Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Topologie

Controleer het besturingsplane

Verifieer het gegevensvlak

Verifieer het gegevensvlak

Neem ELAM Captures om poortanalyse, segment en SRCid te verifiëren

Inleiding

In dit document wordt de aanpak beschreven voor het oplossen van problemen met Ethernet VPN/Virtual Extensible LAN (EVPN/VxLAN) in een installatie op meerdere locaties.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Multiprotocol Label Switching (MPLS) Layer 3 VPN

- Multiprotocol-Border Gateway Protocol (MP-BGP)

- EVPN

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

Alle pagina's

N9K-C936C-FX2 switch

NXOS: 10.2(3)

S1_ruggengraat1

N9K-C9364C switch

NXOS: 10.2(4)

S1_Spine2

N9K-C9364C switch

NXOS: 9.3(5)

S1_Border Gateway1, S2_Border Gateway2, S2_Border Gateway1

N9K-C932C switch

NXOS: 9.3(9)

S1_border-gateway2

N9K-C932C switch

NXOS: 10.2(4)

Routeserver

N9K-C9396PX switch

NXOS: 9.2(2)

Host-1

N3K-C3264C-E switch

NXOS: 9.3(5)

Host-2 en Host-3

N3K-C3264C-E switch

NXOS: 9.2(2)

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Topologie

Topologie

Dit document beschrijft waar het verkeer afkomstig is van DC-2 Host-3 (192.168.200.104/24) en loopt vervolgens met de pakketten tot de bestemming DC-1 Host-2 (10.2.3.4).

Controleer het besturingsplane

Geef deze opdrachten op om het bedieningsvlak te controleren:

HOST_3# show ip int brief

IP Interface Status for VRF "default"(1)

Interface IP Address Interface Status

Vlan100 192.168.100.103 protocol-up/link-up/admin-up

Vlan200 192.168.200.103 protocol-up/link-up/admin-up

HOST_3#

External_Router#

External_Router# show ip int brie

IP Interface Status for VRF "default"(1)

Interface IP Address Interface Status

Vlan100 192.168.100.102 protocol-up/link-up/admin-up

Vlan200 192.168.200.102 protocol-up/link-up/admin-up

Lo10 10.2.3.4 protocol-up/link-up/admin-up

External_Router#

HOST_3#

HOST_3# ping 10.2.3.4 source 192.168.100.103

PING 10.2.3.4 (10.2.3.4) from 192.168.100.103: 56 data bytes

64 bytes from 10.2.3.4: icmp_seq=0 ttl=250 time=1.153 ms

64 bytes from 10.2.3.4: icmp_seq=1 ttl=250 time=0.569 ms

64 bytes from 10.2.3.4: icmp_seq=2 ttl=250 time=0.562 ms

64 bytes from 10.2.3.4: icmp_seq=3 ttl=250 time=0.525 ms

64 bytes from 10.2.3.4: icmp_seq=4 ttl=250 time=0.527 ms

--- 10.2.3.4 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 0.525/0.667/1.153 ms

HOST_3#

S2-Leaf1# show bgp l2vpn evp vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 4420, Local Router ID is 10.103.0.5

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.103.0.5:5    (L3VNI 4000502)

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.2                      100          0 300 100 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.2

S2-Leaf2# show bgp l2vpn evp vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 4389, Local Router ID is 10.103.0.8

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.103.0.8:5    (L3VNI 4000502)

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.2                      100          0 300 100 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.2                      100          0 300 100 i

S2-Leaf2#

S2-leaf3# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 4196, Local Router ID is 10.103.0.9

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.103.0.9:5    (L3VNI 4000502)

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.2                      100          0 300 100 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.2                      100          0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.2                      100          0 300 100 i

S2-Leaf4#

S2-Leaf4# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 4381, Local Router ID is 10.102.0.10

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network  Next Hop  Metric  LocPrf Weight Path

Route Distinguisher: 10.102.0.10:5 (L3VNI 4000502)

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.2 100 0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.2 100 0 300 100 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.2 100 0 300 100 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.2 100 0 300 100 i

S2-Leaf4#

S2-Leaf4#

S2-Spine1# show bgp  l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 1235, Local Router ID is 10.103.0.3

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 200:4000502

* i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.2                      100          0 300 100

*>i                   10.100.100.2                      100          0 300 100 i

* i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.2                      100          0 300 100 65111 i

*>i                   10.100.100.2                      100          0 300 100 65111 i

* i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.2                      100          0 300 100 i

*>i                   10.100.100.2                      100          0 300 100 i

* i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.2                      100          0 300 100 i

*>i                   10.100.100.2                      100          0 300 100 i

S2-BG1# show ip int brie

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.31.1.3       protocol-up/link-up/admin-up

Lo1                  10.135.135.135  protocol-up/link-up/admin-up

Lo100                10.100.100.2    protocol-up/link-up/admin-up

Eth1/1               192.168.17.12   protocol-up/link-up/admin-up

Eth1/3               10.150.152.1    protocol-up/link-up/admin-up

S2-BG1#

S2-BG1# show ip route 10.2.3.4 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.2.3.4/32, ubest/mbest: 1/0

*via 10.100.100.1%default, [20/0], 04:09:46, bgp-200, external, tag 300, segid: 4000502 tunnelid: 0xa646401 encap: VXLAN

S2-BG1#

S2-BG1# show bgp l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 6206, Local Router ID is 10.31.1.3

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 100:4000502

*>e[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.1                                   0 300 100 i

*>e[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.1                                   0 300 100 65111 i

*>e[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.1                                   0 300 100 i

*>e[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.1                                   0 300 100 i

S2-BG2# show ip int brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.31.1.4       protocol-up/link-up/admin-up

Lo1                  10.136.136.136  protocol-up/link-up/admin-up

Lo100                10.100.100.2    protocol-up/link-up/admin-up

Eth1/1               192.168.18.12   protocol-up/link-up/admin-up

Eth1/3               10.150.153.1    protocol-up/link-up/admin-up

S2-BG2#

S2-BG2#

S2-BG2# show ip route 10.2.3.4 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.2.3.4/32, ubest/mbest: 1/0

*via 10.100.100.1%default, [20/0], 04:15:13, bgp-200, external, tag 300, segid: 4000502 tunnelid: 0xa646401 encap: VXLAN

S2-BG2#

S2-BG2# show bgp l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 5455, Local Router ID is 10.31.1.4

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 100:4000502

*>e[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.1                                   0 300 100 i

*>e[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.1                                   0 300 100 65111 i

*>e[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.1                                   0 300 100 i

*>e[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.100.100.1                                   0 300 100 i

Router_Server# show ip int brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.32.1.1       protocol-up/link-up/admin-up

Eth2/1               10.150.150.2    protocol-up/link-up/admin-up

Eth2/2               10.150.151.2    protocol-up/link-up/admin-up

Eth2/4               10.150.152.2    protocol-up/link-up/admin-up

Eth2/5               10.150.153.2    protocol-up/link-up/admin-up

Router_Server#

Router_Server# show ip route 10.100.100.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.100.100.1/32, ubest/mbest: 2/0

*via 10.150.150.1, [20/0], 4d22h, bgp-300, external, tag 100

*via 10.150.151.1, [20/0], 4d22h, bgp-300, external, tag 100

Router_Server#

Router_Server#

Router_Server# show ip route 10.100.100.2

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.100.100.2/32, ubest/mbest: 2/0

*via 10.150.152.1, [20/0], 3w5d, bgp-300, external, tag 200

*via 10.150.153.1, [20/0], 3w5d, bgp-300, external, tag 200

Router_Server#

Router_Server# show bgp l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 4574, Local Router ID is 10.32.1.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 200:4000100

* e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.2          2000                     0 200 i

*>e                   10.100.100.2          2000                     0 200 i

Route Distinguisher: 100:4000502

*>e[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.100.100.1          2000                     0 100 i

* e                   10.100.100.1          2000                     0 100 i

* e[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.100.100.1          2000                     0 100 65111 i

*>e                   10.100.100.1          2000                     0 100 65111 i

*>e[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.100.100.1          2000                     0 100 i

* e                   10.100.100.1          2000                     0 100 i

*>e[5]:[0]:[0]:[32]:[10.100.100.2]/224

>                     10.100.100.1          2000                     0 100 i

* e                   10.100.100.1          2000                     0 100 i

S1_B2#

S1_B2# show ip int brie

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.31.1.2       protocol-up/link-up/admin-up

Lo1                  10.134.134.134  protocol-up/link-up/admin-up

Lo100                10.100.100.1    protocol-up/link-up/admin-up

Eth1/1               192.168.16.12   protocol-up/link-up/admin-up

Eth1/3               10.150.151.1    protocol-up/link-up/admin-up

S1_B2#

S1_B2#sho ip route 192.168.100.103 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.100.103/32, ubest/mbest: 1/0

*via 10.100.100.2%default, [20/0], 4d23h, bgp-100, external, tag 300, segid: 4000502 tunnelid: 0xa646402 encap: VXLAN

S1_B2#

S1_B2# show ip route 10.2.3.4 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.2.3.4/32, ubest/mbest: 1/0

*via 10.102.1.10%default, [200/0], 05:04:19, bgp-100, internal, tag 65111, segid: 4000502 tunnelid: 0xa66010a encap: VXLAN

S1_B2#

S1_B2#

S1_B2# show bgp l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 5449, Local Router ID is 10.31.1.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 200:4000100

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.df3b]:[32]:[192.168.100.104]/272

10.100.100.2                                   0 300 200 i

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.2                                   0 300 200 i

Route Distinguisher: 200:4000200

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.df3b]:[32]:[192.168.100.104]/272

10.100.100.2                                   0 300 200 i

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.2                                   0 300 200 i

Route Distinguisher: 10.102.0.9:5

*>i[2]:[0]:[0]:[48]:[cc7f.76fa.118f]:[0]:[0.0.0.0]/216

10.202.202.202                    100          0 i

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.10                       100          0 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.10                       100          0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.102.1.10                       100          0 i

Route Distinguisher: 10.102.0.10:5

*>i[2]:[0]:[0]:[48]:[cc7f.76c6.a673]:[0]:[0.0.0.0]/216

10.202.202.202                    100          0 i

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.6                        100          0 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.6                        100          0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100          0 i

Route Distinguisher: 10.31.1.2:5    (L3VNI 4000502)

*>l[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.134.134.134                    100          0 i

*>l[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.134.134.134                    100          0 65111 i

*>l[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.134.134.134                    100          0 i

*>l[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.134.134.134                    100          0 i

S1_B2#

S1-Bg1# show ip int brie

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.31.1.1       protocol-up/link-up/admin-up

Lo1                  10.133.133.133  protocol-up/link-up/admin-up

Lo100                10.100.100.1    protocol-up/link-up/admin-up

Eth1/1               192.168.15.12   protocol-up/link-up/admin-up

Eth1/3               10.150.150.1    protocol-up/link-up/admin-up

S1-Bg1#

S1-Bg1# show ip route 10.100.100.2 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.100.100.2/32, ubest/mbest: 1/0

*via 10.102.1.10%default, [200/0], 4d23h, bgp-100, internal, tag 100, segid: 4000502 tunnelid: 0xa66010a encap: VXLAN

S1-Bg1#

S1-Bg1# show ip route 192.168.100.103 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.100.103/32, ubest/mbest: 1/0

*via 10.100.100.2%default, [20/0], 4d23h, bgp-100, external, tag 300, segid: 4000502 tunnelid: 0xa646402 encap: VXLAN

S1-Bg1#

S1-Bg1# show ip route 10.2.3.4 vrf vrf_2

IP Route Table for VRF "vrf_2"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.2.3.4/32, ubest/mbest: 1/0

*via 10.102.1.10%default, [200/0], 05:21:41, bgp-100, internal, tag 65111, segid: 4000502 tunnelid: 0xa66010a encap: VXLAN

S1-Bg1#

S1-Bg1# show bgp l2vpn evpn

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 6654, Local Router ID is 10.31.1.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 200:4000100

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.df3b]:[32]:[192.168.100.104]/272

10.100.100.2                                   0 300 200 i

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.2                                   0 300 200 i

Route Distinguisher: 200:4000200

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.df3b]:[32]:[192.168.200.104]/272

10.100.100.2                                   0 300 200 i

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.200.103]/272

10.100.100.2                                   0 300 200 i

Route Distinguisher: 10.31.1.1:32867    (L2VNI 4000100)

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.2                                   0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ff09]:[32]:[192.168.100.102]/272

10.202.202.202                    100          0 i

* i                   10.202.202.202                    100          0 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3ff.00a7]:[32]:[192.168.100.100]/272

10.201.201.201                    100          0 i

* i                   10.201.201.201                    100          0 i

*>e[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.200.103]/272

10.100.100.2                                   0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ff09]:[32]:[192.168.200.102]/272

10.202.202.202                    100          0 i

* i                   10.202.202.202                    100          0 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3ff.00a7]:[32]:[192.168.200.100]/272

10.201.201.201                    100          0 i

* i                   10.201.201.201                    100          0 i

Route Distinguisher: 10.102.0.10:5

*>i[2]:[0]:[0]:[48]:[cc7f.76c6.a673]:[0]:[0.0.0.0]/216

10.202.202.202                    100          0 i

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.6                        100          0 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.6                        100          0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100          0 i

Route Distinguisher: 10.31.1.1:5    (L3VNI 4000502)

*>l[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.133.133.133                    100          0 i

*>l[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.133.133.133                    100          0 65111 i

*>l[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.133.133.133                    100          0 i

*>l[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.133.133.133                    100          0 i

S1-Bg1#

S1-Leaf1# show ip int brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.102.0.5      protocol-up/link-up/admin-up

Lo1                  10.102.1.8      protocol-up/link-up/admin-up

Eth1/2               192.168.17.12   protocol-up/link-up/admin-up

S1-Leaf1#

S1-Leaf1# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 918, Local Router ID is 10.102.0.5

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.102.0.5:5    (L3VNI 4000502)

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.1                      100          0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.200.103]/272

10.100.100.1                      100          0 300 200 i

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.10                       100          0 i

* i                   10.102.1.6                        100          0 i

*>i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.10                       100          0 65111 i

* i                   10.102.1.6                        100          0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100          0 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.102.1.10                       100          0 i

S1-Leaf1#

S1-Leaf2# show ip int brie

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.102.0.8      protocol-up/link-up/admin-up

Lo1                  10.102.1.9      protocol-up/link-up/admin-up

Eth1/2               192.168.18.12   protocol-up/link-up/admin-up

S1-Leaf2#

S1-Leaf2#

S1-Leaf2# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 680, Local Router ID is 10.102.0.8

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.102.0.8:5    (L3VNI 4000502)

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.1                      100          0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.200.103]/272

10.100.100.1                      100          0 300 200 i

*>i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.10                       100          0 i

* i                   10.102.1.6                        100          0 i

* i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.6                        100          0 65111 i

*>i                   10.102.1.10                       100          0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100          0 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.102.1.10                       100          0 i

S1-Leaf3#

S1-Leaf3# show ip int brie

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.102.0.9      protocol-up/link-up/admin-up

Lo1                  10.102.1.10     protocol-up/link-up/admin-up

Eth1/2               192.168.19.12   protocol-up/link-up/admin-up

S1-Leaf3#

S1-Leaf3#

S1-Leaf3#

S1-Leaf3# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 5431, Local Router ID is 10.102.0.9

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.102.0.9:5    (L3VNI 4000502)

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.1                      100          0 300 200 i

* i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.6                        100          0 i

*>l                   10.102.1.10                       100      32768 i

* i[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.6                        100          0 65111 i

*>l                   10.102.1.10                                    0 65111 i

*>i[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100          0 i

*>l[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.102.1.10                       100      32768 i

S1-Leaf3#

S1_Leaf4#

S1_Leaf4# show ip int brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Lo0                  10.102.0.10     protocol-up/link-up/admin-up

Lo1                  10.102.1.6      protocol-up/link-up/admin-up

Eth1/2               192.168.20.12   protocol-up/link-up/admin-up

S1_Leaf4#

S1_Leaf4#

S1_Leaf4# show bgp l2vpn evpn vrf vrf_2

BGP routing table information for VRF default, address family L2VPN EVPN

BGP table version is 5118, Local Router ID is 10.102.0.10

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

Route Distinguisher: 10.102.0.10:5    (L3VNI 4000502)

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.100.103]/272

10.100.100.1                      100          0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3fe.ecb5]:[32]:[192.168.200.103]/272

10.100.100.1                      100          0 300 200 i

*>i[2]:[0]:[0]:[48]:[6c8b.d3ff.00a7]:[32]:[192.168.100.100]/272

10.201.201.201                    100          0 i

* i                   10.201.201.201                    100          0 i

* i[5]:[0]:[0]:[24]:[192.168.100.0]/224

10.102.1.10                       100          0 i

*>l                   10.102.1.6                        100      32768 i

*>l[5]:[0]:[0]:[32]:[10.2.3.4]/224

10.102.1.6                                     0 65111 i

* i                   10.102.1.10                       100          0 65111 i

*>l[5]:[0]:[0]:[32]:[10.100.100.1]/224

10.102.1.6                        100      32768 i

*>i[5]:[0]:[0]:[32]:[10.100.100.2]/224

10.102.1.10                       100          0 i

S1_Leaf4#

Verifieer het gegevensvlak

De verificatie van het gegevensplan wordt op meerdere apparaten getest om verschillende pakketopnamemethoden en -varianten te begrijpen.

Ping de externe router loopback 100 "10.2.3.4" van het IP-bronadres 192.168.100.103 op Host-3.

HOST_3#

HOST_3# ping 10.2.3.4 source 192.168.100.103

PING 10.2.3.4 (10.2.3.4) from 192.168.100.103: 56 data bytes

64 bytes from 10.2.3.4: icmp_seq=0 ttl=250 time=1.153 ms

64 bytes from 10.2.3.4: icmp_seq=1 ttl=250 time=0.569 ms

64 bytes from 10.2.3.4: icmp_seq=2 ttl=250 time=0.562 ms

64 bytes from 10.2.3.4: icmp_seq=3 ttl=250 time=0.525 ms

64 bytes from 10.2.3.4: icmp_seq=4 ttl=250 time=0.527 ms

--- 10.2.3.4 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 0.525/0.667/1.153 ms

HOST_3#

Ethanalyzer wordt genomen op Site 2 Leaf-1 en Leaf-2 om te bevestigen welk blad ontvangt/voorwaarts verkeer voor externe router loopback 10.2.3.4 bereikbaarheid.

S2-Leaf1(config-monitor)# sho clock

Warning: No NTP peer/server configured. Time may be out of sync.

07:11:37.455 UTC Tue Feb 21 2023

Time source is NTP

S2-Leaf1(config-monitor)#

S2-Leaf1(config-monitor)# show run section monitor

show running-config | section monitor

icam monitor scale

monitor session 1

source interface port-channel100 both

destination interface sup-eth0

no shut

S2-Leaf1(config-monitor)#

S2-Leaf2(config-monitor)#

S2-Leaf2(config-monitor)# ethanalyzer local interface inband display-filter "ip.addr==10.2.3.4 && ip.addr==192.168.100.103 && icmp" limit-captured-frames 0

Capturing on 'ps-inb'

1385 2023-02-21 07:10:46.424195144 192.168.100.103 → 10.2.3.4     ICMP 102 Echo (ping) request  id=0xdd1f, seq=0/0, ttl=255

1386 2023-02-21 07:10:46.424818423     10.2.3.4 → 192.168.100.103 ICMP 98 Echo (ping) reply    id=0xdd1f, seq=0/0, ttl=251 (request in 1385)

1387 2023-02-21 07:10:46.425263621 192.168.100.103 → 10.2.3.4     ICMP 102 Echo (ping) request  id=0xdd1f, seq=256/1, ttl=255

1388 2023-02-21 07:10:46.425486046     10.2.3.4 → 192.168.100.103 ICMP 98 Echo (ping) reply    id=0xdd1f, seq=256/1, ttl=251 (request in 1387)

1389 2023-02-21 07:10:46.425856150 192.168.100.103 → 10.2.3.4     ICMP 102 Echo (ping) request  id=0xdd1f, seq=512/2, ttl=255

1390 2023-02-21 07:10:46.426095692     10.2.3.4 → 192.168.100.103 ICMP 98 Echo (ping) reply    id=0xdd1f, seq=512/2, ttl=251 (request in 1389)

1391 2023-02-21 07:10:46.426438174 192.168.100.103 → 10.2.3.4     ICMP 102 Echo (ping) request  id=0xdd1f, seq=768/3, ttl=255

1392 2023-02-21 07:10:46.426642605     10.2.3.4 → 192.168.100.103 ICMP 98 Echo (ping) reply    id=0xdd1f, seq=768/3, ttl=251 (request in 1391)

1393 2023-02-21 07:10:46.427004108 192.168.100.103 → 10.2.3.4     ICMP 102 Echo (ping) request  id=0xdd1f, seq=1024/4, ttl=255

1394 2023-02-21 07:10:46.427210984     10.2.3.4 → 192.168.100.103 ICMP 98 Echo (ping) reply    id=0xdd1f, seq=1024/4, ttl=251 (request in 1393)

10

S2-Leaf2(config-monitor)#

S2-Leaf2(config-monitor)# sho clock

Warning: No NTP peer/server configured. Time may be out of sync.

07:12:31.069 UTC Tue Feb 21 2023

Time source is NTP

S2-Leaf2(config-monitor)#

De CLI-output bevestigde Site 2 Leaf-2 ontvangt en verstuurt het ICMP-verzoek (Internet Control Message Protocol) voor de externe router 10.2.3.4.

Het volgende CLI voorbeeld bevestigt Site 1 verifieert welke bladvoorwaartse pakketten naar bestemming 10.2.3.4.

S1-Leaf3(config-monitor)#

S1-Leaf3(config-monitor)#  ethanalyzer local interface inband display-filter "ip.addr==10.2.3.4 && ip.addr==192.168.100.103 && icmp" limit-captured-frames 0

Capturing on 'ps-inb'

253 2023-02-21 07:10:50.379741403 192.168.100.103 → 10.2.3.4     ICMP 98 Echo (ping) request  id=0xdd1f, seq=0/0, ttl=251

254 2023-02-21 07:10:50.380357311     10.2.3.4 → 192.168.100.103 ICMP 102 Echo (ping) reply    id=0xdd1f, seq=0/0, ttl=255 (request in 253)

255 2023-02-21 07:10:50.380810012 192.168.100.103 → 10.2.3.4     ICMP 98 Echo (ping) request  id=0xdd1f, seq=256/1, ttl=251

256 2023-02-21 07:10:50.381025676     10.2.3.4 → 192.168.100.103 ICMP 102 Echo (ping) reply    id=0xdd1f, seq=256/1, ttl=255 (request in 255)

257 2023-02-21 07:10:50.381401968 192.168.100.103 → 10.2.3.4     ICMP 98 Echo (ping) request  id=0xdd1f, seq=512/2, ttl=251

258 2023-02-21 07:10:50.381631838     10.2.3.4 → 192.168.100.103 ICMP 102 Echo (ping) reply    id=0xdd1f, seq=512/2, ttl=255 (request in 257)

259 2023-02-21 07:10:50.381984272 192.168.100.103 → 10.2.3.4     ICMP 98 Echo (ping) request  id=0xdd1f, seq=768/3, ttl=251

260 2023-02-21 07:10:50.382176820     10.2.3.4 → 192.168.100.103 ICMP 102 Echo (ping) reply    id=0xdd1f, seq=768/3, ttl=255 (request in 259)

261 2023-02-21 07:10:50.382549820 192.168.100.103 → 10.2.3.4     ICMP 98 Echo (ping) request  id=0xdd1f, seq=1024/4, ttl=251

262 2023-02-21 07:10:50.382746640     10.2.3.4 → 192.168.100.103 ICMP 102 Echo (ping) reply    id=0xdd1f, seq=1024/4, ttl=255 (request in 261)

S1-Leaf3(config-monitor)# sho clock

Warning: No NTP peer/server configured. Time may be out of sync.

07:11:22.514 UTC Tue Feb 21 2023

Time source is NTP

S1-Leaf3(config-monitor)#

S1-Leaf3(config-monitor)# show run section monitor

show running-config | section monitor

monitor session 1

source interface port-channel2 both

destination interface sup-eth0

no shut

S1-Leaf3(config-monitor)#

S1-Leaf3(config-monitor)# show moni sess 1

session 1

---------------

type              : local

state             : up

acl-name          : acl-name not specified

source intf       :

rx            : Po2

tx            : Po2

both          : Po2

source VLANs      :

rx            :

tx            :

both          :

filter VLANs      : filter not specified

source fwd drops  :

destination ports : sup-eth0

source VSANs      :

rx            :

S1-Leaf3(config-monitor)#

S1_Leaf4(config-monitor)# ethanalyzer local interface inband display-filter "ip.addr==192.168.100.103"  limit-captured-frames 0

Capturing on 'ps-inb'

S1_Leaf4(config-monitor)#

S1_Leaf4(config-monitor)# sho clock

Warning: No NTP peer/server configured. Time may be out of sync.

07:11:15.187 UTC Tue Feb 21 2023

Time source is NTP

S1_Leaf4(config-monitor)#

De klant antwoordt dat zij connectiviteitsproblemen van Host-3 aan de externe router onder ogen zien. De klant wil bevestigen dat alles in orde is in de VXLAN-stof en heeft bevestiging nodig dat ons blad voorwaarts verkeer naar de externe router. De stappen om dit probleem op te lossen zijn:

1. Start een ping naar de externe router en bevestig als het IP-adres 10.2.3.4 al dan niet bereikbaar is.

2. Neem Embedded Logic Analyzer Module (ELAM) op zowel S1-Leaf3 als S1-Leaf4 om te zien of het geactiveerd wordt (gebaseerd op de topologie en verkeersstroom).

3. Bevestig met de ELAM-opname dat het pakket uit de interface wordt doorgestuurd en naar de externe router wijst.

4. Site 2- Met de ethanalyzer kunnen we het ICMP-verzoek en antwoord zien. Als er geen antwoord is, ligt het probleem aan de andere kant .

5. Als 10.2.3.4 bereikbaar is vanuit Host-4 en Host-3 problemen heeft, kan dit een host-specifiek probleem zijn. Controleer de toegangscontrolelijst (ACL), fouten in de cyclische redundantiecontrole (CRC) en de hashinglink.

HOST_3# ping 10.2.3.4 source 192.168.100.103

PING 10.2.3.4 (10.2.3.4) from 192.168.100.103: 56 data bytes

Request 0 timed out

Request 1 timed out

Request 2 timed out

Request 3 timed out

Request 4 timed out

--- 10.2.3.4 ping statistics ---

5 packets transmitted, 0 packets received, 100.00% packet loss

HOST_3#

Host4# ping 10.2.3.4 source 192.168.100.104

PING 10.2.3.4 (10.2.3.4) from 192.168.100.104: 56 data bytes

64 bytes from 10.2.3.4: icmp_seq=0 ttl=250 time=1.266 ms

64 bytes from 10.2.3.4: icmp_seq=1 ttl=250 time=0.62 m

64 bytes from 10.2.3.4: icmp_seq=2 ttl=250 time=0.603 ms

64 bytes from 10.2.3.4: icmp_seq=3 ttl=250 time=0.474 ms

64 bytes from 10.2.3.4: icmp_seq=4 ttl=250 time=0.457 ms

--- 10.2.3.4 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 0.457/0.684/1.266 ms

Verifieer het gegevensvlak

Neem ELAM Captures om poortanalyse, segment en SRCid te verifiëren

show hardware internal tah interface

show system internal ethpm info interface

| i i src

S1-Leaf3(TAH-elam)# debug platform internal tah elam asic 0

S1-Leaf3(TAH-elam)#  trigger init asic 0 slice 1 in-select 7 out-select 0 use-src-id  8

Slot 1: param values: asic 0, slice 1, lu-a2d 1, in-select 7, out-select 0, src_id 8

S1-Leaf3(TAH-elam-insel7)# set inner ipv4 src_ip 192.168.100.103

S1-Leaf3(TAH-elam-insel7)# start

S1-Leaf3(TAH-elam-insel7)#  report

HEAVENLY ELAM REPORT SUMMARY

slot - 1, asic - 0, slice - 1

============================

Incoming Interface: Eth1/2

Src Idx : 0x5, Src BD : 2001

Outgoing Interface Info: dmod 1, dpid 52>>>>>>>>>>>>Pointing to Eth 1/24 towards external Router

Dst Idx : 0x601, Dst BD : 100

Packet Type: IPv4

Dst MAC address: CC:7F:76:FA:11:8F

Src MAC address: 4C:E1:75:F7:38:C7

Dst IPv4 address: 10.2.3.4

Src IPv4 address: 192.168.100.103

Ver     =  4, DSCP    =   0, Don't Fragment = 0

Proto   =  1, TTL     =  252, More Fragments = 0

Hdr len = 20, Pkt len =   84, Checksum       = 0xb712

L4 Protocol  : 1

ICMP type    : 8

ICMP code    : 0

Drop Info:

----------

LUA:

LUB:

LUC:

LUD:

Final Drops:

vntag:

vntag_valid    : 0

vntag_vir      : 0

vntag_svif     : 0

S1-Leaf3(TAH-elam-insel7)#

S1_Leaf4# show system internal ethpm info interface ethernet 1/2 | grep slice

IF_STATIC_INFO: port_name=Ethernet1/2,if_index:0x1a000200,ltl=6140,slot=0, nxos_port=4,

dmod=1,dpid=76,unit=0,queue=65535,xbar_unitbmp=0x0,ns_pid=255,slice_num=1,port_on_slice=4,src_id=8

S1_Leaf4(TAH-elam)# debug platform internal tah elam asic 0

S1_Leaf4(TAH-elam)#  trigger init asic 0 slice 1 in-select 7 out-select 0 use-src-id  8

Slot 1: param values: asic 0, slice 1, lu-a2d 1, in-select 7, out-select 0, src_id 8

S1_Leaf4(TAH-elam-insel7)# set inner ipv4 src_ip 192.168.100.103

S1_Leaf4(TAH-elam-insel7)# start

S1_Leaf4(TAH-elam-insel7)#  report

ELAM not triggered yet on slot - 1, asic - 0, slice - 1

S1_Leaf4(TAH-elam-insel7)#

De conclusie van de ELAM output is het blad voorwaartse verkeer aan de externe router, maar er is geen reactie van de externe router. Controleer daarom met het externe routerteam of de ICMP-respons correct is.