Contents

Introduction:

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Problema

Resolução

Introduction:

Este documento descreve como solucionar problemas de integração do Google Cloud com o CloudCenter Manager (CCM) versão 4.8.0/4.7.x .

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Interface Linux

- Ambientes de máquina virtual

- conta de nuvem do Google

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software:

- CloudCenter versão 4.6.x a 4.8.x

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Informações de Apoio

Depois que você adicionar com êxito o orquestrador GCE (CCO) ao CCM e tentar testar o ambiente implantando um aplicativo que inclui a seleção de tipo de instância e zona, uma mensagem de erro é exibida ao tentar selecionar o projeto como mostrado na imagem:

Problema

Em alguns registros do CCM, você pode encontrar este erro:

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:45,991 INFO  impl.CloudPropertiesServiceImpl [asyncOperationExecutor-6]  - cloud property task is invoked

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,006 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-6]  - cloud data is not null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,006 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-6]  - got the region end point as null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,011 INFO  impl.CloudPropertiesServiceImpl [asyncOperationExecutor-7]  - cloud property task is invoked

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,014 INFO  impl.CloudPropertiesServiceImpl [asyncOperationExecutor-8]  - cloud property task is invoked

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,024 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-7]  - cloud data is not null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,024 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-7]  - got the region end point as null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,032 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-8]  - cloud data is not null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,032 INFO  impl.CloudManagementServiceImpl [asyncOperationExecutor-8]  - got the region end point as null

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,765 ERROR impl.CloudPropertiesServiceImpl [asyncOperationExecutor-6]  - Failed to getCloudPropertiesFromGateway from gateway for propertyType : Project

VENDOR_ID::1::USER_ID::2::2017-05-29 04:11:46,765 ERROR impl.CloudPropertiesServiceImpl [asyncOperationExecutor-6]  - 500 Internal Server Error

org.springframework.web.client.HttpServerErrorException: 500 Internal Server Error

at org.springframework.web.client.DefaultResponseErrorHandler.handleError(DefaultResponseErrorHandler.java:94)

at org.springframework.web.client.RestTemplate.handleResponse(RestTemplate.java:641)

at org.springframework.web.client.RestTemplate.doExecute(RestTemplate.java:597)

at org.springframework.web.client.RestTemplate.execute(RestTemplate.java:557)

at org.springframework.web.client.RestTemplate.postForObject(RestTemplate.java:357)

at com.osmosix.commons.util.AjaxUtil.postJson(AjaxUtil.java:117)

at com.osmosix.mgmt.cloud.impl.CloudPropertiesServiceImpl.getCloudPropertiesFromGateway(CloudPropertiesServiceImpl.java:365)

at com.osmosix.mgmt.cloud.impl.CloudPropertiesServiceImpl$CloudPropertyTask.run(CloudPropertiesServiceImpl.java:461)

at com.osmosix.commons.operation.impl.AsyncOperationServiceImpl$2.run(AsyncOperationServiceImpl.java:134)

at java.util.concurrent.Executors$RunnableAdapter.call(Executors.java:511)

at java.util.concurrent.FutureTask.run(FutureTask.java:266)

at java.util.concurrent.ThreadPoolExecutor.runWorker(ThreadPoolExecutor.java:1142)

at java.util.concurrent.ThreadPoolExecutor$Worker.run(ThreadPoolExecutor.java:617)

at java.lang.Thread.run(Thread.java:748)

No entanto, se você for ao CCO osmoseis logs, obterá uma imagem clara.

2017-05-29 04:28:00,425 INFO  job.JobServiceController [http-apr-8443-exec-3]  - processing validateCloudAccount request...

2017-05-29 04:28:00,632 ERROR properties.CloudPropertiesController [http-apr-8443-exec-6]  - com.google.api.client.googleapis.json.GoogleJsonResponseException: 403 Forbidden

{

"code" : 403,

"errors" : [ {

"domain" : "global",

"message" : "Google Cloud Resource Manager API has not been used in project credible-spark-166514 before or it is disabled. Enable it by visiting https://console.developers.google.com/apis/api/cloudresourcemanager.googleapis.com/overview?project=credible-spark-166514 then retry. If you enabled this API recently, wait a few minutes for the action to propagate to our systems and retry.",

"reason" : "forbidden"

} ],

"message" : "Google Cloud Resource Manager API has not been used in project credible-spark-166514 before or it is disabled. Enable it by visiting https://console.developers.google.com/apis/api/cloudresourcemanager.googleapis.com/overview?project=credible-spark-166514 then retry. If you enabled this API recently, wait a few minutes for the action to propagate to our systems and retry.",

"status" : "PERMISSION_DENIED"

Resolução

Essas APIs devem ser habilitadas para que o centro de nuvem funcione corretamente com o GCE:

- API do Google Compute Engine

- API do Google Cloud Resource Manager

Para ativá-lo:

1. No console GCE, navegue até o painel da API, como mostrado na imagem:

2. No final da página, todas as APIs habilitadas estão listadas e, provavelmente, você descobrirá que a API do Google Compute Engine já está habilitada, se não habilitada, como mostrado na imagem:

3. No entanto, o GCE não coloca a API do gerenciador de recursos na página diretamente, portanto é necessário pesquisá-la. Para isso, selecione a opção enable API na parte superior da página e ela o redireciona para a biblioteca de API.

4. Como mostrado na imagem, procure a API do Google Cloud Resource Manager , selecione-a e ative-a.

5. Para refletir essas alterações, reinicie a máquina CCO e tente implantar o aplicativo novamente.