Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Verwante producten

Achtergrondinformatie

Video

Installatie vooraf

Beperkingen

Installatiestappen

Verificatie

Bandbreedtetests

Netwerkdiagram

Methode 1: Switch als client

Methode 2: PC als client

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe u iPerf op Catalyst 9000 Series switches kunt gebruiken om bandbreedtetests uit te voeren.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Application Hosting op Catalyst 9000 Series switches

- Linux

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- C9300

- Cisco IOS® XE 17.3.5

- Cisco IOS® XE 17.6.4

Opmerking: raadpleeg de juiste configuratiehandleiding voor de opdrachten die worden gebruikt om deze functies op andere Cisco-platforms in te schakelen.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Verwante producten

Dit document kan ook worden gebruikt voor de volgende hardware- en softwareversies:

- C9300X switch

- C9400

Achtergrondinformatie

iPerf3 is een tool voor actieve metingen van de maximaal haalbare bandbreedte op IP-netwerken. iPerf gebruikt de verschillende capaciteiten van TCP en UDP om statistieken over bandbreedte te leveren.

Opmerking: raadpleeg de officiële documentatie van iPerf voor meer informatie over deze tool.

Video

Installatie vooraf

Beperkingen

- Toepassingshosting is niet bewust van virtuele routing en doorsturen (VRF-bewust).

- In releases voorafgaand aan Cisco IOS® XE Amsterdam 17.3.3, vereist applicatiehosting specifieke opslagtoewijzingen en is uitgeschakeld op de bootflash.

- In Cisco IOS® XE Amsterdam 17.3.3 en latere releases, is het hosten van toepassingen ingeschakeld op de bootflash, maar alleen door Cisco ondertekende toepassingen worden gehost.

- De USB-stick (Universal Serial Bus) aan het voorpaneel wordt niet ondersteund.

- Cisco Catalyst 9300 Series Switches ondersteunen alleen backpanel Cisco-gecertificeerde USB.

- Cisco Catalyst 9500-X Series-Switches met hoge prestaties en Cisco Catalyst 9600 Series-Switches ondersteunen geen USB-poorten op het voorpaneel voor toepassingshosting.

- Cisco Catalyst 9500 en 9500 Series Switches met hoogwaardige services en Cisco Catalyst 9600 Series Switches ondersteunen AppGigabit Ethernet-interfaces niet.

- Cisco Catalyst 9410R Switches ondersteunen het hosten van toepassingen niet voordat Cisco IOS® XE Bengaluru 17.5.1 is gestart.

- Configureer de opdracht Enable op de AppGigabit Ethernet-interfaces om het hosten van toepassingen op Cisco Catalyst 9410R-Switches mogelijk te maken.

Installatiestappen

1. Download de nieuwste iPerf-afbeelding en controleer of deze is opgeslagen in de USB SSD:

C9300-AC1#dir usbflash1:/

Directory of usbflash1:/

12      -rw-          6043136  Jan 26 2023 21:55:35 +00:00  iPerf.tar

2. Kies een VLAN of configureer een nieuwe voor iPerf-connectiviteit:

C9300-AC1(config)#interface vlan 10

C9300-AC1(config-if)#ip add 192.168.10.11 255.255.255.0

3. De AppGigabit Ethernet-interface configureren:

C9300-AC1(config)#int Ap1/0/1

C9300-AC1(config-if)#switchport mode trunk

4. Configureer de iPerf-docker en koppel deze aan een VLAN:

C9300-AC1(config)#app-hosting appid iPerf

C9300-AC1(config-app-hosting)#app-vnic AppGigabitEthernet trunk

C9300-AC1(config-config-app-hosting-trunk)#vlan 10 guest-interface 0

C9300-AC1(config-config-app-hosting-vlan-access-ip)#guest-ipaddress 192.168.10.21 netmask 255.255.255.0

5. Configureer als standaardgateway voor de toepassing het IP-adres van de SVI die u hebt gekozen voor iPerf-connectiviteit:

C9300-AC1(config)#app-hosting appid iPerf

C9300-AC1(config-app-hosting)#app-default-gateway 192.168.10.11 guest-int

6. Start de IOX-service en controleer of deze status heeft running in show iox-service geprivilegieerde EXEC-opdracht:

C9300-AC1(config)#iox C9300-AC1(config)#do show iox-service IOx Infrastructure Summary: --------------------------- IOx service (CAF) : Running IOx service (HA) : Running IOx service (IOxman) : Not Ready IOx service (Sec storage) : Not Running Libvirtd 5.5.0 : Running Dockerd 18.03.0 : Running Sync Status : Disabled

7. Installeer de iPerf-toepassing vanaf SSD en controleer of deze is geïmplementeerd:

C9300-AC1#app-hosting install appid iPerf package usbflash1:iPerf.tar Installing package 'usbflash1:iPerf.tar' for 'iPerf'. Use 'show app-hosting list' for progress. C9300-AC1#show app-hosting list App id State --------------------------------------------------------- iPerf DEPLOYED

8. iPerf-toepassing activeren en starten:

C9300-AC1#app-hosting activate appid iPerf iPerf activated successfully Current state is: ACTIVATED C9300-AC1#show app-hosting list App id State --------------------------------------------------------- iPerf ACTIVATED C9300-AC1#app-hosting start appid iPerf iPerf started successfully Current state is: RUNNING C9300-AC1# C9300-AC1#show app-hosting list App id State --------------------------------------------------------- iPerf RUNNING

Opmerking: Als Perf eenmaal in de runningstaat is, wordt hij standaard als server uitgevoerd.

Verificatie

Om toepassingsdetails te verifiëren, kunt u bevoorrechte EXEC bevel gebruikenshow app-hosting utilization appid [app-name]:

C9300-AC1#show app-hosting detail appid iPerf App id : iPerf Owner : iox State : RUNNING Application Type : docker Name : mlabbe/iperf3 Version : latest Description : Author : Path : usbflash1:iPerf.tar URL Path : Activated profile name : default Resource reservation Memory : 409 MB Disk : 10 MB CPU : 1480 units CPU-percent : 20 % VCPU : 1 Platform resource profiles Profile Name CPU(unit) Memory(MB) Disk(MB) -------------------------------------------------------------- Attached devices Type Name Alias --------------------------------------------- serial/shell iox_console_shell serial0 serial/aux iox_console_aux serial1 serial/syslog iox_syslog serial2 serial/trace iox_trace serial3 Network interfaces --------------------------------------- eth0: MAC address : 52:54:dd:d2:df:af IPv4 address : 192.168.10.21 IPv6 address : :: Network name : mgmt-bridge-v10 Docker ------ Run-time information Command : Entry-point : iperf3 -s Run options in use : Package run options : Application health information Status : 0 Last probe error : Last probe output :

Om toepassingsgebruik te verifiëren, kunt u show app-hosting utilization appid [app-name]geprivilegieerd EXEC bevel gebruiken:

C9300-AC1# show app-hosting utilization appid iPerf Application: iPerf CPU Utilization: CPU Allocation: 1480 units CPU Used: 0.00 % CPU Cores: Memory Utilization: Memory Allocation: 409 MB Memory Used: 1064 KB Disk Utilization: Disk Allocation: 10 MB Disk Used: 0.00 MB

Om details in de toepassingscontainer te verifiëren, kunt u app-hosting connect appid [app-name] sessionbevoorrechte bevel gebruiken EXEC:

C9300-AC1#app-hosting connect appid iPerf session / $ / $ #Verify IP address assigned / $ / $ ifconfig eth0 <snip> inet addr:192.168.10.21 Bcast:0.0.0.0 Mask:255.255.255.0 <snip> / $ / $ #Verify iPerf is running as server / $ / $ ps PID USER TIME COMMAND 1 iperf 0:00 iperf3 -s 390 iperf 0:00 /bin/sh 398 iperf 0:00 ps / $

Bandbreedtetests

Netwerkdiagram

De methoden om bandbreedtetests uit te voeren die in dit document worden uitgelegd, zijn gebaseerd op het onderstaande netwerkdiagram:

Opmerking: Configuratievoorbeelden van iPerf-installatie zijn afkomstig uit dezelfde laboratoriumomgeving.

IP-adrestoewijzing voor bovenstaande apparaten:

C930-AC1 switch

C930-AC2 switch

SVI 192.168.10.11

Perf 192.168.10.21

SVI 192.168.10.12

Perf 192.168.10.22

Opmerking: alle apparaten die in deze voorbeelden worden gebruikt, bevinden zich in hetzelfde VLAN-domein, VLAN 10.

Methode 1: Switch als client

In dit voorbeeld wordt de bandbreedte van C9300-AC1 tot C9300-AC2 gemeten. C930-AC1 is de client.

1. Start de opdracht app-hosting connect appid iPerf sessionom de prompt voor de toepassingscontainer in te voeren:

C9300-AC1#app-hosting connect appid iPerf session / $

2. Zodra u in de prompt van de toepassingscontainer bent, gebruikt u de iperf3 -c opdracht om de bandbreedtetest te starten:

/ $ iperf3 -c 192.168.10.22 Connecting to host 192.168.10.22, port 5201 [ 5] local 192.168.10.21 port 34906 connected to 192.168.10.22 port 5201 [ ID] Interval Transfer Bitrate Retr Cwnd [ 5] 0.00-1.00 sec 114 MBytes 955 Mbits/sec 2 833 KBytes [ 5] 1.00-2.00 sec 113 MBytes 947 Mbits/sec 3 923 KBytes [ 5] 2.00-3.00 sec 111 MBytes 934 Mbits/sec 77 974 KBytes [ 5] 3.00-4.00 sec 113 MBytes 945 Mbits/sec 1 1.03 MBytes [ 5] 4.00-5.00 sec 112 MBytes 940 Mbits/sec 109 1.08 MBytes [ 5] 5.00-6.00 sec 111 MBytes 931 Mbits/sec 395 820 KBytes [ 5] 6.00-7.00 sec 111 MBytes 933 Mbits/sec 198 882 KBytes [ 5] 7.00-8.00 sec 112 MBytes 944 Mbits/sec 2 970 KBytes [ 5] 8.00-9.00 sec 111 MBytes 933 Mbits/sec 9 1.02 MBytes [ 5] 9.00-10.00 sec 111 MBytes 933 Mbits/sec 524 1.04 MBytes - - - - - - - - - - - - - - - - - - - - - - - - - [ ID] Interval Transfer Bitrate Retr [ 5] 0.00-10.00 sec 1.09 GBytes 940 Mbits/sec 1320 sender [ 5] 0.00-10.01 sec 1.09 GBytes 937 Mbits/sec receiver iperf Done. / $

3. Nadat de test is beëindigd, typt u exitde switch CLI (CLI) opnieuw in.

Opmerking: omdat iPerf standaard als server draait, is er geen verdere opdracht aan de serverkant nodig.

Methode 2: PC als client

In dit voorbeeld wordt de bandbreedte van Host-A naar C9300-AC2 (Perf-server) gemeten.

1. Zorg ervoor dat u iPerf hebt gedownload op uw PC.

2. Zodra u iPerf hebt opgeslagen in uw PC, navigeer naar iperf3.exe van uw opdrachtprompt:

C:\Users\user\Downloads\iperf-3.1.3-win64\iperf-3.1.3-win64>iperf3.exe

3. Kies uw PC use-c optie. Dit geeft aan dat de pc de client is:

C:\Users\user\Downloads\iperf-3.1.3-win64\iperf-3.1.3-win64>iperf3.exe -c 192.168.10.22 Connecting to host 192.168.10.22, port 5201 [ 4] local 192.168.10.2 port 56009 connected to 192.168.10.22 port 5201 [ ID] Interval Transfer Bandwidth [ 4] 0.00-1.00 sec 109 MBytes 916 Mbits/sec [ 4] 1.00-2.00 sec 0.00 Bytes 0.00 bits/sec [ 4] 2.00-3.00 sec 0.00 Bytes 0.00 bits/sec [ 4] 3.00-4.00 sec 93.6 MBytes 786 Mbits/sec [ 4] 4.00-5.00 sec 15.1 MBytes 127 Mbits/sec [ 4] 5.00-6.02 sec 0.00 Bytes 0.00 bits/sec [ 4] 6.02-7.00 sec 78.2 MBytes 666 Mbits/sec [ 4] 7.00-8.00 sec 42.9 MBytes 360 Mbits/sec [ 4] 8.00-9.00 sec 0.00 Bytes 0.00 bits/sec [ 4] 9.00-10.00 sec 49.4 MBytes 414 Mbits/sec - - - - - - - - - - - - - - - - - - - - - - - - - [ ID] Interval Transfer Bandwidth [ 4] 0.00-10.00 sec 388 MBytes 326 Mbits/sec sender [ 4] 0.00-10.00 sec 388 MBytes 326 Mbits/sec receiver iperf Done.

Tip: voor de traditionele methode moet je 2 PC's gebruiken, een als server en een als client. Gebruik de opdracht voor de pc als serveriperf3.exe -s.

Gerelateerde informatie

- Application Hosting op Cisco Catalyst 9000 Series Switches - witboek

- Configuratiehandleiding voor programmeerbaarheid, Cisco IOS® XE Bengaluru 17.6.x

- Netwerkprestatiebewaking met Catalyst 9300 applicatiehosting