Inhoud

Inleiding

Achtergrondinformatie

Starten

1. Controleer ROMMON versie

2. Controleer afbeelding

3. Controleer VSS

4. Zorg ervoor dat de switch in installatiemodus en niet in bundelmodus werkt

5. De licentie moet ofwel Entservices of IP-basis zijn

6. ACL-dochterkaart (dochtermodus) komt alleen in installatiemodus en niet in bundelmodus

7. Max. ondersteunde AP/clients

8. AP-verbinding

9. Hetzelfde als 5760/3850/3650 van Hier op

Inleiding

In dit document wordt de standaardcontrolelijst beschreven die moet worden gebruikt om de 4500 SUP8E draaiende te houden voor draadloos. Dit document is niet gericht op de manier waarop u de draadloze controller op de Sup8E kunt configureren, maar richt zich veeleer op de dingen die u voor en na wilt laten en die platform specifiek zijn. Zodra dit gebeurt, zal dit platform zich meestal gedragen zoals elke andere geconvergeerde toegangsswitch en kunnen andere documenten en gidsen worden gevolgd.

Achtergrondinformatie

De Cisco Catalyst® 4500E Supervisor Engine 8-E is de volgende generatie van eersteklas switchingmotor die volledige convergentie tussen bekabelde en draadloze netwerken op één platform biedt. Dit nieuwe Cisco® Unified Access Data Plane (UADP) Application-Specific Integrated Circuit (ASIC) maakt de draadloze convergentie mogelijk en maakt een uniform bekabeld draadloos beleid afdwingen, toepassingszichtbaarheid, flexibiliteit en toepassingsoptimalisatie mogelijk.

Starten

Om het draadloze apparaat in werking te stellen en op dit apparaat te laten draaien, moet u ervoor zorgen dat aan deze vereisten wordt voldaan:

1. Standaardversie controleren

2. Afbeelding moet K9 zijn - Crypto

3. Virtual Switching System (VSS) wordt alleen ondersteund op 3.8 en later (alleen Dual-Sup)

4. De switch moet in installatiemodus draaien

5. Licentie moet voor Entservice of IP-basis worden gebruikt

6. In de Bundelmodus komt er geen dochterkaart omhoog (alleen in de installatiemodus)

7. Maximum aantal ondersteunde access points (APs) is 50/Max ondersteunde clients - 2000

8. AP moet eindigen op hetzelfde chassis/supervisor (SUP)

9. Zodra u deze omhoog hebt, is de rest van de configuratie gelijk aan om het even welke geconvergeerde toegangsschakelaar (3850/5760 ...)

Laten we elk vanuit een uitvoerperspectief bekijken.

1. Controleer ROMMON versie

Opmerking: Het moet een SG4 [X - Aantal vanaf 1] of hoger zijn.

BGL.I.15-4500-2#sh version

ROM: 15.1(1r)SG4

BGL.I.15-4500-2 uptime is 6 minutes

System returned to ROM by power-on

Running default software

Jawa Revision 3, RadTrooper Revision 0x0.0x41, Conan Revision 0x1449

Last reload reason: power-on

2. Controleer afbeelding

Opmerking: Het moet 3.7 of hoger zijn en moet een K9 Crypto beeld zijn. Niets anders werkt.

Crypto afbeelding ziet er zo uit:

4500-2#sh version

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch  Software (cat4500es8-UNIVERSALK9-M), Version 03.07.00E RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2014 by Cisco Systems, Inc.

Compiled Sun 07-Dec-14 17:59 by prod_rel_team

Niet-cryptoafbeelding ziet er zo uit:

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch Software (cat4500es8-UNIVERSAL-M), Version 03.03.00.XO RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 14-Aug-13 09:51 by prod_rel_team

3. Controleer VSS

Voorbehandeling 3.8 gedrag:

Opmerking: Als VSS is ingeschakeld, zijn er geen draadloze opdrachten en vice versa als draadloze opdrachten zijn ingeschakeld, zijn VSS-opdrachten niet aanwezig.

4500-2#sh switch  virtual

Switch Mode : Standalone

Not in Virtual Switch mode due to:

Domain ID is not configured

Start IOS® XE 3.8 en later:

Opmerking: Dual-Sup VSS wordt ondersteund met draadloze bewerkingen. Quad-Sup VSS wordt echter niet ondersteund met draadloze verbindingen.

4. Zorg ervoor dat de switch in installatiemodus en niet in bundelmodus werkt

Bundle Mode - bootsystem pointing to .bin image (no wireless commands)

Install Mode - Bootsystem pointing to package.conf instead of Bin

BGL.I.15-4500-2#dir bootflash:

In bundelmodus:

Directory of bootflash:/

81602  -rw-   181583336   Oct 7 2014 09:18:45 +00:00  cat4500es8-universal.SPA.03.03.00.XO.151-1.XO.bin

81603  -rw-   181601128  Nov 18 2014 18:28:43 +00:00  cat4500es8-universal.SPA.03.03.02.XO.151-1.XO2.bin

81604  -rw-   483862876  Dec 31 2014 20:21:43 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

1708220416 bytes total (857677824 bytes free)

This is how the boot looks like

4500-2#sh boot

---------------------------

Switch 1

---------------------------

Current Boot Variables:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Boot Variables on next reload:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Allow Dev Key = yes

Manual Boot = no

Enable Break = no

In installatiemodus:

BGL.I.20-4500-1#dir bootflash:

Directory of bootflash:/

81602  -rwx   199051336   Oct 7 2014 02:00:02 +00:00  cat4500es8-universalk9.SPA.03.06.00.E.152-2.E.bin

81603  -rw-   215049252  Dec 29 2014 07:07:31 +00:00  cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin

16  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance

18  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance-stby-sync

81606  drwx        4096  Dec 30 2014 01:52:34 +00:00  wnweb_store

21  -rw-   126880776  Dec 30 2014 01:34:38 +00:00  cat4500es8-base.SPA.03.07.00E.pkg

57125  -rw-    82245776  Dec 30 2014 01:34:45 +00:00  cat4500es8-dc-base.SPA.03.07.00E.pkg

57126  -rw-     7019480  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-drivers.SPA.03.07.00E.pkg

57127  -rw-    35161204  Dec 30 2014 01:34:46 +00:00  cat4500es8-dc-infra.SPA.03.07.00E.pkg

81604  -rw-   483862876  Dec 30 2014 01:24:49 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

57128  -rw-    26876920  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-platform.SPA.03.07.00E.pkg

57129  -rw-     4225328  Dec 30 2014 01:34:39 +00:00  cat4500es8-firmware.SPA.03.07.00E.pkg

57130  -rw-       54192  Dec 30 2014 01:34:39 +00:00  cat4500es8-infra.SPA.03.07.00E.pkg

57131  -rw-     1987552  Dec 30 2014 01:34:47 +00:00  cat4500es8-platform.SPA.03.07.00E.pkg

57132  -rw-    88661144  Dec 30 2014 01:34:42 +00:00  cat4500es8-universalk9.SPA.152-3.E.pkg

57133  -rw-   110742524  Dec 30 2014 01:34:51 +00:00  cat4500es8-wcm.SPA.10.3.100.0.pkg

20  -rw-        1724  Dec 30 2014 01:35:59 +00:00  packages.conf

81605  ----       11679  Dec 31 2014 23:15:15 +00:00  dc_console_log-20141230-014159-UTC

1708220416 bytes total (321839104 bytes free)

BGL.I.20-4500-1#

4500-2#sh run | i boot

boot-start-marker

boot system bootflash:packages.conf

boot-end-marker

BGL.I.15-4500-2#sh boot

BOOT variable = bootflash:packages.conf,12;

CONFIG_FILE variable does not exist

BOOTLDR variable does not exist

Configuration register is 0x2102

Opmerking: Het configuratieregister is 0x2102 is een vereiste voor het detecteren van de dochterkaart.

Opmerking: 4500 (configuratie)#fig-register? <0x0-0xFFF> Registratienummer configuratie

Hoe bundel om te installeren converteren

5. De licentie moet ofwel Entservices of IP-basis zijn

Opmerking: Nadat u Entservices hebt ingeschakeld en opnieuw bent opgestart, kunt u AP-teller in de Right-To-Use (RTU) zien.

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

4500-2#license right-to-use activate entservices acceptEula (Requires Reboot)

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Active, In Use

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

6. ACL-dochterkaart (dochtermodus) komt alleen in installatiemodus en niet in bundelmodus

Opmerking: Als het apparaat in de Bundelmodus draait, komt de dochterkaart die voor Draadloos vereist is niet omhoog. Dit kan worden geverifieerd met de opdracht van de showmodule. Dochterkaartfalen wordt beschouwd als SUP-defecten en kan een RMA vereisen.

Tijdens het opstarten van het apparaat kunt u zien:

Cisco IOS®-XE software, Copyright (c) 2005-2014 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.

(http://www.gnu.org/licenses/gpl-2.0.html) For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

Daughter Card is booting.. Please stand by..............................................

Daughter Card is ready, continuing in wireless mode..

BGL.I.20-4500-1#sh module

Chassis Type : WS-C4510R+E

Power consumed by backplane : 40 Watts

Mod Ports Card Type                              Model              Serial No.

---+-----+--------------------------------------+------------------+-----------

2     2  1000BaseX (GBIC)                       WS-X4302-GB        JAE10307QDW

3    48  10/100/1000BaseT POE E Series          WS-X4648-RJ45V-E   JAE1211B9K2

4     6  1000BaseX (GBIC)                       WS-X4306           JAE053700PA

5    12  Sup 8-E 10GE (SFP+), 1000BaseX (SFP)   WS-X45-SUP8-E      CAT1814L3A7

M MAC addresses                    Hw  Fw           Sw               Status

--+--------------------------------+---+------------+----------------+---------

2 0015.62e6.e2b8 to 0015.62e6.e2b9 3.2                               Ok

3 001e.7af2.95f0 to 001e.7af2.961f 1.0                               Ok

4 0004.4dfb.87c4 to 0004.4dfb.87c9 2.0                               Ok

5 70ca.9b5e.6600 to 70ca.9b5e.660b 1.1 15.1(1r)SG4  03.07.00E        Ok

Mod  Redundancy role     Operating mode      Redundancy status

----+-------------------+-------------------+----------------------------------

5   Active Supervisor   RPR                 Active

Mod  Submodule               Model             Serial No.   Hw   Status

----+-----------------------+-----------------+------------+----+---------

5   Daughter Card           WS-UA-SUP8E       CAT1814L5H1  1.0  Ok

7. Max. ondersteunde AP/clients

Max. ondersteunde APs - 50/Max ondersteunde clients - 2000

8. AP-verbinding

Zorg ervoor dat de AP op hetzelfde chassis/SUP anders AP's niet zal aansluiten bij de schakelaar draadloze controller.

Net zoals 3850 en 3650 moeten de AP's rechtstreeks worden aangesloten op een toegangspoort van de 4507 om zich aan te sluiten bij de Sup8-controller.

9. Hetzelfde als 5760/3850/3650 van Hier op

Opmerking: Als de al eerder genoemde zaken geregeld zijn, is de rest vergelijkbaar om 3850/5760 operationeel te maken.

De GUI is zoals in de afbeelding weergegeven.