Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Achtergrondinformatie

Migratieproces

Ondersteuning van hardware en software

Migratiepaden

Overzicht van migratie

stap voor stap

Gerelateerde informatie

Inleiding

Dit document bevat informatie over de procedure voor het migreren van een standalone Cisco Catalyst 6500 Series Switch naar een Cisco Catalyst 6500 Virtual Switching System.

N.B.: Dit document bevat de gebruikelijke stappen die voor de migratie vereist zijn. De exacte stappen zijn gebaseerd op de huidige configuratie van de switch en kunnen enigszins afwijken van de bovengenoemde procedure.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Kennis van VSS-concepten (Virtual Switching Systems). Raadpleeg voor meer informatie het begrip Virtual Switching Systems.

Gebruikte componenten

De informatie in dit document is gebaseerd op Cisco Catalyst 6500 Series switches met supervisor VS-S720-10G-3C/XL dat Cisco IOS GAR-softwarerelease 12.2(33)SXH1 of hoger gebruikt.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Achtergrondinformatie

Het Virtual Switching System (VSS) is een nieuwe en innovatieve optie op Cisco Catalyst 6500 Series switches die effectief clustering van twee fysieke chassis in één logische eenheid toestaan. Een dergelijke technologie maakt nieuwe verbeteringen mogelijk op alle terreinen van de bedrijfscampagne en de invoering van datacenters, waaronder hoge beschikbaarheid, schaalbaarheid/prestaties, beheer en onderhoud.

Huidige implementatie van VSS staat u toe om twee fysieke Cisco Catalyst 6500 Series switches samen te voegen in één logisch beheerde entiteit. Dit getal geeft een grafische weergave van dit concept waarbij twee 6509 chassis kunnen worden beheerd als één chassis met 18 sleuven zodra VSS is ingeschakeld:

Migratieproces

Ondersteuning van hardware en software

VSS is een software optie die alleen beschikbaar is voor Cisco Catalyst 6500 Series switches. Dit is nodig om deze functie in te schakelen en te configureren:

Hardware

VS-S720-10G-3C/XL switch

in Cisco IOS®-software

Cisco IOS-softwarerelease 12.2(33)SXH1 of hoger

Chassis ondersteund door Cisco Virtual Switching System

Modelnummer

Beschrijving

WS-C6503-E switch

E-Series chassis met 3 sleuven

WS-C6504-E switch

E-Series chassis met 4 sleuven

WS-C6506

Chassis met 6 sleuven

WS-C6506-E switch

E-Series chassis met 6 sleuven

WS-C6509

Chassis met 9 sleuven

WS-C6509-E switch

E-Series chassis met 9 sleuven

WS-C6509-NEB-A

Chassis met 9 sleuven verticaal Network Equipment Building Standards (NEBS)

WS-C6509-V-E switch

E-Series verticaal chassis met 9 sleuven

WS-C6513

Chassis met 13 sleuven

Deze tabel bevat een volledige lijst van het chassis dat wordt ondersteund met de eerste release van Cisco Virtual Switching System. Raadpleeg voor meer informatie Cisco Catalyst 6500 Series Virtual Switching System (VSS) 1440.

Migratiepaden

De tabel bevat een aantal mogelijke migratiepaden naar de VSS. Deze lijst is alleen suggestief en niet uitgebreid.

Eerste instelling

upgrade vereist

Laatste instelling

Twee Cisco Catalyst 6500 Series switches met WS-SUP720-3B supervisors.

hardware-upgrade - supervisor VS-S720-10G-3C/XL-software-upgrade - Cisco IOS 12.2(33)SXH1 of hoger

VSS

Twee Cisco Catalyst 6500 Series switches met VS-S720-10G-3C/XL toezichthouders.

Software-upgrade - Cisco IOS 12.2(33)SXH1 of hoger

VSS

Overzicht van migratie

Gemeenschappelijke configuratie in standalone omgeving

Functies of protocollen die werken tussen Layer 3 (L3) Core en L2/L3 Distributie:

- IP-routingprotocollen

- L3 poortkanalen of GelijkKost MultiPath-functie van IP-routing

Functies of protocollen die tussen L2/L3-distributie en toegangslaag lopen:

- Spanning Tree Protocol

- Eerste hop-routingprotocollen (FHRP)

- Beleid: QoS, ACL

- L2-trunks, VLAN’s, poortkanalen

Migratie naar VSS

Dit is een proces dat meerdere stappen omvat en elke stap wordt in dit gedeelte uitgelegd.

Migratiestappen tussen Core- en distributielaag:

- MultiChassis EtherChannel (MEC) configureren

- IP-routingconfiguratie wijzigen en opdrachten verwijderen, die niet meer nodig zijn

Migratiestappen tussen distributie en toegangslaag:

- MEC configureren

- Spanning Spanning Tree Protocol ingeschakeld

- FHRP-opdrachten wijzigen

- QoS- en ACL-beleid verplaatsen naar MEC (indien nodig)

- De configuratie van L2-trunks verplaatsen naar MEC

stap voor stap

Voer de volgende stappen uit:

1. In de eerste standalone instelling is het verkeer vaak belastingsgebalanceerd onder Distributie-switches die gebruik maken van het delen van VLAN-lading en de HSRP-configuratie.

2. Wijzig de HSRP- en STP-configuratie zodat Distribution-1 actief is voor alle stromen, en aangrenzende apparaten deze verandering detecteren en al het verkeer naar Distribution-1 verzenden.

3. Sluit de fysieke interfaces van Distributie-2 af, zodat deze van het netwerk worden geïsoleerd.

.

Zodra de Distribution-2 volledig uit het netwerk is verwijderd, kan deze worden geconverteerd naar VSS-modus zonder het productieverkeer te verstoren.

4. Indien niet eerder geïnstalleerd, installeer de nieuwe supervisor (VS-SUP720-10G) en controleer de status.

Distribution-2#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

5    5  Supervisor Engine 720 10GE (Active)    VS-S720-10G        SAD104707BB

9   48  CEF 720 48 port 10/100/1000mb Ethernet WS-X6748-GE-TX     SAL1020NGY3

5. Kopieer VSS compatibele Cisco IOS-software naar de sup-bootdisk:

Distribution-2#copy ftp: sup-bootdisk:

Address or name of remote host []? 172.16.85.150

Source filename []? s72033-ipservices_wan_vz.122-33.SXH1.bin

Destination filename [s72033-ipservices_wan_vz.122-33.SXH1.bin]?

Accessing ftp://172.16.85.150/s72033-ipservices_wan_vz.122-33.SXH1.bin...

6. Update de trap om Cisco IOS software te laden die naar de sup-bootdisk is gekopieerd:

Distribution-2(config)#boot system flash sup-bootdisk:s72033-ipservices_wan_vz.122-33.SXH1.bin

7. Om de switch Distribution-2 in VSS-modus te kunnen gebruiken, is een Virtual Switch Link (VSL) vereist. De huidige link van het poortkanaal tussen Distribution-1 en Distribution-2 kan worden gebruikt voor de VSL-indeling.

8. Configuratie van de eigenschappen van de Virtuele Switch:

1. Virtual Switch Domain Number (uniek binnen het netwerk)

2. Virtual Switch Number (uniek binnen het domein)

3. Virtual Switch Link (VSL)

Distribution-2(config)#hostname VSS

VSS(config)#switch virtual domain 100

VSS(config-vs-domain)#switch 1

!--- After conversion Distribution-2 will be noted !--- as Switch 1 in VSS mode.

VSS(config-vs-domain)# exit

VSS(config)#interface port-channel 1

VSS(config-if)#switch virtual link 1

VSS(config-if)#interface TenG 5/4

VSS(config-if)#channel-group 1 mode on

VSS(config-if)#interface TenG 5/5

VSS(config-if)#channel-group 1 mode on

VSS(config-if)# ^Z

VSS#

9. Converteer de Distribution-2 switch naar VSS-modus.

Opmerking: Geef deze opdracht uit via de console van de switch:

VSS#switch convert mode virtual

This command will convert all interface

names to naming convention "interface-type

switch-number/slot/port",

save the running config to startup-config and

reload the switch.

Do you want to proceed? [yes/no]: yes

Converting interface names

Building configuration...

!--- At this point the switch will reboot

!--- snippet of the console output

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 1/5/4 is member of

PortChannel 1

Interface TenGigabitEthernet 1/5/5 is member of

PortChannel 1

!--- snippet of the console output

00:00:23: %PFREDUN-6-ACTIVE: Initializing as ACTIVE

processor for this switch

!--- snippet of the console output

00:00:28: %VSL_BRINGUP-6-MODULE_UP: VSL module in slot 5

switch 1 brought up

Initializing as Virtual Switch Active

10. Controleer de conversie van de Distribution-2 switch naar VSS-modus.

VSS#show switch virtual role

Switch  Switch Status  Preempt    Priority   Role     Session ID

Number         Oper(Conf) Oper(Conf)          Local  Remote

-------------------------------------------------------------------

LOCAL    1     UP      FALSE(N)    110(110)  ACTIVE    0      0

In dual-active recovery mode: No

De switch Distribution-2 wordt met succes geconverteerd en werkt in VSS-modus. Er kunnen ook pre-configuratiestappen worden uitgevoerd na het converteren van de Distribution-1 switch. Echter, pre-configuratie helpt de hoeveelheid pakketverlies tijdens migratie te verminderen.

11. Volg deze stappen om VSS-Switch 1 vooraf te configureren:

1. Configureer MEC met de lokale interfaces van Switch-1. Interfaces van Switch-2 (momenteel distributie-1) kunnen aan MEC worden toegevoegd na conversie naar VSS-modus.

- MEC configureren

- Verplaats de interfaceconfiguratie naar MEC.

- Verplaats het QoS- en ACL-beleid naar MEC.

Eerste configuratie

interface TenGigabitEthernet1/2/1

ip address 192.168.4.2 255.255.255.0

interface GigabitEthernet1/1/2

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 10,20

Wijzigingen in configuratie

!--- MEC to Core layer

VSS(config)# int ten 1/2/1

VSS(config-if)# no ip address

VSS(config-if)# interface po20

VSS(config-if)# ip address 192.168.4.2 255.255.255.0

VSS(config-if)# no shut

VSS(config-if)# interface ten1/2/1

VSS(config-if)# channel-group 20 mode desirable

!--- MEC to Access layer

VSS(config-if)# interface po10

VSS(config-if)# switchport

VSS(config-if)# switchport trunk encapsulation dot1q

VSS(config-if)# switchport trunk allowed vlan 10,20

VSS(config-if)# no shut

VSS(config-if)# interface gig1/1/2

VSS(config-if)# switchport

VSS(config-if)# channel-group 10 mode desirable

Configuratie van aangrenzende apparaten om poortkanaal aan te passen

De verbinding tussen VSS Switch-1 en de omringende apparaten is op dit moment stilgelegd. Daarom wordt een poortkanaal geconfigureerd zonder dat het doorstroming van het verkeer door Distribution-1 belemmert.

!--- In Core layer devices

Core(config)# int gig 1/1

Core(config-if)# no ip address

Core(config-if)# int po20

Core(config-if)# ip address 192.168.4.1 255.255.255.0

Core(config-if)# no shut

Core(config-if)# int gig 1/1

Core(config-if)# channel-group 20 mode desirable

!--- In Access layer devices

Access(config)# int po10

Access(config-if)# switchport

Access(config-if)# switchport trunk encapsulation dot1q

Access(config-if)# switchport trunk

Access(config-if)# no shut

Access(config-if)# int gig 1/1

Access(config-if)# channel-group 10 mode desirable

2. In VSS, zowel actieve als standby chassis gebruikt actieve chassis gebrand in MAC adres en VLAN IP adres. HSRP is niet langer vereist.

- Verplaats de virtuele IP-adressen van HSRP naar de VLAN-interfaces.

- Verwijder de HSRP-configuratie van de VLAN-interfaces.

Eerste configuratie

interface Vlan10

ip address 10.1.1.2 255.255.255.0

standby 10 ip 10.1.1.1

standby 10 priority 110

!

interface Vlan20

ip address 20.1.1.2 255.255.255.0

standby 20 ip 20.1.1.1

standby 20 priority 110

!

Wijzigingen in configuratie

VSS(config)# interface Vlan10

VSS(config-if)# no standby 10 ip 10.1.1.1

VSS(config-if)# no standby 10 priority 110

VSS(config-if)# ip address 10.1.1.1 255.255.255.0

VSS(config-if)# interface Vlan20

VSS(config-if)# no standby 20 ip 20.1.1.1

VSS(config-if)# no standby 20 priority 110

VSS(config-if)# ip address 20.1.1.1 255.255.255.0

Opmerking: Eindapparaten zouden nog steeds hun ARP-items richten op het oorspronkelijke HSRP MAC-adres. Totdat deze inzendingen tijd uit of een ander ARP wordt verzonden om hun cache bij te werken, is er enig aansluitingsverlies.

3. Schakel de NSF-SSO-functie in voor de IP routingprotocollen die worden gebruikt. VSS vereenvoudigt de routingconfiguratie, zodat sommige netwerkverklaringen niet meer nodig zijn. Daarom kunnen zij worden geschrapt.

VSS Switch-1

VSS#show running-config | begin ospf

router ospf 1

log-adjacency-changes

network 10.1.1.0 0.0.0.255 area 0

network 20.1.1.0 0.0.0.255 area 0

network 192.168.4.0 0.0.0.255 area 0

network 192.168.5.0 0.0.0.255 area 0

!--- rest of output elided

!--- Previous L3 interfaces are merged as MEC, hence some routing statements are no longer required.

VSS(config)# router ospf 1

VSS(config-router)# nsf

VSS(config-router)# no network 192.168.5.0 0.0.0.255 area 0

kern

Core#show running-config | begin ospf

router ospf 1

log-adjacency-changes

network 192.168.4.0 0.0.0.255 area 0

network 192.168.5.0 0.0.0.255 area 0

!--- rest of output elided

!--- Previous L3 interfaces are merged as MEC, hence some routing statements are no longer required.

Core(config)# router ospf 1

Core(config-router)# nsf

Core(config-router)# no network 192.168.5.0 0.0.0.255 area 0

4. Wijzig de STP-configuratie zodat VSS Switch-1 de basis voor alle VLAN’s wordt.

12. Controleer de configuratie en connectiviteit van VSS Switch-1.

- Schakel VSS Switch-1 interfaces in.

- Controleer L2 connectiviteit aan de apparaten van de toegangslaag.

- Controleer L3 connectiviteit op de apparaten van de Kernlaag.

13. Nadat de connectiviteit van VSS Switch-1 wordt geverifieerd, sluit de interfaces van Distributie-1 om het verkeer aan VSS te switches.

14. Herhaal de conversiestappen op de Distribution-1 switch om dit in de voorkeursmodus VSS-stand te brengen.

Distribution-1(config)#hostname VSS

VSS(config)#switch virtual domain 100

VSS(config-vs-domain)#switch 2

!--- After conversion Distribution-1 will be noted !--- as Switch 2 in VSS mode.

VSS(config-vs-domain)# exit

VSS(config)#interface port-channel 2

VSS(config-if)#switch virtual link 2

VSS(config-if)#interface TenG 5/4

VSS(config-if)#channel-group 2 mode on

VSS(config-if)#interface TenG 5/5

VSS(config-if)#channel-group 2 mode on

VSS(config-if)# ^Z

VSS#

VSS#switch convert mode virtual

This command will convert all interface

names to naming convention "interface-type

switch-number/slot/port",

save the running config to startup-config and

reload the switch.

Do you want to proceed? [yes/no]: yes

Converting interface names

Building configuration...

!--- At this point the switch will reboot

!--- snippet of the console output

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 2/5/4 is member of

PortChannel 2

Interface TenGigabitEthernet 2/5/5 is member of

PortChannel 2

!--- snippet of the console output

00:00:23: %PFREDUN-6-ACTIVE: Initializing as ACTIVE

processor for this switch

!--- snippet of the console output

00:00:28: %VSL_BRINGUP-6-MODULE_UP: VSL module in slot 5

switch 2 brought up

Initializing as Virtual Switch Standby

15. Nadat de VSS standby switch is opgestart, wordt de actieve configuratie van VSS automatisch gesynchroniseerd in VSS standby. Na het opstarten zijn de interfaces van VSS standby (Switch-2) in shutdown toestand.

16. De configuratie van de virtuele switch voltooien.

Opmerking: deze laatste, kritieke stap is alleen van toepassing voor een eerste conversie. Als de switch al geconverteerd of gedeeltelijk geconverteerd is, kunt u deze opdracht niet gebruiken. Er wordt een foutbericht gegenereerd als de switch is geconverteerd of gedeeltelijk geconverteerd:

11:27:30: %PM-SP-4-ERR_DISABLE: channel-misconfig error detected

on Po110, putting Gi9/2 in err-disable state

U kunt deze opdracht uitgeven om automatisch de stand-by configuratie van de virtuele switch op de actieve virtuele switch te configureren:

VSS#switch accept mode virtual

This command will bring in all VSL configurations from the standby

switch and populate it into the running configuration.

In addition the startup configurations will be updated with the

new merged configurations.

Do you want proceed? [yes/no]: yes

Merging the standby VSL configuration. . .

Building configuration...

N.B.: Let erop dat de switch modus accepteert virtuele opdracht niet langer nodig is in Cisco IOS-softwarerelease 12.2 SXI omdat de configuraties automatisch worden samengevoegd.

17. Voeg de Switch-2 interfaces toe aan MEC.

- VSS

!--- To Core layer

VSS(config)# interface range tengig 1/2/1, tengig2/2/1

VSS(config-if-range)# channel-group 20 mode desirable

VSS(config-if-range)# no shut

!--- To Access layer

VSS(config)# interface range gig 1/1/2, gig 2/1/2

VSS(config-if-range)# switchport

VSS(config-if-range)# channel-group 10 mode desirable

VSS(config-if-range)# no shut

- VSS buurman - Core
Core(config)# interface range gig 1/1, gig 1/2

Core(config-if-range)# channel-group 20 mode desirable

Core(config-if-range)# no shut

- VSS buurman - toegang
Access(config)# interface range gig 1/1, gig 1/2

Access(config-if-range)# channel-group 10 mode desirable

Access(config-if-range)# no shut

Migratie naar VSS is voltooid. Op dit punt, lopen beide switches van VSS en het verkeer is lading-gebalanceerd op alle uplink interfaces.

Gerelateerde informatie

- Virtuele switchingsystemen configureren

- Cisco IOS virtuele Switch-opdracht - handleiding

- Productondersteuning voor Cisco Catalyst 6500 Virtual Switching System 1440

- Productondersteuning voor switches

- Ondersteuning voor LAN-switching technologie

- Technische ondersteuning en documentatie – Cisco Systems