Inhoud

Inleiding

Probleem

Oplossing

Gerelateerde Cisco Support Community-discussies

Inleiding

Het doel van dit document is om te tonen hoe u ingangsbuffers op Cisco Nexus 7000 (N7k) Cisco Nexus 7000 48-poorts 1 en 10 Gigabit Ethernet F2-Series module (F2) en Cisco Nexus 7000 F2-Series 48-poorts glasvezel 1 en 10 Gigabit Ethernet-module (F2 e) lijnkaarten voor Virtual Line 3 (VL3).

Ook ziet u de hoeveelheid ingress buffering capaciteit die u voor VL3 krijgt na wijziging van deze waarden.

Probleem

Wanneer u Fibre Channel over Ethernet (FCoE) multihopverbindingen tussen datacenters over afstanden van meer dan 2 kilometer gebruikt, kan dit leiden tot invoerdruppels. Standaard hebben de F2/F2e-lijnkaarten 0 pagina's in de latentiebuffer om pakketten in de rij te zetten nadat de pauze is verzonden en dit zal leiden tot invoerdruppels op lange afstand FCoE multihop interfaces.

De latentiebuffer wordt als volgt gedefinieerd:

PL_STOP - HWM (PL_Pauze) = LB (Latency Buffer)

De bovenstaande waarden worden als pagina's weergegeven. Elke pagina heeft een waarde van ongeveer 384 bytes.

Opmerking hieronder, de ingress buffercapaciteit van VL3 met het standaard FCoE QoS-beleid:

EX

module-10# show hardware internal mac port 1 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0    1107 (  425088)   1035 (  397440)     0     1107   1035    100

1       2 (     768)      1 (     384)     0        2      1      1

2       2 (     768)      1 (     384)     0        2      1      1

3    1053 (  404352)   1029 (  395136)     0     1053   1029    100

4    1107 (  425088)   1083 (  415872)     0     1107   1083    100

5     231 (   88704)    159 (   61056)     0      231    159     57

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

PL_STOP en High Water Mark (HWM) hebben dezelfde waarde. Hier ziet u dat de latentiebuffer standaard 0 pagina's heeft. Ter ondersteuning van de lange afstand FCoE zullen deze waarden moeten worden aangepast.

Oplossing

Eerst moet u de QoS-beleidskaart (Default-4q-7e-in-policy) van Quality of Service (standaard) dupliceren:

Switch(config)# qos copy policy-map type queuing ?

*** No matching command found in current mode, matching in (exec) mode ***

default-4q-7e-in-policy   Default 7-ethernet input queuing policy

default-4q-7e-out-policy  Default 7-ethernet output queuing policy

Switch(config)# qos copy policy-map type queuing default-4q-7e-in-policy prefix 7I_

Hieronder ziet u de hoeveelheid bytes die is toegewezen aan de latency buffer van VL3, nadat u het servicebeleid hebt gewijzigd.

Opmerking: U zult geen latentiebuffer zien totdat u ATLEAST 60% van de wachtrijlimiet aan het "Ndrop"-beleid toewijst.

Het beleid zal worden aangepast in stappen van 10, tot 99%

60/40 ingess buffer allocation

==============================

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 40

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 60

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     624 (  239616)    576 (  221184)     0      624    576    100

1       2 (     768)      1 (     384)     0        2      1      1

2     624 (  239616)    576 (  221184)     0      624    576    100

3    1913 (  734592)   1889 (  725376)     0     2126   1889    100

4       2 (     768)      1 (     384)     0        2      1      1

5     124 (   47616)     52 (   19968)     0      124     52     31

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

60/40 zal 81792 bytes toewijzen aan vl3 latency buffer.

PL_STOP - HWM * 384 bytes

2126 - 1913 = 213 pagina's * 384 = 81792 bytes

70/30 ingress buffer allocation

===============================

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 30

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 70

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     463 (  177792)    415 (  159360)     0      463    415    100

1       2 (     768)      1 (     384)     0        2      1      1

2     463 (  177792)    415 (  159360)     0      463    415    100

3    1987 (  763008)   1963 (  753792)     0     2484   1963    100

4       2 (     768)      1 (     384)     0        2      1      1

5      88 (   33792)     16 (    6144)     0       88     16     22

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

70/30 wijst 190848 bytes toe aan VL3 latency buffer.

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 20

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 80

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     302 (  115968)    254 (   97536)     0      302    254     75

1       2 (     768)      1 (     384)     0        2      1      1

2     302 (  115968)    254 (   97536)     0      302    254     75

3    1875 (  720000)   1851 (  710784)     0     2841   1851    100

4       2 (     768)      1 (     384)     0        2      1      1

5      52 (   19968)     46 (   17664)     0       52     46     13

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

80/20 wijst 370944 bytes toe aan VL3 latency buffer.

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 10

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 90

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     141 (   54144)     93 (   35712)     0      141     93     35

1       2 (     768)      1 (     384)     0        2      1      1

2     141 (   54144)     93 (   35712)     0      141     93     35

3    1055 (  405120)   1031 (  395904)     0     3199   1031    100

4       2 (     768)      1 (     384)     0        2      1      1

5      16 (    6144)     10 (    3840)     0       16     10      4

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

90/10 wijst 823296 bytes toe aan VL3 latency buffer

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 1

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 99

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0      15 (    5760)      9 (    3456)     0       15      9      3

1       2 (     768)      1 (     384)     0        2      1      1

2      15 (    5760)      9 (    3456)     0       15      9      3

3    1161 (  445824)   1137 (  436608)     0     3521   1137    100

4       2 (     768)      1 (     384)     0        2      1      1

5       3 (    1152)      0 (       0)     0        3      0      1

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

99/1 wijst 906240 bytes toe aan VL3 latency buffer

Opmerking: Elke klipbasis heeft 6 MB buffercapaciteit. Er zijn 4 poorten per clipper, daarom is dit gelijk aan ~1,5 MB buffercapaciteit per poort. Bij 99/1 zal u zien dat ~.9MB wordt toegewezen aan VL3 latency buffer en de rest wordt gebruikt door HWM voor elke VL (meerderheid tot VL3). Wanneer elke VLs HWM met de LB van VL3 wordt toegevoegd, wordt deze gelijk aan ~1,35 MB buffercapaciteit.