPUx é a placa de linha específica no erro.

show memory summary location 0/x/CPUx

show memory summary location 0/x/CPUx

show shared-memory location 0/x/CPUx

show memory-top-consumers location 0/x/CPUx

show shmwin summary location 0/x/CPUx

Examples:

RP/0/RSP1/CPU0:R1#show memory summary location 0/RSP0/CPU0

node:      node0_RSP0_CPU0

Physical Memory: 6144M total--------------------------------------

Application Memory : 5738M (2795M available)

Image: 117M (bootram: 117M)

Reserved: 224M, IOMem: 0, flashfsys: 0

Total shared window: 76M

RP/0/RSP1/CPU0:R1#show memory summary location 0/RSP0/CPU0

node:      node0_RSP0_CPU0

Physical Memory: 6144M total--------------------------------------

Application Memory : 5738M (2797M available)

Image: 117M (bootram: 117M)

Reserved: 224M, IOMem: 0, flashfsys: 0

Total shared window: 76M

RP/0/RSP1/CPU0:R1#show shared-memory location 0/0/cpu0

Total Shared memory: 1527M

ShmWin: 236M

Image: 703M

LTrace: 353M

AIPC: 33M

SLD: 3M

SubDB: 1M

CERRNO: 144K

GSP-CBP: 64M

EEM: 0

XOS: 4M

CHKPT: 2M

CDM: 4M

XIPC: 594K

DLL: 64K

SysLog: 0

Miscellaneous: 119M

LTrace usage details:

Used: 353M, Max: 2075M

Current: default(dynamic)

Configured: dynamic with scale-factor: 8 (changes take effect after reload)

RP/0/RP0/CPU0:R1#show memory-top-consumers location 0/RP0/CPU0

Execute 'show memory-snapshots process <> location <>' to check memory usage trend.

###################################################################

Top memory consumers on 0/RP0/CPU0 (at 2023/Nov/8/15:41:42)

###################################################################

PID             Process   Total(MB)    Heap(MB)      Shared(MB)

7366      mibd_interface       233.2      192.64            37.7

2552                 spp       228.2        9.71           222.1

49132                 bgp       225.9       83.62           165.9

4844               l2rib       211.8       21.12           190.1

2787                 gsp       137.9       24.64           113.1

3869            mpls_lsd       122.8       12.85           107.8

3804             fib_mgr       121.0       13.43           108.7

2975       parser_server       116.7       66.39            44.6

6685           l2vpn_mgr       116.5       43.77            82.3

3310     dpa_port_mapper       114.8        2.96           110.2

RP/0/RSP1/CPU0:R1#show shmwin summary location 0/0/cpu0

----------------------------------------

Shared memory window summary information

----------------------------------------

Data for Window "subdb_sco_tbl":

-----------------------------

Virtual Memory size  : 1536 MBytes

Virtual Memory Range : 0x7c000000 - 0xdc000000

Virtual Memory Group 2 size  : 352 MBytes

Virtual Memory Group 2 Range : 0x66000000 - 0x7c000000

Window Name      ID  GRP #Usrs #Wrtrs Ownr Usage(KB) Peak(KB) Peak Timestamp

---------------- --- --- ----- ------ ---- --------- -------- -------------------

subdb_sco_tbl    70  1   1     1      158  3         0        --/--/---- --:--:--

Data for Window "ptp":

-----------------------------

ptp              131 P   1     1      0    35        35       10/18/2023 11:56:31

Data for Window "cfmd-sla":

-----------------------------

cfmd-sla         53  1   1     1      0    99        99       10/18/2023 11:56:20

Data for Window "cfmd":

-----------------------------

cfmd             36  1   1     1      0    99        99       10/18/2023 11:56:30

Data for Window "vkg_pbr_ea":

-----------------------------

vkg_pbr_ea       83  1   1     1      0    147       147      10/18/2023 11:56:27

Data for Window "span_ea_pd":

-----------------------------

span_ea_pd       40  1   1     1      362  34        34       10/18/2023 11:56:13

Data for Window "vkg_l2fib_vqi":

-----------------------------

vkg_l2fib_vqi    97  1   2     2      0    3         0        --/--/---- --:--:--

Data for Window "statsd_db":

-----------------------------

statsd_db        60  1   1     1      0    3         0        --/--/---- --:--:--

Data for Window "statsd_db_l":

-----------------------------

statsd_db_l      130 P   1     1      0    1131      1131     10/18/2023 11:56:17

Data for Window "arp":

-----------------------------

arp              20  1   1     1      0    227       227      10/18/2023 11:56:37

Data for Window "bm_lacp_tx":

-----------------------------

bm_lacp_tx       54  1   1     1      132  1         0        --/--/---- --:--:--

Data for Window "ether_ea_shm":

-----------------------------

ether_ea_shm     26  1   4     4      406  227       227      10/18/2023 11:56:27

Data for Window "vkg_l2fib_evpn":

-----------------------------

vkg_l2fib_evpn   100 1   3     3      0    3         0        --/--/---- --:--:--

Data for Window "l2fib":

-----------------------------

l2fib            14  1   10    10     262  45265     45265    11/08/2023 15:03:18

Data for Window "ether_ea_tcam":

-----------------------------

ether_ea_tcam    58  1   5     5      313  595       595      10/18/2023 11:55:55

Data for Window "vkg_vpls_mac":

-----------------------------

vkg_vpls_mac     35  1   3     3      0    6291      6291     10/25/2023 13:15:04

Data for Window "prm_stats_svr":

-----------------------------

prm_stats_svr    24  1   21    21     0    12419     12419    10/18/2023 11:56:24

Data for Window "prm_srh_main":

-----------------------------

prm_srh_main     66  1   31    31     0    60163     60163    10/18/2023 11:56:31

Data for Window "prm_tcam_mm_svr":

-----------------------------

prm_tcam_mm_svr  23  1   1     1      0    22067     22163    10/18/2023 12:04:59

Data for Window "prm_ss_lm_svr":

-----------------------------

prm_ss_lm_svr    65  1   1     1      0    3233      3233     10/18/2023 11:56:33

Data for Window "prm_ss_mm_svr":

-----------------------------

prm_ss_mm_svr    22  1   5     5      0    3867      3867     10/18/2023 11:55:52

Data for Window "vkg_gre_tcam":

-----------------------------

vkg_gre_tcam     63  1   2     2      388  35        35       10/18/2023 11:55:54

Data for Window "tunl_gre":

-----------------------------

tunl_gre         62  1   2     2      388  39        39       10/18/2023 11:55:38

Data for Window "pd_fib_cdll":

-----------------------------

pd_fib_cdll      28  1   1     1      0    35        35       10/18/2023 11:55:36

Data for Window "SMW_TEST_2":

-----------------------------

SMW_TEST_2       86  1   1     1      0    1067      1067     10/18/2023 11:55:35

Data for Window "ifc-mpls":

-----------------------------

ifc-mpls         13  1   18    18     188  7161      9057     11/02/2023 18:32:41

Data for Window "ifc-ipv6":

-----------------------------

ifc-ipv6         17  1   18    18     188  25249     25665    11/02/2023 18:33:13

Data for Window "ifc-ipv4":

-----------------------------

ifc-ipv4         16  1   18    18     188  24205     24893    10/31/2023 18:12:27

Data for Window "ifc-protomax":

-----------------------------

ifc-protomax     18  1   18    18     188  6057      6297     10/18/2023 11:56:06

Data for Window "bfd_offload_shm":

-----------------------------

bfd_offload_shm  94  1   1     1      0    2         0        --/--/---- --:--:--

Data for Window "netio_fwd":

-----------------------------

netio_fwd        34  1   1     1      0    0         0        --/--/---- --:--:--

Data for Window "mfwd_info":

-----------------------------

mfwd_info        1   1   2     2      254  1373      1373     10/18/2023 11:56:24

Data for Window "mfwdv6":

-----------------------------

mfwdv6           15  1   1     1      258  737       737      10/18/2023 11:55:57

Data for Window "vkg_bmp_adj":

-----------------------------

vkg_bmp_adj      30  1   2     2      129  235       235      10/18/2023 11:55:55

Data for Window "rewrite-db":

-----------------------------

rewrite-db       101 1   3     3      0    4115      4115     10/18/2023 11:55:32

Data for Window "inline_svc":

-----------------------------

inline_svc       88  1   1     1      0    755       755      10/18/2023 11:55:33

Data for Window "im_rd":

-----------------------------

im_rd            33  1   75    75     217  1131      1131     10/18/2023 11:55:32

Data for Window "ipv6_pmtu":

-----------------------------

ipv6_pmtu        98  1   1     1      256  3         0        --/--/---- --:--:--

Data for Window "im_db_private":

-----------------------------

im_db_private    129 P   1     1      0    1131      1131     10/18/2023 11:55:34

Data for Window "infra_ital":

-----------------------------

infra_ital       19  1   3     3      340  387       387      10/18/2023 11:55:41

Data for Window "infra_statsd":

-----------------------------

infra_statsd     8   1   5     5      370  3         0        --/--/---- --:--:--

Data for Window "ipv6_nd_pkt":

-----------------------------

ipv6_nd_pkt      128 P   1     1      0    107       107      10/18/2023 11:55:30

Data for Window "aib":

-----------------------------

aib              2   1   10    10     114  2675      2675     10/18/2023 11:56:42

Data for Window "vkg_pm":

-----------------------------

vkg_pm           5   1   34    1      313  307       307      11/03/2023 11:25:06

Data for Window "subdb_fai_tbl":

-----------------------------

subdb_fai_tbl    75  2   11    1      0    51        51       10/18/2023 11:55:26

Data for Window "subdb_ifh_tbl":

-----------------------------

subdb_ifh_tbl    74  2   2     1      0    35        35       10/18/2023 11:55:26

Data for Window "subdb_ao_tbl":

-----------------------------

subdb_ao_tbl     72  2   1     1      0    43        43       10/18/2023 11:55:26

Data for Window "subdb_do_tbl":

-----------------------------

subdb_do_tbl     73  2   11    1      0    35        35       10/18/2023 11:55:26

Data for Window "subdb_co_tbl":

-----------------------------

subdb_co_tbl    71  2   11    1      0    4107      4107     10/18/2023 11:55:26

Data for Window "rspp_ma":

-----------------------------

rspp_ma          3   1   14    14     0    3         0        --/--/---- --:--:--

Data for Window "cluster_dlm":

-----------------------------

cluster_dlm      61  1   26    26     0    3         0        --/--/---- --:--:--

Data for Window "pfm_node":

-----------------------------

pfm_node         29  1   1     1      0    195       195      10/18/2023 11:56:11

Data for Window "im_rules":

-----------------------------

im_rules         31  1   85    85     217  453       453      10/18/2023 11:55:32

Data for Window "im_db":

-----------------------------

im_db            32  1   85    1      0    2065      2065     10/18/2023 11:56:26

Data for Window "spp":

-----------------------------

spp              27  1   51    51     88   1403      1403     10/18/2023 11:56:29

Data for Window "qad":

-----------------------------

qad              6   1   1     1      0    134       134      01/01/1970 02:00:08

Data for Window "pcie-server":

-----------------------------

pcie-server      39  1   1     1      0    39        39       01/01/1970 02:00:07

---------------------------------------------

Total SHMWIN memory usage : 235 MBytes

Vazamento de memória

Identifique se não há vazamento de memória para nenhum processo:

Você pode fazer uma 'comparação de memória'. Esse processo mostra o aumento ou a diminuição de memória por processo em um período de tempo especificado. Este é um exemplo; observe a coluna 'diferença'.

RP/0/RSP0/CPU0:R1#show memory compare start

Successfully stored memory snapshot /harddisk:/malloc_dump/memcmp_start.out

RP/0/RSP0/CPU0:R1#show memory compare end

Successfully stored memory snapshot /harddisk:/malloc_dump/memcmp_end.out

RP/0/RSP0/CPU0:R1#show memory compare report

JID   name                 mem before   mem after    difference mallocs restart/exit/new

---   ----                 ----------   ---------    ---------- ------- ----------------

376   parser_server        32069512     32070976     1464       1

463   sysdb_svr_local      10064204     10065084     880        20

459   sysdb_shared_nc      4103104      4103560      456        12

66013 exec                 209964       210052       88         3

1241  xtc_agent            4796436      4796432      -4         0

1087  bgp                  51646552     51646120     -432       -3

457   sysdb_mc             5094852      5094188      -664       -8

358   netio                19185724     19183804     -1920      -45

334   lpts_pa              76234948     76228484     -6464      -97

1031  ospf                 9107084      9098232      -8852      -1

476   tcp                  5725148      5708444      -16704     -8

254   gsp                  9473460      9424452      -49008     14

1153  mdtd                 25206084     24750076     -456008    -25

You are now free to remove snapshot memcmp_start.out and memcmp_end.out under /harddisk:/malloc_dump

Ltrace

Se ltrace for o processo que consome muita memória e é um dos principais consumidores de memória, considere a redução da quantidade de memória que ele usa.

É assim que você pode configurar o ltrace para consumir menos memória: Configure fatores de escala do ltrace em processadores de rota ASR9K e placas de linha para um gerenciamento de memória eficiente

Fornecer saída

Se você não encontrou a solução para o problema neste documento, forneça esta saída:

0/x/CPUx é a placa de linha específica no erro. O ID de trabalho (JID) do processo pode ser encontrado com o comando show processes.

show tech-support

show hw-module fpd

show memory location 0/x/CPUx

show memory summary location all

show watchdog memory-state location all

show watchdog trace location all

show processes memory location all

show shmwin all header location 0/x/CPUx

show shmwin all bands location 0/x/CPUx

show shmwin all banks location 0/x/CPUx

show shmwin all list all location 0/x/CPUx

show shmwin all malloc-stats location 0/x/CPUx

show shmwin all mutexlocation 0/x/CPUx

show shmwin all participants all-stats location 0/x/CPUx

show shmwin all pool all-pools location

show shmwin trace all location all

show memory <job id process> location 0/x/CPUx