Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrondinformatie

Terminologie

Configureren

Netwerkdiagram

HSEC-licentie installeren

SVTI-tunnelbescherming

Verifiëren

IPsec-tunnel

IOSd-besturingsplane

PD-controlevlak

Problemen oplossen

IOSd

PD-controlevlak

PD-dataplane

Dataplane Packet-tracer

PDF-dataplane-debugging

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe de functie Internet Protocol Security (IPsec) op Catalyst 9300X switches moet worden geverifieerd.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- IPSEC

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- C9300X switch

- C9400X switch

- Cisco IOS® XE 17.6.4 en hoger

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Achtergrondinformatie

Vanaf Cisco IOS® XE 17.5.1 ondersteunen Catalyst 9300-X Series-switches IPsec. IPsec biedt een hoge mate van beveiliging door middel van encryptie en verificatie en beschermt gegevens tegen toegang door onbevoegden. De IPsec-implementatie op de C9300X biedt beveiligde tunnels tussen twee peers met behulp van de sVTI-configuratie (Static Virtual Tunnel Interface).

IPsec-ondersteuning op de Catalyst 9400-X Series switches is geïntroduceerd in Cisco IOS® XE 17.10.1 terwijl ondersteuning voor Catalyst 9500-X is gepland voor 17.12.1.

Terminologie

IOSd

IOS daemon

Dit is de Cisco IOS-daemon die op de Linux-kernel draait. Het wordt uitgevoerd als een softwareproces binnen de kernel.IOSdprocessing CLI commando's en protocollen die status en configuratie opbouwen.

PD

Platform-afhankelijk

Gegevens en opdrachten die specifiek zijn voor het platform waarop ze worden uitgevoerd

IPSEC

Internet Protocol Security Appliance

Een beveiligde netwerkprotocolreeks die spackets met gegevens verifieert en versleutelt om beveiligde versleutelde communicatie tussen twee computers te bieden via een Internet Protocol-netwerk.

SVTI

Statische virtuele tunnelinterface

Een statisch geconfigureerde virtuele interface waarop u beveiligingsfuncties kunt toepassen

SA

Security associatie

Een SA is een relatie tussen twee of meer entiteiten die beschrijft hoe de entiteiten beveiligingsdiensten gebruiken om veilig te communiceren

FED

Forwarding Engine Driver

De switch die verantwoordelijk is voor hardwareprogrammering van UADP ASIC

Configureren

Netwerkdiagram

In dit voorbeeld functioneren de Catalyst 9300X en ASR 1001-X als IPsec-peers met IPsec virtuele tunnelinterfaces.

HSEC-licentie installeren

Schakel de functie IPsec op het Catalyst 9300X platform in en u hebt een HSEC-licentie (C9000-HSEC) nodig. Dit verschilt van andere op Cisco IOS XE gebaseerde routerplatforms die IPsec ondersteunen, waar een HSEC-licentie alleen nodig is om de toegestane doorvoersnelheid voor encryptie te verhogen. Op het Catalyst 9300X-platform worden de CLI voor tunnelmodus en tunnelbescherming geblokkeerd als er geen HSEC-licentie is geïnstalleerd:

C9300X(config)#int tunnel1

C9300X(config-if)#tunnel mode ipsec ipv4

%'tunnel mode' change not allowed

*Sep 19 20:54:41.068: %PLATFORM_IPSEC_HSEC-3-INVALID_HSEC: HSEC license not present: IPSec mode configuration is rejected

Installeer de HSEC-licentie wanneer de switch is verbonden met CSM of CSLU met behulp van Smart Licensing:

C9300X#license smart authorization request add hseck9 local

*Oct 12 20:01:36.680: %SMART_LIC-6-AUTHORIZATION_INSTALL_SUCCESS: A new licensing authorization code was successfully installed on PID:C9300X-24Y,SN:FOC2522L1W7

Controleer of de HSEC-licentie correct is geïnstalleerd:

C9300X#show license summ

Account Information:

Smart Account: Cisco Systems, TAC As of Oct 13 15:50:35 2022 UTC

Virtual Account: CORE TAC

License Usage:

License                 Entitlement Tag               Count Status

-----------------------------------------------------------------------------

network-advantage       (C9300X-12Y Network Adv...)       1 IN USE

dna-advantage           (C9300X-12Y DNA Advantage)        1 IN USE

C9K HSEC                (Cat9K HSEC)                      0 NOT IN USE

Schakel IPsec als tunnelmodus in op de tunnelinterface:

C9300X(config)#int tunnel1

C9300X(config-if)#tunnel mode ipsec ipv4

C9300X(config-if)#end

Als IPsec is ingeschakeld, wordt de HSEC-licentie IN GEBRUIK

C9300X#show license summ

Account Information:

Smart Account: Cisco Systems, TAC As of Oct 13 15:50:35 2022 UTC

Virtual Account: CORE TAC

License Usage:

License                 Entitlement Tag               Count Status

-----------------------------------------------------------------------------

network-advantage       (C9300X-12Y Network Adv...)       1 IN USE

dna-advantage           (C9300X-12Y DNA Advantage)        1 IN USE

C9K HSEC                (Cat9K HSEC)                      1 IN USE

SVTI-tunnelbescherming

IPsec-configuratie op de C9300X maakt gebruik van de standaard Cisco IOS XE IPsec-configuratie. Dit is een eenvoudige SVTI-configuratie met IKEv2 slimme standaardwaarden, waarbij we het standaard IKEv2-beleid, IKEv2-voorstel, IPsec-transformatie en IPsec-profiel voor IKEv2 gebruiken.

C9300X configuratie

ip routing

!

crypto ikev2 profile default

match identity remote address 192.0.2.2 255.255.255.255

authentication remote pre-share key cisco123

authentication local pre-share key cisco123

!

interface Tunnel1

ip address 192.168.1.1 255.255.255.252

tunnel source 198.51.100.1

tunnel mode ipsec ipv4

tunnel destination 192.0.2.2

tunnel protection ipsec profile default

Opmerking: aangezien Catalyst 9300X in wezen een switch op de toegangslaag is, moet de IP-routing expliciet worden ingeschakeld voor de routing op basis van functies zoals VTI.

Peer-configuratie

crypto ikev2 profile default

match identity remote address 198.51.100.1 255.255.255.255

authentication remote pre-share key cisco123

authentication local pre-share key cisco123

!

interface Tunnel1

ip address 192.168.1.2 255.255.255.252

tunnel source 192.0.2.2

tunnel mode ipsec ipv4

tunnel destination 198.51.100.1

tunnel protection ipsec profile default

Raadpleeg de Configuratiehandleiding voor een meer gedetailleerde bespreking van de verschillende IKEv2- en IPsec-configuraties C9300X IPsec.

Verifiëren

IPsec-tunnel

IPsec-implementatie op het C9300X-platform is architectonisch anders dan op de routingplatforms (ASR 1000, ISR 4000, Catalyst 8200/8300, enzovoort), waar de IPsec-functieverwerking wordt geïmplementeerd in de QFP-microcode (Quantum Flow Processor).

De C9300X Forwarding-architectuur is gebaseerd op de UADP ASIC, dus de meeste QFP-functie FIA-implementatie is hier niet van toepassing.

Hier zijn enkele van de belangrijkste verschillen:

- tonen crypto ipsec als peer x.x.x.x platform niet de platform programmering informatie van de FMAN tot QFP.

- Packet-trace werkt ook niet (meer hierover hieronder).

- UADP ASIC ondersteunt crypto traffic classificatie niet, dus toon crypto ruleset platform niet van toepassing

IOSd-besturingsplane

IPsec-besturingsplane verificatie is precies hetzelfde als die voor de routeringsplatforms, zie . Zo toont u de IPsec SPA die in IOS is geïnstalleerd:

C9300X#show crypto ipsec sa

interface: Tunnel1

Crypto map tag: Tunnel1-head-0, local addr 198.51.100.1

protected vrf: (none)

local  ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer 192.0.2.2 port 500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 200, #pkts encrypt: 200, #pkts digest: 200

#pkts decaps: 200, #pkts decrypt: 200, #pkts verify: 200

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 198.51.100.1, remote crypto endpt.: 192.0.2.2

plaintext mtu 1438, path mtu 1500, ip mtu 1500, ip mtu idb TwentyFiveGigE1/0/1

current outbound spi: 0x42709657(1114674775)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0x4FE26715(1340237589)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2098, flow_id: CAT9K:98, sibling_flags FFFFFFFF80000048, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (26/1605)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x42709657(1114674775)

transform: esp-aes esp-sha-hmac ,

in use settings ={Tunnel, }

conn id: 2097, flow_id: CAT9K:97, sibling_flags FFFFFFFF80000048, crypto map: Tunnel1-head-0

sa timing: remaining key lifetime (k/sec): (32/1605)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

Let op de flow_id in de output, dit moet overeenkomen met de flow id geïnstalleerd in het voorwaartse vlak.

PD-controlevlak

Statistieken tussen IOSd en PD besturingsplane

C9300X#show platfor software ipsec policy statistics

PAL CMD    REQUEST   REPLY OK  REPLY ERR      ABORT

SADB_INIT_START          3          3          0          0

SADB_INIT_COMPLETED          3          3          0          0

SADB_DELETE          2          2          0          0

SADB_ATTR_UPDATE          4          4          0          0

SADB_INTF_ATTACH          3          3          0          0

SADB_INTF_UPDATE          0          0          0          0

SADB_INTF_DETACH          2          2          0          0

ACL_INSERT          4          4          0          0

ACL_MODIFY          0          0          0          0

ACL_DELETE          3          3          0          0

PEER_INSERT          7          7          0          0

PEER_DELETE          6          6          0          0

SPI_INSERT         39         37          2          0

SPI_DELETE         36         36          0          0

CFLOW_INSERT          5          5          0          0

CFLOW_MODIFY         33         33          0          0

CFLOW_DELETE          4          4          0          0

IPSEC_SA_DELETE         76         76          0          0

TBAR_CREATE          0          0          0          0

TBAR_UPDATE          0          0          0          0

TBAR_REMOVE          0          0          0          0

0          0          0          0

PAL NOTIFY    RECEIVE   COMPLETE   PROC ERR     IGNORE

NOTIFY_RP          0          0          0          0

SA_DEAD          0          0          0          0

SA_SOFT_LIFE         46         46          0          0

IDLE_TIMER          0          0          0          0

DPD_TIMER          0          0          0          0

INVALID_SPI          0          0          0          0

0          5          0          0

VTI SADB          0         33          0          0

TP SADB          0         40          0          0

IPSec PAL database summary:

DB NAME    ENT ADD    ENT DEL      ABORT

PAL_SADB          3          2          0

PAL_SADB_ID          3          2          0

PAL_INTF          3          2          0

PAL_SA_ID         76         74          0

PAL_ACL          0          0          0

PAL_PEER          7          6          0

PAL_SPI         39         38          0

PAL_CFLOW          5          4          0

PAL_TBAR          0          0          0

SADB-objecttabel

C9300X#show plat software ipsec switch active f0 sadb all

IPsec SADB object table:

SADB-ID     Hint         Complete    #RefCnt     #CfgCnt     #ACL-Ref

-----------------------------------------------------------------------

3           vir-tun-int  true        2           0           0

SADB-vermelding

C9300X#show plat software ipsec switch active f0 sadb identifier 3

=========== SADB id: 3

hint: vir-tun-int

completed: true

reference count: 2

configure count: 0

ACL reference: 0

SeqNo (Static/Dynamic)         ACL id

-----------------------------------------

IPsec-stroominformatie

C9300X#show plat software ipsec switch active f0 flow all

=========== Flow id: 97

mode: tunnel

direction: outbound

protocol: esp

SPI: 0x42709657

local IP addr: 198.51.100.1

remote IP addr: 192.0.2.2

crypto map id: 0

SPD id: 3

cpp SPD id: 0

ACE line number: 0

QFP SA handle: INVALID

crypto device id: 0

IOS XE interface id: 65

interface name: Tunnel1

use path MTU: FALSE

object state: active

object bind state: new

=========== Flow id: 98

mode: tunnel

direction: inbound

protocol: esp

SPI: 0x4fe26715

local IP addr: 198.51.100.1

remote IP addr: 192.0.2.2

crypto map id: 0

SPD id: 3

cpp SPD id: 0

ACE line number: 0

QFP SA handle: INVALID

crypto device id: 0

IOS XE interface id: 65

interface name: Tunnel1

object state: active

Problemen oplossen

IOSd

Deze debug- en show-opdrachten worden vaak verzameld:

show crypto eli all

show crypto socket

show crypto map

show crypto ikev2 sa detail

show crypto ipsec sa

show crypto ipsec internal

debug crypto ikev2

debug crypto ikev2 error

debug crypto ikev2 packet

debug crypto ipsec

debug crypto ipsec error

debug crypto kmi

debug crypto socket

debug tunnel protection

PD-controlevlak

Gebruik de eerder getoonde verificatiestappen om de werking van het PD-besturingsplane te verifiëren. Om eventuele problemen met betrekking tot het PD-besturingsplane op te sporen, kunt u PDF-besturingsplane debugs inschakelen:

1. Verhoog het bloglogniveau naar breedsprakig:

C9300X#set platform software trace forwarding-manager switch active f0 ipsec verbose

C9300X#show platform software trace level forwarding-manager switch active f0 | in ipsec

ipsec                           Verbose

2. Schakel voorwaardelijke debugging van PDF-besturingsplane in:

C9300X#debug platform condition feature ipsec controlplane submode level verbose

C9300X#show platform conditions

Conditional Debug Global State: Stop

Feature      Type           Submode                                                               Level

------------|-------------|----------------------------------------------------------------------|----------

IPSEC         controlplane  N/A                                                                   verbose

3. Verzamel de debug uitvoer van fman_fp btrace uitvoer:

C9300X#show logging process fman_fp module ipsec internal

Logging display requested on 2022/10/19 20:57:52 (UTC) for Hostname: [C9300X], Model: [C9300X-24Y], Version: [17.07.01], SN: [FOC251531YZ], MD_SN: [FOC2522L1W7]

Displaying logs from the last 0 days, 0 hours, 10 minutes, 0 seconds

executing cmd on chassis 1 ...

Unified Decoder Library Init .. DONE

Found 1 UTF Streams

2022/10/19 20:50:36.686071658 {fman_fp_F0-0}{1}: [ipsec] [22441]: (ERR): IPSEC-PAL-IB-Key::

2022/10/19 20:50:36.686073648 {fman_fp_F0-0}{1}: [ipsec] [22441]: (ERR): IPSEC-b0 d0 31 04 85 36 a6 08 8c 22 d2 37 b4 63 20 b9 6e 71 aa 0a 4b 26 25 56 6c 62 45 b7 31 a1 9f 3b eb 82 e8 61 ...

PD-dataplane

Controleer de IPsec-tunnelstatistieken van het dataplane, inclusief veelvoorkomende IPsec-druppels zoals HMAC- of replay-fouten

C9300X#show platform software fed sw active ipsec counters if-id all

########################################

Flow Stats for if-id 0x41

########################################

-----------------------------------

Inbound Flow Info for flow id: 98

------------------------------

SA Index: 1

--------------------

Asic Instance 0: SA Stats

Packet Format Check Error: 0

Invalid SA: 0

Auth Fail: 0

Sequence Number Overflows: 0

Anti-Replay Fail: 0

Packet Count: 200

Byte Count: 27600

-----------------------------------

Outbound Flow Info for flow id: 97

------------------------------

SA Index: 1025

--------------------

Asic Instance 0: SA Stats

Packet Format Check Error: 0

Invalid SA: 0

Auth Fail: 0

Sequence Number Overflows: 0

Anti-Replay Fail: 0

Packet Count: 200

Byte Count: 33600

Opmerking: de stroom-id komt overeen met de stroom-id in de show crypto ipsec als uitvoer. Individuele stroomstatistieken kunnen ook worden verkregen met de opdracht toon platformsoftware gevoede switch actieve ipsec tellers als <sa_id> waar de sa_id de SA Index in de vorige output.

Dataplane Packet-tracer

Packet-tracer op het UADP ASIC-platform gedraagt zich heel anders dan op het QFP-gebaseerde systeem. Het kan worden ingeschakeld met een handmatige trigger of een PCAP-gebaseerde trigger. Hier is een voorbeeld van het gebruik van PCAP (EPC) gebaseerde trigger.

1. Schakel EPC in en start opname:

C9300X#monitor capture test interface twentyFiveGigE 1/0/2 in match ipv4 10.1.1.2/32 any

C9300X#show monitor capture test

Status Information for Capture test

Target Type:

Interface: TwentyFiveGigE1/0/2, Direction: IN

Status : Inactive

Filter Details:

IPv4

Source IP:  10.1.1.2/32

Destination IP:  any

Protocol: any

Buffer Details:

Buffer Type: LINEAR (default)

Buffer Size (in MB): 10

File Details:

File not associated

Limit Details:

Number of Packets to capture: 0 (no limit)

Packet Capture duration: 0 (no limit)

Packet Size to capture: 0 (no limit)

Maximum number of packets to capture per second: 1000

Packet sampling rate: 0 (no sampling)

2. Draai de rest en stop de opname:

C9300X#monitor capture test start

Started capture point : test

*Oct 18 18:34:09.656: %BUFCAP-6-ENABLE: Capture Point test enabled.

<run traffic test>

C9300X#monitor capture test stop

Capture statistics collected at software:

Capture duration - 23 seconds

Packets received - 5

Packets dropped - 0

Packets oversized - 0

Bytes dropped in asic - 0

Capture buffer will exists till exported or cleared

Stopped capture point : test

3. Exporteer de opname in de flitser

C9300X#show monitor capture test buff

*Oct 18 18:34:33.569: %BUFCAP-6-DISABLE

Starting the packet display ........ Press Ctrl + Shift + 6 to exit

1   0.000000     10.1.1.2 -> 10.2.1.2     ICMP 114 Echo (ping) request  id=0x0003, seq=0/0, ttl=255

2   0.000607     10.1.1.2 -> 10.2.1.2     ICMP 114 Echo (ping) request  id=0x0003, seq=1/256, ttl=255

3   0.001191     10.1.1.2 -> 10.2.1.2     ICMP 114 Echo (ping) request  id=0x0003, seq=2/512, ttl=255

4   0.001760     10.1.1.2 -> 10.2.1.2     ICMP 114 Echo (ping) request  id=0x0003, seq=3/768, ttl=255

5   0.002336     10.1.1.2 -> 10.2.1.2     ICMP 114 Echo (ping) request  id=0x0003, seq=4/1024, ttl=255

C9300X#monitor capture test export location flash:test.pcap

4. Start pakkettracer:

C9300X#show platform hardware fed switch 1 forward interface TwentyFiveGigE 1/0/2 pcap flash:test.pcap number 1

Show forward is running in the background. After completion, syslog will be generated.

C9300X#

*Oct 18 18:36:56.288: %SHFWD-6-PACKET_TRACE_DONE: Switch 1 F0/0: fed: Packet Trace Complete:  Execute (show platform hardware fed switch <> forward last summary|detail)

*Oct 18 18:36:56.288: %SHFWD-6-PACKET_TRACE_FLOW_ID: Switch 1 F0/0: fed: Packet Trace Flow id is 131077

C9300X#

C9300X#show plat hardware fed switch 1 forward last summary

Input Packet Details:

###[ Ethernet ]###

dst       = b0:8b:d0:8d:6b:d6

src=78:ba:f9:ab:a7:03

type      = 0x800

###[ IP ]###

version   = 4

ihl       = 5

tos       = 0x0

len       = 100

id        = 15

flags     =

frag      = 0

ttl       = 255

proto     = icmp

chksum    = 0xa583

src=10.1.1.2

dst       = 10.2.1.2

options   = ''

###[ ICMP ]###

type      = echo-request

code      = 0

chksum    = 0xae17

id        = 0x3

seq       = 0x0

###[ Raw ]###

load      = '00 00 00 00 01 1B CF 14 AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD AB CD'

Ingress:

Port                      : TwentyFiveGigE1/0/2

Global Port Number        : 2

Local Port Number         : 2

Asic Port Number          : 1

Asic Instance             : 1

Vlan                      : 4095

Mapped Vlan ID            : 1

STP Instance              : 1

BlockForward              : 0

BlockLearn                : 0

L3 Interface              : 38

IPv4 Routing          : enabled

IPv6 Routing          : enabled

Vrf Id                : 0

Adjacency:

Station Index         : 179

Destination Index     : 20754

Rewrite Index         : 24

Replication Bit Map   : 0x1    ['remoteData']

Decision:

Destination Index     : 20754  [DI_RCP_PORT3]

Rewrite Index         : 24

Dest Mod Index        : 0      [IGR_FIXED_DMI_NULL_VALUE]

CPU Map Index         : 0      [CMI_NULL]

Forwarding Mode       : 3      [Other or Tunnel]

Replication Bit Map   :        ['remoteData']

Winner                :        L3FWDIPV4 LOOKUP

Qos Label             : 1

SGT                   : 0

DGTID                 : 0

Egress:

Possible Replication      :

Port                  : RCP

Asic Instance         : 0

Asic Port Number      : 0

Output Port Data          :

Port                    : RCP

Asic Instance         : 0

Asic Port Number      : 90

Unique RI             : 0

Rewrite Type          : 0      [Unknown]

Mapped Rewrite Type   : 229    [IPSEC_TUNNEL_MODE_ENCAP_FIRSTPASS_OUTERV4_INNERV4]

Vlan                  : 0

Mapped Vlan ID        : 0

RCP, mappedRii.fdMuxProfileSet = 1 , get fdMuxProfile from MappedRii

Qos Label             : 1

SGT                   : 0

********************************************************************************

Input Packet Details:

N/A: Recirculated Packet

Ingress:

Port                      : Recirculation Port

Asic Port Number          : 90

Asic Instance             : 0

Vlan                      : 0

Mapped Vlan ID            : 2

STP Instance              : 0

BlockForward              : 0

BlockLearn                : 0

L3 Interface              : 38

IPv4 Routing          : enabled

IPv6 Routing          : enabled

Vrf Id                : 0

Adjacency:

Station Index         : 177

Destination Index     : 21304

Rewrite Index         : 21

Replication Bit Map   : 0x1    ['remoteData']

Decision:

Destination Index     : 21304

Rewrite Index         : 21

Dest Mod Index        : 0      [IGR_FIXED_DMI_NULL_VALUE]

CPU Map Index         : 0      [CMI_NULL]

Forwarding Mode       : 3      [Other or Tunnel]

Replication Bit Map   :        ['remoteData']

Winner                :        L3FWDIPV4 LOOKUP

Qos Label             : 1

SGT                   : 0

DGTID                 : 0

Egress:

Possible Replication      :

Port                  : TwentyFiveGigE1/0/1

Output Port Data          :

Port                    : TwentyFiveGigE1/0/1

Global Port Number    : 1

Local Port Number     : 1

Asic Port Number      : 0

Asic Instance         : 1

Unique RI             : 0

Rewrite Type          : 0      [Unknown]

Mapped Rewrite Type   : 13     [L3_UNICAST_IPV4_PARTIAL]

Vlan                  : 0

Mapped Vlan ID        : 0

Output Packet Details:

Port                      : TwentyFiveGigE1/0/1

###[ Ethernet ]###

dst       = 00:62:ec:da:e0:02

src=b0:8b:d0:8d:6b:e4

type      = 0x800

###[ IP ]###

version   = 4

ihl       = 5

tos       = 0x0

len       = 168

id        = 2114

flags     = DF

frag      = 0

ttl       = 254

proto     = ipv6_crypt

chksum    = 0x45db

src=198.51.100.1

dst       = 192.0.2.2

options   = ''

###[ Raw ]###        load      = '6D 18 45 C9 00 00 00 06 09 B0 DC 13 11 FA DC F8 63 98 51 98 33 11 9C C0 D7 24 BF C2 1C 45 D3 1B 91 0B 5F B4 3A C0 AD 18 1A 9C 34 32 19 67 D9 EE 30 F4 CE 6B B9 E7 E5 41 33 E7 97 86 68 14 C0 4D 86 49 88 E7 3A 7E 3E E3 5C C7 CE C9 C4 C8 FC 41 33 43 DD 9B F8 E1 0F A6 71 C3 69 A9 51 1F 98 0D FE EF 58 18 31 0C 77 00 34 3D 81 92 A9 05 12 05 43 0E 9E 11 03 68 83 78 EC D1 C0 06 7A 34 54 8D 82 83 BA 60 58 1A FB 3A BA 1A 9F CF 44 12 CD 5D 4A D4 8E 10'

********************************************************************************

C9300X#show crypto ipsec sa | in current outbound

current outbound spi: 0x6D1845C9(1830307273)     <-- Matches the load result in packet trace

Opmerking: in de vorige uitvoer is het pakket doorgestuurde uitgang het ESP-pakket met de huidige uitgaande SA SPI. Voor een gedetailleerdere FED-beleidsanalyse, de detailvariant van hetzelfde commando. Voorbeeld: toon plat hardware gevoed switch 1 voorwaartse laatste detail kan worden gebruikt.

PDF-dataplane-debugging

Opmerking: PDF-dataplane debugging dient alleen mogelijk te zijn met ondersteuning van TAC. Dit zijn zeer lage sporen die de techniek nodig heeft als het probleem niet kan worden geïdentificeerd via normale CLI's/Debugs.

C9300X#set platform software trace fed switch active ipsec verbose

C9300X#debug platform condition feature ipsec dataplane submode all level verbose

C9300X#show logging process fed module ipsec internal

IPsec PD/SHIM-debugs

debug platform software ipsec info

debug platform software ipsec error

debug platform software ipsec verbose

debug platform software ipsec all

Gerelateerde informatie

- IPsec op Catalyst 9300 Switches configureren