Inhoud

Inleiding

Achtergrondinformatie

Probleem

Oplossing

Voorbeelden van uitvoer voor containers

Voorbeeld-uitvoer voor VMs

SSH in de UCS-host

Inleiding

Dit document beschrijft hoe u een Unified Computing System (UCS) kunt identificeren en de foutmeldingen aldaar in het Cloud Native Deployment Platform (CNDP) kunt controleren.

Achtergrondinformatie

De hardware-gerelateerde waarschuwingen worden gerapporteerd in de Ultra Cloud Core Subscriber Microservices Infrastructuur (SMI) Cluster Manager (CM) Common Executive Environment (CEE). De Kubernetes (K8s), de docker, enzovoort, worden over verwante informatie gerapporteerd in de virtuele IP van CM (VIP).

Voorzichtig: Raadpleeg de vragenlijst over netwerkontwerp en klantinformatie (CIQ) om de IP’s te controleren.

Probleem

De fout "Alarm voor apparatuur" wordt gemeld in waarschuwingsberichten.

- Meld u aan bij CM-CEE, voer de opdracht uit om waarschuwingen in actieve details te tonen en geef een overzicht van de waarschuwingen in om alle actieve berichten en geschiedeniswaarschuwingen weer te geven.

- Merk op dat de server IP in de waarschuwing is gemeld.

[lab-deployer/labceec01] cee# show alerts active detail

alerts active detail server-alert 9c367ce5ee48

severity    major

type        "Equipment Alarm"

startsAt    2021-10-27T17:10:37.025Z

source      10.10.10.10

summary     "DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM"

labels      [ "alertname: server-alert" "cluster: cr-chr-deployer" "description: DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM" "fault_id: sys/rack-unit-1/board/memarray-1/mem-5/fault-F0185" "id: 134219020" "monitor: prometheus" "replica: cr-chr-deployer" "server: 10.10.10.10" "severity: major" ]

annotations [ "dn: cr-chr-deployer/10.10.10.10/sys/rack-unit-1/board/memarray-1/mem-5/fault-F0185/134219020" "summary: DDR4_P1_C1_ECC: DIMM 5 is inoperable : Check or replace DIMM" "type: Equipment Alarm" ]

[lab-deployer/labceec01] cee# show alerts history summary

NAME      UID           SEVERITY  STARTS AT       DURATION  SOURCE       SUMMARY

---------------------------------------------------------------------------------------------

vm-alive  f6a65030b593  minor     09-02T10:28:28  1m40s     10-192-0-13  labd0123 is alive.

vm-error  3a6d840e3eda  major     09-02T10:27:18  1m        10-192-0-13  labd0123 is down.

vm-alive  49b2c1941dc6  minor     09-02T10:25:38  1m40s     10-192-0-14  labd0123 is alive.

Oplossing

Identificeer de services (containers) en/of virtuele machine (VM) of op Kernel gebaseerde virtuele machine (KVM) die op de server in het SMI CM worden gehost, voer de opdracht show-in-configuratie uit en vind de configuratie voor de server-IP.

1. Inloggen bij de CM VIP (gebruikersnaam: wolkengebruiker)

2. Haal de IP van OPS Center voor de smi-cm naamruimte

3. Meld u aan bij het OPS Center en controleer de clusterconfiguratie

4. Identificeer knooppunten en VM's die op de server worden uitgevoerd

cloud-user@lab-deployer-cm-primary:~$ kubectl get svc -n smi-cm

NAME                                          TYPE        CLUSTER-IP       EXTERNAL-IP      PORT(S)                                                 AGE

cluster-files-offline-smi-cluster-deployer    ClusterIP   10.102.200.178   <none>           8080/TCP                                                98d

iso-host-cluster-files-smi-cluster-deployer   ClusterIP   10.102.100.208     192.168.1.102    80/TCP                                                  98d

iso-host-ops-center-smi-cluster-deployer      ClusterIP   10.102.200.73    192.168.1.102    3001/TCP                                                98d

netconf-ops-center-smi-cluster-deployer       ClusterIP   10.102.100.207   192.168.184.193   3022/TCP,22/TCP                                         98d

ops-center-smi-cluster-deployer               ClusterIP   10.10.20.20     <none>           8008/TCP,2024/TCP,2022/TCP,7681/TCP,3000/TCP,3001/TCP   98d

squid-proxy-node-port                         NodePort    10.102.60.114    <none>           3128:32261/TCP                                          98d

cloud-user@lab-deployer-cm-primary:~$ ssh -p 2024 admin@10.10.20.20

admin@10.10.20.20's password:

Welcome to the Cisco SMI Cluster Deployer on lab-deployer-cm-primary

Copyright © 2016-2020, Cisco Systems, Inc.

All rights reserved.

admin connected from 192.168.1.100 using ssh on ops-center-smi-cluster-deployer-7848c69844-xzdw6

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters

Voorbeelden van uitvoer voor containers

In dit voorbeeld wordt de server gebruikt door knooppunt primair-1.

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters lab01-smf nodes primary-1

clusters lab01-smf

nodes primary-1

maintenance false

k8s node-type       primary

k8s ssh-ip          10.192.10.22

k8s sshd-bind-to-ssh-ip true

k8s node-ip         10.192.10.22

k8s node-labels smi.cisco.com/node-type oam

exit

k8s node-labels smi.cisco.com/node-type-1 proto

exit

ucs-server cimc user admin

ucs-server cimc ip-address 10.10.10.10

Voorbeeld-uitvoer voor VMs

De server kan worden gebruikt voor de KVM-gebaseerde VM.

In dit voorbeeld heeft de server gebruikersaanpassingsfuncties (UPF’s) - upf1 en upf2.

[lab-deployer-cm-primary] SMI Cluster Deployer# show running-config clusters lab01-upf nodes labupf

clusters lab01-upf

nodes labupf

maintenance false

ssh-ip      10.192.30.7

type        kvm

vms upf1

upf software lab...

...

type upf

exit

vms upf2

upf software lab...

...

type upf

exit

ucs-server cimc user admin

...

ucs-server cimc ip-address 10.10.10.10

...

exit

SSH in de UCS-host

Sluit aan op de UCS-host en controleer foutmeldingen met gamefout, geef foutmeldingen weer en geef foutgeschiedenis weer.

labucs111-cmp1-11 /fault # show fault-entries

Time Severity Description ------------------------- ------------- ---------------------------------------

2021-03-26T10:10:10 major "DDR4_P1_C1_ECC: DIMM 19 is inoperable : Check or replace DIMM"

LABCP0222-Server22-02 /fault # show fault-history

Time                Severity      Source          Cause                     Description

------------------- ------------- --------------- ------------------------- ----------------------------------------

2021 Dec 10 02:02:02 UTC info          %CIMC           EQUIPMENT_INOPERABLE      "[F0174][cleared][equipment-inoperable][sys/rack-unit-1/board] IERR: A catastrophic fault has occurred on one of the processors: Cleared "

2021 Dec 1 01:01:01 UTC critical      %CIMC           EQUIPMENT_INOPERABLE      "[F0174][critical][equipment-inoperable][sys/rack-unit-1/board] IERR: A catastrophic fault has occurred on one of the processors: Please check the processor's status. "