Contents

Introduction

Uso

ASR9K - Clássico

ASR9K - eXR

Plataformas NCSxxxx e Whitebox

CRS

Cisco 8xxx

Introduction

Este documento descreve o conjunto genérico de comandos a serem coletados dos roteadores Cisco IOS®-XR no momento ou após um problema para casos de TAC.

Uso

A lista de comandos pode ser colada na CLI do roteador exatamente como listada sem nenhuma alteração. Determinados comandos podem errar se os recursos correspondentes não forem implementados. Este é um resultado esperado e não causa problemas.

Essa lista inteira pode ser copiada/colada no roteador. Simplesmente habilite o registro em seu cliente ssh/telnet para capturar.

ASR9K - Clássico

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

show virtual-service list

ASR9K - eXR

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Plataformas NCSxxxx e Whitebox

Isso é para todas as plataformas NCS, por exemplo, mas não limitado a NCS6K, NCS5K, NCS55xx, NCS540 e NCS560.

term length 0

show platform

admin show platform

show inventory

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

admin show environment

show led

admin show led

show alarms brief system active

show asic-errors all detail location 0/RP0/CPU0

show asic-errors all detail location 0/0/CPU0

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

CRS

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Cisco 8xxx

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show reboot history

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session