Inhoud

Inleiding

Probleem

Oplossing

Gerelateerde informatie

Inleiding

Dit document beschrijft een nieuwe CLI, die de aanwezigheid van een Point-to-Point Protocol (PPP)-sessie via een dialerinterface bijhoudt.

Probleem

Dialer-interface wordt veel gebruikt in DSL-wereld (Digital Subscriber Line), in verschillende implementaties zoals Point-to-Point Protocol over Ethernet (PPPoE), Point-to-Point Protocol over Asynchronous Transfer Mode (PPPoA) enzovoort. De gebruikersinterface van de snelkiezer blijft altijd omhoog, ongeacht de PPP-sessie bovenop het is omhoog of omlaag. Een bekend probleem met dit gedrag is dat het zwarte gat in het routing kan veroorzaken in gevallen waar u meerdere uitgaande verbindingen hebt, tenzij u bepaalde extra functies gebruikt zoals IP SLA (Internet Protocol Service Level Agreement) om de bereikbaarheid via een dialerinterface te controleren.

Oplossing

Een nieuw CLI dialer down-with-vInterface is geïntroduceerd in recente IOS versies brengt de dialer interface naar beneden wanneer de PPP sessie afneemt.

Een configuratiefragment van een DSL-router:

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco@cisco.com

ppp chap password 0 cisco

De gebruikersinterface van de snelkiezer is in hogere staat, zelfs als de PPPoE-sessie is neergezet.

Router#show pppoe session

1 client session

Uniq ID  PPPoE  RemMAC          Port                    VT  VA         State

SID  LocMAC                                      VA-st      Type

N/A     58  00c1.64d5.41d1  Gi0/1                   Di1 N/A        PADISNT

0006.f657.67b1

Router#show interface dialer1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:49:48

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

CLIENT(config-if)

U kunt de nieuwe CLI toevoegen onder Kiezerinterfaceconfiguratie zoals wordt weergegeven:

Router(config)#int dialer1

Router(config-if)# dialer down-with-vInterface

Zodra het dialer-down-met-vInterface CLI is ingevoerd, wordt de dialerinterface verplaatst naar beneden als de PPP-sessie in benedenstaat is, zoals in het voorbeeld wordt getoond:

Router#show interface dialer1

Dialer1 is down, line protocol is down (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:50:36

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

Dit helpt de behoefte aan extra configuratie zoals IP SLA, volgen en zo te vermijden voor het routeren van failover om te werken terwijl het gebruik van dialer interfaces.

Gerelateerde informatie

- Configuratiehandleiding voor PPPoE