Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Configureren

Netwerkdiagram

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe u Point-to-Point Protocol over Ethernet (PPPoE) Server met de Bridge Domain Interface (BDI) en VLAN-bereik kunt configureren.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- End-to-end Layer 1 connectiviteit is fijn

- De grondbeginselen van PPP en PPPoE worden goed begrepen

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- HOST-1 - CISCO 887G

- HOST-2 - CISCO 887

- SWITCH - WS-C3560-24TS-S switch

- PPPoE-SERVER - ASR1001-X

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Configureren

Opmerking: Gebruik de Command Lookup Tool (alleen voor geregistreerde gebruikers) voor meer informatie over de opdrachten die in deze sectie worden gebruikt.

HOST-1

!

interface FastEthernet0

switchport access vlan 100

no ip address

end

!

interface Vlan100

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

HOST-2

!

interface FastEthernet0

switchport access vlan 200

no ip address

end

!

!

interface Vlan200

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

SWITCH

SWITCH#sh cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone,

D - Remote, C - CVTA, M - Two-port Mac Relay

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

SERVER           Gig 0/1           130              R I   ASR1001-X Gig 0/0/0

HOST-1           Fas 0/2           141            R B S I 887G      Fas 0

HOST-2           Fas 0/1           167            R B S I 887       Fas 0

!

interface FastEthernet0/2

switchport access vlan 100

end

!

interface FastEthernet0/1

switchport access vlan 200

end

!

!

interface GigabitEthernet0/1

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 100,200

switchport mode trunk

end

!

PPPoE-SERVER

!

username dsl password 0 dsl

!

bba-group pppoe global

virtual-template 1

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

cdp enable

service instance 100 ethernet

encapsulation dot1q 100 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 100

!

service instance 200 ethernet

encapsulation dot1q 200 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 200

!

!

interface Virtual-Template1

ip unnumbered Loopback0

peer default ip address pool POOL

ppp authentication chap

!

interface BDI100

no ip address

pppoe enable group global

!

interface BDI200

no ip address

pppoe enable group global

!

interface Loopback0

ip address 192.168.10.1 255.255.255.255

end

!

ip local pool POOL 192.168.1.1 192.168.1.100

!

U kunt ook 'VLAN-range' configureren zoals wordt getoond:

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

service instance 100 ethernet

encapsulation default

bridge-domain 1

!

end

!

interface BDI1

no ip address

vlan-range dot1q 1 4094

pppoe enable group global

!

end

Netwerkdiagram

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt.

Over HOST-1

HOST-1#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.4     YES IPCP   up                    up

HOST-1#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-1#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-1#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x1F000003

PPP Handle       : 0xB2000003

SSS Handle       : 0x8000004

AAA ID           : 24

Access IE        : 0xA7000003

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xB2000003

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 3

AAA Unique ID    : 24

SSS Manager ID   : 0x8000004

SIP ID           : 0x1F000003

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x7735647E (0x05067735647E)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A011AC (0x0506A7A011AC)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.5 (0x0306C0A80105)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

Over HOST-2

HOST-2#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.6     YES IPCP   up                    up

HOST-2#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-2#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-2#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x7B00000A

PPP Handle       : 0xA000000A

SSS Handle       : 0x4C00000B

AAA ID           : 68

Access IE        : 0x1D00000A

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xA000000A

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 10

AAA Unique ID    : 68

SSS Manager ID   : 0x4C00000B

SIP ID           : 0x7B00000A

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x421AC8AB (0x0506421AC8AB)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A0942C (0x0506A7A0942C)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.6 (0x0306C0A80106)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

Op SWITCH

SWITCH#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/2

11   VLAN0011                         active

12   VLAN0012                         active

13   VLAN0013                         active

100  VLAN0100                         active    Fa0/2

200  VLAN0200                         active    Fa0/1

SWITCH#Show interface trunk

Port        Mode             Encapsulation  Status        Native vlan

Gi0/1       on               802.1q         trunking      1

Port        Vlans allowed on trunk

Gi0/1       100,200

Port        Vlans allowed and active in management domain

Gi0/1       100,200

Port        Vlans in spanning tree forwarding state and not pruned

Gi0/1       100,200

Op PPPoE-SERVER

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.6     -               -               in

Vi2.2          dsl        192.168.1.5     -               -               in

SERVER#show ip local pool POOL

Pool                     Begin           End             Free  In use

POOL                     192.168.1.1     192.168.1.100     98       2

Available addresses:

192.168.1.7

192.168.1.8

192.168.1.9

.....

.....

Als je 'VLAN-range' gebruikt, moet je een wijziging in 'Port' opmerken:

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.7     -               -               in

Vi2.2          dsl        192.168.1.8     -               -               in

Problemen oplossen

Deze sectie verschaft informatie die u kunt gebruiken om problemen met uw configuratie op te lossen.

Deze deposito's zullen behulpzaam zijn bij het oplossen van problemen PPP/PPPoE.

- debug van PPP-gebeurtenissen

- tegenstrijdigheden van PPP

- debug van PPP-onderhandeling

Gerelateerde informatie

- PPPoE over BDI op CISCO CSR 1000V

- Verbeteringsvenster - PPPoE-afsluitingen op BDI en VLAN-bereik op ASR1k

- Technische ondersteuning en documentatie – Cisco Systems