Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Upgradeprocedure

Eerste instelling

Upgradestappen

Verifiëren

Inleiding

Dit document beschrijft een stap-voor-stap software-upgrade (ISSU) procedure op Cisco Catalyst 6500 Series Switches in de VSS-modus (Virtual Switching System) met het gebruik van de Supervisor 2T met dubbel gestartte Cisco Catalyst 6800 Instant Access Switches (FEX) verbonden.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op Cisco Catalyst 6500 Series Switches in VSS-modus die Supervisor Engine 2T uitvoeren met een dubbele gestartte 6800IA aangesloten op WS-X6904-40G lijnkaarten.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Upgradeprocedure

Eerste instelling

De upgradeprocedure wordt uitgevoerd voor Cisco IOS-softwarerelease 15.1(2)SY naar release 15.1(2)SY1.

Hier zijn de statistieken vóór het ISSU-proces:

- Het Catalyst 6500 chassis met Switch-ID 1 is actief en de Switch met ID 2 is Standby (Hot).

- Beide chassis zijn beschikbaar op Cisco IOS-softwarerelease 15.1(2)SY.

- Eén enkele 6800IA-kaart met Cisco IOS-softwarerelease 15.0(2)EX2 wordt aangesloten op VSS op WS-X6904-40G-lijnkaarten met een dubbele home-verbinding. Het FEX port-channel nummer is 99 en de FEX ID is 110.

6K1#show mod sw all

Switch Number:     1   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY    Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY    Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX2   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Active

Peer switch number           : 2

Peer switch operational role : Virtual Switch Standby

Upgradestappen

1. Zorg ervoor dat het nieuwe Cisco IOS-beeld (Cisco IOS-softwarerelease 15.1(2)SY1) aanwezig is in de backplane en de slavebootschijf.

6K1#dir bootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:35:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:42:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

6K1#dir slavebootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:26:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:46:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

2. (Optioneel) Gebruik deze opdrachten om te controleren of de VSS klaar is voor het uitvoeren van de upgradeprocedure:

- bijzonderheden over de kwestie weergeven

- redundantie tonen

- switch tonen

- 6K1#show staatsdetail

Het systeem is ingesteld voor een upgrade in stagnerende modus.

Twee supermarktknooppunten blijken online te zijn.

Samenvatting: het systeem wordt in de stand-by modus bijgewerkt.

Slot = 1/2

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_INIT

6K1#

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 36 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 1/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 2/2

Current Software state = STANDBY HOT

Uptime in current state = 34 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

3. Gebruik de opdracht Loop om het upgradeproces te starten.

In deze stap herstart het VSS standby chassis, herlaadt het met het nieuwe beeld en initialiseert het als VSS standby chassis in SSO redundantie modus en voert het nieuwe beeld uit. Deze stap is voltooid wanneer de configuratie van het chassis gesynchroniseerd is, zoals aangegeven door het Bulk sync slaagde bericht. Het kan enkele seconden tot enkele minuten duren voor het nieuwe beeld wordt geladen en voor het VSS standby chassis naar de SSO-modus.

6K1#issu loadversion 1/2 bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

2/2 slavebootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

System configuration has been modified. Save? [yes/no]: yes

Building configuration...

[OK]

%issu loadversion initiated successfully, upgrade sequence will begin shortly

6K1#

*Feb 11 05:24:40.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence

will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Feb 11 05:25:10.091: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

<..output truncated..>

*Feb 11 05:29:46.075: %VS_GENERIC-SW1-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 05:29:46.079: %HA_CONFIG_SYNC-SW1-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:29:46.079: %RF-SW1-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:30:25.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed.

Please issue the 'issu runversion' command after all modules come online.

!

! Boot variable for standby should point to new Image in "show issu state detail" output.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 1/2

RP State = Active

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show redundancy states

my state = 13 -ACTIVE

peer state = 8  -STANDBY HOT

Mode = Duplex

Unit = Secondary

Unit ID = 18

Redundancy Mode (Operational) = sso

Redundancy Mode (Configured)  = sso

Redundancy State              = sso

Maintenance Mode = Disabled

Manual Swact = enabled

Communications = Up

client count = 144

client_notification_TMR = 30000 milliseconds

keep_alive TMR = 9000 milliseconds

keep_alive count = 1

keep_alive threshold = 19

RF debug mask = 0x0

4. Wanneer het VSS standby chassis met succes het nieuwe beeld in de staat van de SSO redundantie draait en alle linecards op het VSS standby chassis online zijn, dient u de opdracht runversion in te voeren om een omschakeling te forceren. Het aangepaste VSS standby chassis neemt het nieuwe actieve chassis over, dat het nieuwe beeld draait. Het voorheen actieve chassis wordt opnieuw geladen en geformatteerd als het nieuwe VSS standby chassis in SSO-modus, waarbij het oude beeld wordt uitgevoerd (voor het geval dat de software-upgrade moet worden afgebroken en het oude beeld wordt hersteld). Deze stap is voltooid wanneer de configuratie van het chassis gesynchroniseerd is, zoals aangegeven door het Bulk sync slaagde bericht.

6K1#issu runversion

Deze opdracht vult de actieve eenheid opnieuw in.

Proceed ? [confirm]

%issu runversion initiated successfully

*Feb 11 05:35:19.035: %RF-SW1-5-RF_RELOAD: Self reload. Reason: Admin ISSU

runversion CLI

<..output truncated..>

Feb 11 05:35:21.411: %SYS-SW1-5-SWITCHOVER: Switchover requested by Exec.

Reload Reason: Admin ISSU runversion CLI.

Resetting .......

!

!Standby chassis now becomes active. Below logs are from new active switch.

!

Initializing as Virtual Switch ACTIVE processor

.

.

*Feb 11 05:37:36.107: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 05:39:56.563: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:39:56.563: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:39:56.555: %PFREDUN-SW1_STBY-6-STANDBY: Ready for SSO mode in Default Domain

! Wait till all the modules and Fex Port-channel 99 links come up

!

*Feb 11 05:41:28.467: %ISSU_PROCESS-SW2-6-RUNVERSION_INFO: Runversion has completed.

Please issue the 'issu acceptversion' command

Feb 11 05:43:13.034: %LINK-3-UPDOWN: Interface TenGigabitEthernet1/0/2, changed

state to up (FEX-110)

Feb 11 05:43:14.033: %LINEPROTO-5-UPDOWN: Line protocol on Interface

TenGigabitEthernet1/0/2, changed state to up (FEX-110)

*Feb 11 05:43:14.491: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te1/3/5,

connected to FEX 110, uplink 52

*Feb 11 05:43:14.491: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group 99

is now dual-active detection capable

6K1#show issu state

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show fex 110 detail

FEX: 110        Description: FEX0110     state: online

FEX version: 15.0(2)EX2

Extender Model: C6800IA-48TD, Extender Serial: FOC1736W1A6

FCP ready: yes

Image Version Check: enforced

Fabric Portchannel Ports: 2

Fabric port for control traffic: Te2/3/5

Fabric interface state:

Po99       - Interface Up.

Te1/3/5    - Interface Up.      state: bound

Te2/3/5    - Interface Up.      state: bound

5. Gebruik de opdracht versie-opname om de terugdraaitimer te stoppen. Dit is nodig omdat als de timer afloopt, het aangepaste chassis opnieuw wordt geladen en naar de vorige softwareversie terugkeert.

6K1#issu acceptversion

% Rollback timer stopped. Please issue the 'issu commitversion' command.

6. Gebruik de opdracht runversion alle opdrachten gebruiken om de beeldomzetting te starten en de upgradeprocedure te starten op de FEX (6800IA). De FEX zet het downloaden van een afbeelding van de nieuwe softwarebundel van Supervisor2T in gang (hier Cisco IOS-softwarerelease 15.2(2)SY1). Als je FEX stapels gebruikt, is de meester verantwoordelijk om de afbeelding naar zijn leden te halen. Een TFTP-server draait op 192.1.1.1.

6K1#issu runversion fex all

% Successfully initiated 'runversion fex' for Fex IDs: 110.

Use 'show issu state' for more information.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;bootdisk:

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_IN_PROGRESS

Following are the logs on from FEX 6800IA console:

!

!192.1.1.1 is the tftp running on FEX controller i.e. VSS active and vlan 1012 is the

control vlan associated with fex.

!

FEX-110#

Loading c6800ia-universalk9-mz.150-2.EX4.bin from 192.1.1.1

(via Vlan1012):  !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 15493122 bytes]

examining image...

extracting info (112 bytes)

extracting c6800ia-universalk9-mz.150-2.EX4/info (792 bytes)

extracting info (112 bytes)

Stacking Version Number: 1.55

System Type:             0x00000000

Ios Image File Size:   0x00EB5200

Total Image File Size: 0x00EC6A00

Minimum Dram required: 0x08000000

Image Suffix:          universalk9-150-2.EX4

Image Directory:       c6800ia-universalk9-mz.150-2.EX4

Image Name:            c6800ia-universalk9-mz.150-2.EX4.bin

Image Feature:         IP|LAYER_2|SSH|3DES|MIN_DRAM_MEG=128

FRU Module Version:    No FRU Version Specified

Old image for switch 1: flash:/c6800ia-universalk9-mz.150-2.EX2

Old image will be left alone

Extracting images from archive into flash...

! The console will be waiting for about 5-10 minutes after the above line.

<output truncated>

New software image installed in flash:/c6800ia-universalk9-mz.150-2.EX4

Following are the logs from the 6500 Active supervisor:

*Feb 11 06:00:30.387: %SATMGR-SW2-5-ONLINE: FEX 110 online

*Feb 11 06:00:30.391: %SATMGR-SW2-5-FEX_MODULE_ONLINE: FEX 110, module 1 online

*Feb 11 06:00:30.395: %OIR-SW2-6-INSREM: Switch 110 Physical Slot 1 - Module

Type LINE_CARD  inserted

*Feb 11 06:00:30.951: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te2/3/5,

connected to FEX 110, uplink 51

*Feb 11 06:00:30.951: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group

99 is now dual-active detection capable

*Feb 11 06:01:00.983: %OIR-SW2-6-SP_INSCARD: Card inserted in Switch_number =

110, physical slot 1, interfaces are now online

FEX-110#show ver | in image

System image file is "flash:/c6800ia-universalk9-mz.150-2.EX4/

c6800ia-universalk9-mz.150-2.EX4.bin"

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

7. Typ de opdracht voor de vastlegging van de opdracht om het VSS stand-by chassis te verbeteren en bevestig de ISSU-sequentie. Het VSS standby chassis herstart, herlaadt met het nieuwe beeld en formatteert als VSS standby chassis in de SSO redundantie status, met het nieuwe beeld. Deze stap is voltooid wanneer de chassisconfiguratie gesynchroniseerd is, zoals aangegeven door de Bulk sync slaagde bericht, en alle linecards in de nieuwe VSS-Standby is online en geïnstalleerd.

6K1#issu commitversion

%issu commitversion initiated successfully, upgrade sequence will continue shortly

6K1#

*Feb 11 06:05:30.839: %ISSU_PROCESS-SW2-3-COMMITVERSION: issu commitversion;

Commitversion sequence will begin in 60 seconds. Enter 'issu abortversion'

to cancel.

*Feb 11 06:06:00.839: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO:

Resetting Standby shortly

*Feb 11 06:08:48.571: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 06:09:01.163: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has

come online, wait for terminal state

.

.

*Feb 11 06:10:41.267: %VS_GENERIC-SW2-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 06:10:41.271: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED:

Bulk Sync succeeded

*Feb 11 06:10:41.271: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 06:10:46.403: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Upgrade has completed,

updating boot configuration

!

!Boot variable now displays both new and old image in ?show issu state detail? output.

!

6K1#show issu state detail

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 hour, 28 minutes

Switchovers system experienced = 1

Standby failures = 1

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M), Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/2

Current Software state = STANDBY HOT

Uptime in current state = 1 minute

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Verifiëren

Gebruik deze opdrachten om te controleren of de upgrade geslaagd is:

- bijzonderheden over de kwestie weergeven

- redundantie tonen

- switch tonen

Hier is de huidige status na het ISSU-proces:

- 6500 chassis met Switch-ID 2 is actief en de Switch met ID 1 is Standby (Hot). Ze zijn nu beschikbaar op Cisco IOS-softwarerelease 15.1(2)SY1.

- De Instant Access Client (6800IA) voert nu Cisco IOS-softwarerelease 15.0(2)EX4 uit.

6K1#show mod swi all

Switch Number:     1   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY1   Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY1   Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX4   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Active

Peer switch number           : 1

Peer switch operational role : Virtual Switch Standby