Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Configurar a Captura de Pacotes de CPU FED

Exemplo de configuração básica

Modificar a captura de pacotes

Captura de pacote linear

Captura de pacote circular

Filtragem de exibição e captura

Filtragem de exibição

Filtragem de captura

Classificar por Top Talker (17.6.X)

Informações Relacionadas

Introduction

Este documento descreve como usar a ferramenta de captura de CPU FED (Forwarding Engine Driver).

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento é restrito às plataformas de switching Catalyst que executam o Cisco IOS 16.X e superior.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

A ferramenta de captura de pacotes da CPU do FED ajuda a identificar os dados que atravessam o plano de controle e fornece informações sobre o tráfego apontado (pacotes do ASIC para a CPU) ou injetado (pacotes da CPU para o ASIC).

- Por exemplo, essa ferramenta é útil para identificar o tráfego que acionou o CoPP (policer de plano de controle) para entrar em ação, fazendo com que o tráfego válido seja descartado em um esforço para proteger a CPU.

Terminology

- Forwarding Engine Driver (FED): responsável por receber comandos do Cisco IOS-XE e programar ASICs de hardware. Serve como uma ponte entre os componentes de software e hardware de um switch Catalyst.

- Plano de Controle (CP):Conjunto de funções e tráfego que envolve a CPU do Switch Catalyst. Isso pode incluir tráfego como o Spanning Tree Protocol (STP),Hot Standby Router Protocol (HSRP) e protocolos de roteamento que são destinados ao switch ou enviados do switch.

- Plano de dados (DP): abrange o(s) ASIC(s) e o tráfego que não é comutado por software, mas encaminhado por hardware.

- Punt: Ação de um pacote enviado para a CPU a partir do plano de dados.

- Inject:Ação de um pacote enviado da CPU para a CPU.

Configurar a Captura de Pacotes de CPU FED

Use esta tabela para opções de configuração

Definição

Configuração

Configuração padrão de captura de pacote para punt ou inserção

debug platform software fed switch ative <punt | inject> captura de pacote <start | parar>

Exibir os pacotes capturados

show platform software fed switch ative <punt | inject> captura de pacotes <brief | detalhe>

Definir o tamanho do buffer e o tipo de captura

debug platform software fed switch ative <punt | inject> limite de buffer de captura de pacote [circular] <#packets>

Definir filtragem de captura para pacotes exibidos

show platform software fed switch ative <punt | inject> filtro de exibição de captura de pacote <filter>

- Os filtros podem ser combinados com o && lógico, || e parênteses. Por exemplo: "cdp || (ipv.src== 10.1.1.11 e tcp.port == 179) || stp"

- Além da filtragem padrão baseada em cabeçalho de rede, alguns filtros específicos da plataforma foram adicionados. Eles também podem ser misturados com os padrões. Por exemplo, pacotes ARP recebidos da interface física com id 0x44.

- Este não é o Wireshark, portanto, ele não suporta todos os filtros Wireshark. Um comando display-filter-help está disponível para verificar os filtros suportados.

Exibir status da captura

show platform software fed switch ative <punt | injetar> status de captura de pacote

Exemplo de configuração básica

Esta ferramenta cria um buffer para a captura de até 4096 (configuração padrão) pacotes puntados ou injetados desde que foi habilitada.

Cat9k#debug platform software fed switch active punt packet-capture start

Punt packet capturing started.

Cat9k#debug platform software fed switch active punt packet-capture stop

Punt packet capturing stopped. Captured 263 packet(s)

Cat9k#show platform software fed switch active punt packet-capture brief

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 263 packets. Capture capacity : 4096 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 18:15:53.499 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 2, Timestamp: 2020/04/10 18:15:53.574 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

Cat9k#show platform software fed switch active punt packet-capture detailed

F340.04.11-9300-1#$e fed switch active punt packet-capture detailed

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 263 packets. Capture capacity : 4096 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 18:15:53.499 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

Packet Data Hex-Dump (length: 68 bytes) :

084FA940FA56380E  4D774F668100C014  080045C00028CC8E  0000FF11DA5A0A0B

00030A0B0003C000  0EC90014B6BE0000  0000000000010009  6618000000000000

D54ADEEB

Doppler Frame Descriptor :

fdFormat                  = 0x4            systemTtl                 = 0xc

loadBalHash1              = 0x10           loadBalHash2              = 0x2

spanSessionMap            = 0              forwardingMode            = 0

destModIndex              = 0x1            skipIdIndex               = 0x38

srcGpn                    = 0x1            qosLabel                  = 0

srcCos                    = 0x4            ingressTranslatedVlan     = 0x5

bpdu                      = 0              spanHistory               = 0

sgt                       = 0              fpeFirstHeaderType        = 0

srcVlan                   = 0x14           rcpServiceId              = 0x3

wccpSkip                  = 0              srcPortLeIndex            = 0

cryptoProtocol            = 0              debugTagId                = 0

vrfId                     = 0              saIndex                   = 0

pendingAfdLabel           = 0              destClient                = 0xb

appId                     = 0              finalStationIndex         = 0

decryptSuccess            = 0              encryptSuccess            = 0

rcpMiscResults            = 0              stackedFdPresent          = 0

spanDirection             = 0              egressRedirect            = 0x1

redirectIndex             = 0              exceptionLabel            = 0x20

destGpn                   = 0x1            inlineFd                  = 0x1

suppressRefPtrUpdate      = 0              suppressRewriteSideEfects = 0

cmi2                      = 0x320          currentRi                 = 0x1

currentDi                 = 0              dropIpUnreachable         = 0

srcZoneId                 = 0              srcAsicId                 = 0

originalDi                = 0x5338         originalRi                = 0

srcL3IfIndex              = 0x2f           dstL3IfIndex              = 0x2f

dstVlan                   = 0              frameLength               = 0x44

fdCrc                     = 0x4c           tunnelSpokeId             = 0

isPtp                     = 0              ieee1588TimeStampValid    = 0

ieee1588TimeStamp55_48    = 0              lvxSourceRlocIpAddress    = 0

sgtCachingNeeded          = 0

Doppler Frame Descriptor Hex-Dump :

0000010044004C02  8004424C00000100  0000000040000100  0000230514000000

0000000000000030  0020000000000B00  380000532F000100  0000002F00000000

Para validar o status atual da captura, você pode usar o próximo comando.

Cat9k#show platform software fed switch active punt packet-capture status

Punt packet capturing: enabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 110 packets. Capture capacity : 6000 packets

Modificar a captura de pacotes

A ferramenta de captura de pacotes punt/inject FED é aprimorada para permitir o ajuste de configuração de tipo e tamanho de buffer de pacote para criar capturas de pacotes lineares ou circulares.

Cat9k#debug platform software fed switch active punt packet-capture buffer ?

circular  Circular capture

limit     Number of packets to capture

Captura de pacote linear

A primeira opção de configuração de buffer é limitar o número de pacotes (o tamanho padrão é 4096 pacotes) que são enviados ao buffer. Quando o limite de tamanho do buffer for atingido, nenhum outro pacote será coletado (sem encapsulamento do buffer).

Cat9k#debug platform software fed switch active punt packet-capture buffer limit ?

<256-16384>  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer limit 5000

Punt PCAP buffer configure: one-time with buffer size 5000...done

Captura de pacote circular

A segunda opção de configuração de buffer é definir um buffer circular para pacotes (o tamanho padrão do buffer é de 4096 pacotes). Quando o limite de tamanho do buffer circular for atingido, os dados antigos serão substituídos por novos dados no buffer (encapsulamento do buffer).

Cat9k#debug platform software fed switch active punt packet-capture buffer circular ?

limit  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer circular limit ?

<256-16384>  Number of packets to capture

Cat9k#debug platform software fed switch active punt packet-capture buffer circular limit 6000

Punt PCAP buffer configure: circular with buffer size 6000...done

A captura de pacotes pode então ser executada novamente com os mesmos parâmetros.

Cat9k#debug platform software fed switch active punt packet-capture start

Punt packet capturing started.

Cat9k#show platform software fed switch active punt packet-capture status

Punt packet capturing: enabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 110 packets. Capture capacity : 6000 packets

Cat9k#debug platform software fed switch active punt packet-capture stop

Punt packet capturing stopped. Captured 426 packet(s)

Cat9k#show platform software fed switch active punt packet-capture brief

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 426 packets. Capture capacity : 6000 packets

------ Punt Packet Number: 1, Timestamp: 2020/04/10 23:37:14.884 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 2, Timestamp: 2020/04/10 23:37:14.899 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

--snip--

Filtragem de exibição e captura

A ferramenta de captura de pacotes Punt/Inject FED foi aprimorada para permitir opções de exibição e filtro de pacotes.

Filtragem de exibição

Uma vez concluída a captura sem um filtro, ela poderá ser revisada para exibir somente as informações nas quais você está interessado.

Cat9k#show platform software fed switch active punt packet-capture display-filter "ip.src== 10.11.0.0/24" brief

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 426 packets. Capture capacity : 6000 packets

------ Punt Packet Number: 2, Timestamp: 2020/04/10 23:37:14.899 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 45 [BFD control], sub-cause: 0, q-no: 27, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.1, src ip: 10.11.0.1

ipv4  hdr : packet len: 40, ttl: 254, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

------ Punt Packet Number: 4, Timestamp: 2020/04/10 23:37:15.023 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000008], pal: Vlan20 [if-id: 0x00000076]

metadata  : cause: 29 [RP handled ICMP], sub-cause: 0, q-no: 6, linktype: MCP_LINK_TYPE_IP [1]

ether hdr : dest mac: 084f.a940.fa56, src mac: 380e.4d77.4f66

ether hdr : vlan: 20, ethertype: 0x8100

ipv4  hdr : dest ip: 10.11.0.3, src ip: 10.11.0.3

ipv4  hdr : packet len: 40, ttl: 255, protocol: 17 (UDP)

udp   hdr : dest port: 3785, src port: 49152

Como não é o Wireshark, nem todos os filtros do Wireshark são suportados. Use o comando display-filter-help para ver as diferentes opções disponíveis para filtragem.

Cat9k#show platform software fed switch active punt packet-capture display-filter-help

FED Punject specific filters :

1. fed.cause              FED punt or inject cause

2. fed.linktype           FED linktype

3. fed.pal_if_id          FED platform interface ID

4. fed.phy_if_id          FED physical interface ID

5. fed.queue              FED Doppler hardware queue

6. fed.subcause           FED punt or inject sub cause

Generic filters supported :

7. arp                    Is this an ARP packet

8. bootp                  DHCP packets [Macro]

9. cdp                    Is this a CDP packet

10. eth                    Does the packet have an Ethernet header

11. eth.addr               Ethernet source or destination MAC address

12. eth.dst                Ethernet destination MAC address

13. eth.ig                 IG bit of ethernet destination address (broadcast/multicast)

14. eth.src                Ethernet source MAC address

15. eth.type               Ethernet type

16. gre                    Is this a GRE packet

17. icmp                   Is this a ICMP packet

18. icmp.code              ICMP code

19. icmp.type              ICMP type

20. icmpv6                 Is this a ICMPv6 packet

21. icmpv6.code            ICMPv6 code

22. icmpv6.type            ICMPv6 type

23. ip                     Does the packet have an IPv4 header

24. ip.addr                IPv4 source or destination IP address

25. ip.dst                 IPv4 destination IP address

26. ip.flags.df            IPv4 dont fragment flag

27. ip.flags.mf            IPv4 more fragments flag

28. ip.frag_offset         IPv4 fragment offset

29. ip.proto               Protocol used in datagram

30. ip.src                 IPv4 source IP address

31. ip.ttl                 IPv4 time to live

32. ipv6                   Does the packet have an IPv4 header

33. ipv6.addr              IPv6 source or destination IP address

34. ipv6.dst               IPv6 destination IP address

35. ipv6.hlim              IPv6 hot limit

36. ipv6.nxt               IPv6 next header

37. ipv6.plen              IPv6 payload length

38. ipv6.src               IPv6 source IP address

39. stp                    Is this a STP packet

40. tcp                    Does the packet have a TCP header

41. tcp.dstport            TCP destination port

42. tcp.port               TCP source OR destination port

43. tcp.srcport            TCP source port

44. udp                    Does the packet have a UDP header

45. udp.dstport            UDP destination port

46. udp.port               UDP source OR destination port

47. udp.srcport            UDP source port

48. vlan.id                Vlan ID (dot1q or qinq only)

49. vxlan                  Is this a VXLAN packet

Filtragem de captura

Antes do início da captura de pacotes, você pode definir um filtro para ajudar a capturar apenas tráfego específico.

C9300#debug platform software fed switch active punt packet-capture set-filter "ip.src== 10.1.1.0/24 && tcp.port == 179"

Filter setup successful. Captured packets will be cleared

C9300#show platform software fed switch active punt packet-capture status

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 0 packets. Capture capacity : 6000 packets

Capture filter : "ip.src== 10.1.1.0/24 && tcp.port == 179"

C9300#debug platform software fed switch active punt packet-capture clear-filter

Filter cleared. Captured packets will be cleared

C9300#show platform software fed switch active punt packet-capture status

Punt packet capturing: disabled. Buffer wrapping: enabled (wrapped 0 times)

Total captured so far: 0 packets. Capture capacity : 6000 packets

Classificar por Top Talker (17.6.X)

A partir de 17.6.1, você pode classificar os pacotes capturados pelos principais locutores com base em um campo especificado.

Switch#show platform software fed switch active punt packet-capture cpu-top-talker ?

cause-code          occurences of cause-code

dst_ipv4            occurrences on dst_ipv4

dst_ipv6            occurrences on dst_ipv4

dst_l4              occurences of L4 destination

dst_mac             Occurrences of dst_mac

eth_type            Occurrences of eth_type

incoming-interface  occurences of incoming-interface

ipv6_hoplt          occurences of hoplt

protocol            occurences of layer4 protocol

src_dst_port        occurences of layer4 src_dst_port

src_ipv4            occurrences on src_ipv4

src_ipv6            occurrences on src_ipv6

src_l4              occurences of L4 source

src_mac             Occurrences of src_mac

summary             occurences of all in summary

ttl                 occurrences on ttl

vlan                Occurrences of vlan

Switch#show platform software fed switch active punt packet-capture cpu-top-talker dst_mac

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 224 packets. Capture capacity : 4096 packets

Sr.no.  Value/Key       Occurrence

1       01:80:c2:00:00:00       203

2       01:00:0c:cc:cc:cc       21

Switch#show platform software fed switch active punt packet-capture cpu-top-talker summary

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 224 packets. Capture capacity : 4096 packets

L2 Top Talkers:

224     Source mac      00:27:90:be:20:84

203     Dest mac        01:80:c2:00:00:00

L3 Top Talkers:

L4 Top Talkers:

Internal Top Talkers:

224     Interface       FortyGigabitEthernet2/1/2

224     CPU Queue       Layer2 control protocols

Informações Relacionadas

Para obter mais detalhes sobre Troubleshooting de CPU em plataformas Cat9K:

Identificar e Solucionar Problemas de Alto Uso da CPU em Plataformas de Switch Catalyst Executando o Cisco IOS-XE 16.x

Leitura adicional

- Cisco IOS-XE 16 - Resumo

- Troubleshooting de Uso Elevado da CPU do Catalyst 3850 Series Switch

- Captura de pacote incorporado para Cisco IOS e exemplo de configuração do Cisco IOS-XE

- Suporte Técnico e Documentação - Cisco Systems