Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrond

Beperkingen

Configureren

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe u het Simple Network Management Protocol (SNMP) kunt uitvoeren op Cisco MGX-switches met een door de gebruiker ingestelde SNMP-groep.

Voorwaarden

Vereisten

Cisco raadt u aan aan dit vereiste te voldoen voordat u deze configuratie probeert: Het IP-adres dat in de LAN-interface in de MGX is ingesteld, moet bereikbaar zijn via het systeem waarop u de SNMP-stap wilt uitvoeren.

Gebruikte componenten

Dit document is gebaseerd op een MGX 8850 met een PXM45C-processorkaart. Dit document is echter niet beperkt tot specifieke software- en hardwareversies.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Achtergrond

Wanneer u een ObjectIdentifier (OID) poll met een SNMP-lopen in een openbare/particuliere groep op een MGX, werkt het goed (zie de output). Maar als je een nieuwe SNMP groep definieert en een wandeling uitvoert, dan ontvang je time-outs.

MGX.7.PXM.a > dspsnmpgroups

GroupName               SecurityModel     SecurityLevel

-------------------------------- ----------------- -----------------

public                             SNMPV1              NoAuthNoPriv

private                            SNMPV1              NoAuthNoPriv

cisco_group                        SNMPV3              AuthPriv

trapCommunity                      SNMPV1              NoAuthNoPriv

snmp_server% snmpwalk -Os -c public -v1 192.168.2.2 system

sysDescr.0 = STRING: Cisco MGX8880 Media Gateway

sysObjectID.0 = OID: enterprises.9.1.598

sysUpTimeInstance = Timeticks: (497996272) 57 days, 15:19:22.72

sysContact.0 = STRING:

sysName.0 = STRING: MGX

sysLocation.0 = STRING:

sysServices.0 = INTEGER: 72

snmp_server% snmpwalk -Os -c private -v1 192.168.2.2 system

sysDescr.0 = STRING: Cisco MGX8850 Wide Area Switch

sysObjectID.0 = OID: enterprises.9.1.228

sysUpTimeInstance = Timeticks: (10648330) 1 day, 5:34:43.30

sysContact.0 = STRING:

sysName.0 = STRING: MGX

sysLocation.0 = STRING:

sysServices.0 = INTEGER: 72

Beperkingen

Standaard is een SNMP-wandeling op een MGX alleen toegestaan voor openbare en particuliere SNMP-groepen.

Configureren

Voltooi deze stappen om de configuratie uit te voeren.

1. Voeg een nieuwe SNMP groep (zoals test) toe met de adgroup opdracht.

MGX.7.PXM.a > addsnmpgroup

Syntax:  addsnmpgroup <groupName> <securityModel> <securityLevel>

groupName -- String with length less than 33 characters

securityModel -- 1 - snmpv1, 3 -  usm (snmpv3)

securityLevel -- 1 - noAuthNoPriv, 2 - authNoPriv, 3 - authPriv

(for securityModel = snmpv1, securityLevel has to be 1)

read -- String with length less than 33 characters

write -- String with length less than 33 characters

notify -- String with length less than 33 characters

(for SII, use SII-RW-VIEW as Read & Write view and SII-TRAP-VIEW

as Notify view)

MGX.7.PXM.a > addsnmpgroup test 1 1 >>> Adding SNMP group named 'test' for

SNMPv1 and noAuthNoPriv.

MGX.7.PXM.a > dspsnmpgroups

GroupName               SecurityModel     SecurityLevel

-------------------------------- ----------------- -----------------

test                               SNMPV1              NoAuthNoPriv

public                             SNMPV1              NoAuthNoPriv

private                            SNMPV1              NoAuthNoPriv

cisco_group                        SNMPV3              AuthPriv

trapCommunity                      SNMPV1              NoAuthNoPriv

2. Voer een SNMP-lopen uit.

snmp_server% snmpwalk -Os -c test -v1 192.168.2.2 system

Timeout: No Response from 192.168.2.2 >>>>>>>>>>>>>>>>>>>>>>>>>>>>>>

>>>> does not work
De reden voor dit gedrag is dat de OID met een SNMP-wandeling ALLEEN werkt voor publieke en particuliere groepen (zoals beschreven in het vak Beperking).

3. Configuratie van de SNMP gemeenschap.

MGX.7.PXM.a > dspsnmp

MGX                               System Rev: 05.05   May. 10, 2014 03:16:57 GMT

MGX8850                                              Node Alarm: MAJOR

Community (rw):          private

Community (ro):          public

System Location:

System Contact:

4. Voeg test toe aan de lees-schrijfrechten.

MGX.7.PXM.a > cnfsnmp community

ERR: Syntax: cnfsnmp community <string> [ro|rw]

cnfsnmp contact   [string] -- a printable string of 0-255 characters

cnfsnmp location  [string] -- a printable string of 0-255 characters

MGX.7.PXM.a > cnfsnmp community  test rw

M5.7.PXM.a > dspsnmp

MGX                              System Rev: 05.05   May. 05, 2014 05:05:02 GMT

MGX8850                                              Node Alarm: CRITICAL

Community (rw):          test >>>>>>>>>>>>>>earlier it was private

Community (ro):          public

System Location:

System Contact:

Verifiëren

Gebruik dit gedeelte om te controleren of de configuratie goed werkt.

1. Controleer of de SNMP-groepstest is toegevoegd.

MGX.7.PXM.a > dspsnmpgroups

GroupName               SecurityModel     SecurityLevel

-------------------------------- ----------------- -----------------

test                               SNMPV1              NoAuthNoPriv

public                             SNMPV1              NoAuthNoPriv

private                            SNMPV1              NoAuthNoPriv

cisco_group                        SNMPV3              AuthPriv

trapCommunity                      SNMPV1              NoAuthNoPriv

2. Controleer de SNMP-groepscommunity.

M5.7.PXM.a > dspsnmp

MGX                              System Rev: 05.05   May. 05, 2014 05:05:02 GMT

MGX8850                                              Node Alarm: CRITICAL

Community (rw):          test >>>>>>>>>>>>>>earlier it was private

Community (ro):          public

System Location:

System Contact:

3. Voer een SNMP-wandeling uit met de testgemeenschap.

snmp_server@kyudo-1% snmpwalk -Os -c test -v1 192.168.2.2 system

sysDescr.0 = STRING: Cisco MGX8850 Wide Area Switch

sysObjectID.0 = OID: enterprises.9.1.228

sysUpTimeInstance = Timeticks: (10699803) 1 day, 5:43:18.03

sysContact.0 = STRING:   [string] -- a printable string of 0-255 characters

sysName.0 = STRING: M5

sysLocation.0 = STRING:  [string] -- a printable string of 0-255 characters

sysServices.0 = INTEGER: 72

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Cisco MGX 8800/8900 Series softwarerelease 5.5.10

- Technische ondersteuning en documentatie – Cisco Systems