Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Configureren

Verifiëren

Inleiding

Dit document beschrijft beveiligde versleutelde configuratie Signaling Connection Control Part (SCCP) op VG224 analoge gateway.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- SCCP

- VG224

- Cisco Unified Communications Manager (CUCM)

Gebruikte componenten

De informatie in dit document is gebaseerd op deze softwareversies:

- VG224

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk levend is, zorg er dan voor dat u de mogelijke impact van om het even welke opdracht begrijpt.

Configureren

Stap 1. Kopieer het certificaat callmanager.pem naar VG224 (wat als SECURE trustpoint in de onderstaande configuratie kan worden aangeduid)

Stap 2. Maak een zelfondertekend certificaat op VG224 met het MAC-adres van Fast Ethernet0/0 (bind interface) met alleen de laatste 10 cijfers als de onderwerpregel.

Stap 3. Kopieer de vg-cert naar CUCM als een trust die de aanroep beheert en start CUCM opnieuw.

De informatie wordt verstrekt voor de opstelling van certificaten die vereist zijn voor VG224.

Router(config)#crypto key generate rsa general-keys label vg modulus 1024

Router(config)#crypto pki trustpoint vg

Router(ca-trustpoint)#enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E2  <----- Last 10 DIGITS ONLY of the SCCP bind interface. Formatting EXACTLY as shown with colons.

rsakeypair vg

crypto pki enroll vg

Router(config)#crypto pki export vg_cert pem terminal

Tip: Referentiehandleiding

Opmerking: U ziet geen pictogram van het slot bij het bellen van een beveiligde VG224-analoge telefoon naar een beveiligde IP-telefoon door CSCti0882

Verifiëren

Deze informatie is bedoeld voor verificatie met het oog op een succesvolle registratie van VG224

Router#show sccp

SCCP Admin State: UP

Gateway Local Interface: FastEthernet0/0

IPv4 Address: 14.1.97.95

Port Number: 2000

IP Precedence: 5

User Masked Codec list: None

Call Manager: 172.18.172.204, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 1

Trustpoint: N/A

Call Manager: 172.18.172.205, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 2

Trustpoint: N/A

Call Manager: 172.18.172.206, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 3

Trustpoint: N/A

AutoCfg_Virtual_Endpoint Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2000

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2FFF

Reported Max Streams: 0, Reported Max OOS Streams: 0

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Alg_Phone Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2443

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2400

Security

Signaling Security: ENCRYPTED TLS

Media Security: SRTP

Supported crypto suites :AES_CM_128_HMAC_SHA1_32

Reported Max Streams: 1, Reported Max OOS Streams: 0

Supported Codec: rfc2833 dtmf, Maximum Packetization Period: 30

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Supported Codec: g711alaw, Maximum Packetization Period: 20

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: g729ar8, Maximum Packetization Period: 220

Supported Codec: g729br8, Maximum Packetization Period: 220

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: ilbc, Maximum Packetization Period: 120

TLS : ENABLED

Dit toont aan dat veilig VG224 gebruik maakt van SCCP IOS-configuratie.

Building configuration...

Current configuration : 5258 bytes

!

version 15.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Router

!

boot-start-marker

boot system slot0:vg224-i6k9s-mz.151-4.M3

boot-end-marker

!

!

enable secret 5 $1$f99B$PWPClPrUNzgsUZEO8aBYG.

!

no aaa new-model

crypto pki token default removal timeout 0

!

crypto pki trustpoint SECURE

enrollment terminal

revocation-check crl

!

crypto pki trustpoint vg

enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E24       ( instead of this command,  we can use hiddle command "mac-address Fast Ethernet0/0 as well )

revocation-check crl

rsakeypair AN1AE2857BE2400

!

!

crypto pki certificate chain SECURE

certificate ca 588C9B7C2D4B37F03930E8C926D02A18

<truncated>

crypto pki certificate chain vg

certificate self-signed 03

<truncated>

ip source-route

!

ip cef

ip name-server 172.18.108.43

ip name-server 172.18.108.34

!

!

no ipv6 cef

!

stcapp ccm-group 1

stcapp security trustpoint vg

stcapp security mode encrypted

stcapp

!

stcapp feature access-code

!

stcapp feature speed-dial

!

!

!

stcapp supplementary-services

port 2/0

fallback-dn 862224

!

!

!

!

!

!

!

!

!

voice-card 0

!

!

!

!

!

!

!

!

!

!

interface FastEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface FastEthernet0/1

no ip address

duplex auto

speed auto

!

ip forward-protocol nd

!

ip http server

no ip http secure-server

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

!

!

!

control-plane

!

!

voice-port 2/0

timeouts initial 60

timeouts interdigit 60

timeouts ringing infinity

!

voice-port 2/1

!

<truncated>

!

voice-port 2/23

!

ccm-manager config server 172.18.172.204

ccm-manager config

ccm-manager sccp local FastEthernet0/0

ccm-manager sccp

!

!

mgcp profile default

!

sccp local FastEthernet0/0

sccp ccm 172.18.172.204 identifier 1 version 7.0

sccp ccm 172.18.172.205 identifier 2 version 7.0

sccp ccm 172.18.172.206 identifier 3 version 7.0

sccp

!

sccp ccm group 1

associate ccm 1 priority 1

associate ccm 2 priority 2

associate ccm 3 priority 3

!

dial-peer voice 999200 pots

service stcapp

securiy mode encrypted   =====> Required command

port 2/0

!

dial-peer voice 99920 pots

! service stcapp

securiy mode encrypted   =====> Required command

port 2/1

!

!(configure all ports in same secure mode)

!

line con 0

line aux 0

line vty 0 4

password ww

login

transport input all

!

ntp server 172.18.108.15

end