Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Probleem: Gebruik van hoge schijfruimte

Problemen oplossen

Cisco Unified Computing System (UCS) Series

Head-end Packard (HP) hardware

Oplossing

Inleiding

Dit document beschrijft een procedure wanneer u een gebruik van een schijf van 100% ervaart en u moet controleren of het een toepassingsprobleem of een hardwareprobleem is, dan moet u meerdere opdrachten uitvoeren om de situatie te analyseren.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco Unified Computing System (UCS) Series

- Head-end-Packard (HP) servers

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Probleem: Gebruik van hoge schijfruimte

Het systeem werkt langzaam en is niet stabiel. U ervaart een gebruik van 100% van de harde schijf.

Problemen oplossen

De snelle en makkelijke manier is om toegang te krijgen tot de web interface van het beheer en de hardware-status van het opslagapparaat te onderzoeken.

Wanneer er geen toegang is tot Cisco Integrated Management Controller (CIMC) afstandsbeheer voor Unified Computing System (UCS) Series of Integrated Lights-Out (ILO) op HP-servers, u kunt de informatie over de DVD en disk(s) verkrijgen met behulp van deze methode:

Voor Cisco Unified Computing System (UCS)-servers:

Debiaanse distributies gebruiken een pakket met de naam "megacli".

Meer informatie over dit gereedschap - http://hwraid.le-vert.net/wiki/LSIMegaRAIDSAS

Voorbeelden van het gebruik van de opdracht - http://www.mostlychris.com/blog/2009/07/29/check-raid-status-with-megacli/

Het pakket voor het debiër kan worden gedownload en geïnstalleerd.

Opmerking: Het wordt getest met megacli_8.07.14-1_amd64.deb

Om te controleren welke hardwarecontrollers gebruikt worden, voert u de opdracht uit: sudo lspci -vv | grep-i BANK

bijvoorbeeld

82:00.0 VIP-buscontroller: LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt] (rev 05)

Kernelstuurprogramma in gebruik: megaraid_sas

meer informatie over deze opdracht is te vinden in :

http://www.cisco.com/c/en/us/support/docs/servers-unified-computing/ucs-c-series-rack-servers/115020-intro-lsi-megacli-00.html

Runnen als root, commando: sudo/usr/bin/megacli

Cisco Unified Computing System (UCS) Series

Stap 1. Zoek uw gegevens van de RAID-controller, voer opdracht uit: lspci-vv | grep-i RAID.

De RAID-controller is een apparaat.

$ lspci -vv | grep -i RAID

82:00.0 RAID bus controller: LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt] (rev 05)

Kernel driver in use: megaraid_sas

$ sudo lspci -vv | grep -A60 -i RAID

82:00.0 RAID bus controller: LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt] (rev 05)

Subsystem: LSI Logic / Symbios Logic Device 9271

Control: I/O+ Mem+ BusMaster+ SpecCycle- MemWINV- VGASnoop- ParErr+ Stepping- SERR+ FastB2B- DisINTx+

Status: Cap+ 66MHz- UDF- FastB2B- ParErr- DEVSEL=fast >TAbort- <TAbort- <MAbort- >SERR- <PERR- INTx-

Latency: 0, Cache Line Size: 64 bytes

Interrupt: pin A routed to IRQ 56

Region 0: I/O ports at f000 [size=256]

Region 1: Memory at fbe60000 (64-bit, non-prefetchable) [size=16K]

Region 3: Memory at fbe00000 (64-bit, non-prefetchable) [size=256K]

Expansion ROM at fbe40000 [disabled] [size=128K]

Capabilities: [50] Power Management version 3

Flags: PMEClk- DSI- D1+ D2+ AuxCurrent=0mA PME(D0-,D1-,D2-,D3hot-,D3cold-)

Status: D0 NoSoftRst+ PME-Enable- DSel=0 DScale=0 PME-

Capabilities: [68] Express (v2) Endpoint, MSI 00

DevCap: MaxPayload 4096 bytes, PhantFunc 0, Latency L0s <64ns, L1 <1us

ExtTag+ AttnBtn- AttnInd- PwrInd- RBE+ FLReset+

DevCtl: Report errors: Correctable- Non-Fatal+ Fatal+ Unsupported-

RlxdOrd- ExtTag- PhantFunc- AuxPwr- NoSnoop+ FLReset-

MaxPayload 256 bytes, MaxReadReq 512 bytes

DevSta: CorrErr+ UncorrErr- FatalErr- UnsuppReq+ AuxPwr- TransPend-

LnkCap: Port #0, Speed 8GT/s, Width x8, ASPM L0s, Latency L0 <64ns, L1 <1us

ClockPM- Surprise- LLActRep- BwNot-

LnkCtl: ASPM Disabled; RCB 64 bytes Disabled- Retrain- CommClk+

ExtSynch- ClockPM- AutWidDis- BWInt- AutBWInt-

LnkSta: Speed 8GT/s, Width x8, TrErr- Train- SlotClk+ DLActive- BWMgmt- ABWMgmt-

DevCap2: Completion Timeout: Range BC, TimeoutDis+

DevCtl2: Completion Timeout: 65ms to 210ms, TimeoutDis-

LnkCtl2: Target Link Speed: 8GT/s, EnterCompliance- SpeedDis-, Selectable De-emphasis: -6dB

Transmit Margin: Normal Operating Range, EnterModifiedCompliance- ComplianceSOS-

Compliance De-emphasis: -6dB

LnkSta2: Current De-emphasis Level: -6dB, EqualizationComplete+, EqualizationPhase1+

EqualizationPhase2+, EqualizationPhase3+, LinkEqualizationRequest+

Capabilities: [d0] Vital Product Data

Unknown small resource type 00, will not decode more.

Capabilities: [a8] MSI: Enable- Count=1/1 Maskable- 64bit+

Address: 0000000000000000 Data&colon; 0000

Capabilities: [c0] MSI-X: Enable+ Count=16 Masked-

Vector table: BAR=1 offset=00002000

PBA: BAR=1 offset=00003000

Capabilities: [100 v2] Advanced Error Reporting

UESta: DLP- SDES- TLP- FCP- CmpltTO- CmpltAbrt- UnxCmplt- RxOF- MalfTLP- ECRC- UnsupReq- ACSViol-

UEMsk: DLP- SDES- TLP- FCP- CmpltTO- CmpltAbrt- UnxCmplt- RxOF- MalfTLP- ECRC- UnsupReq+ ACSViol-

UESvrt: DLP+ SDES+ TLP- FCP+ CmpltTO- CmpltAbrt- UnxCmplt- RxOF+ MalfTLP+ ECRC- UnsupReq- ACSViol-

CESta: RxErr- BadTLP- BadDLLP- Rollover- Timeout- NonFatalErr+

CEMsk: RxErr- BadTLP- BadDLLP- Rollover- Timeout- NonFatalErr+

AERCap: First Error Pointer: 00, GenCap- CGenEn- ChkCap- ChkEn-

Capabilities: [1e0 v1] #19

Capabilities: [1c0 v1] Power Budgeting <?>

Capabilities: [190 v1] #16

Capabilities: [148 v1] Alternative Routing-ID Interpretation (ARI)

ARICap: MFVC- ACS-, Next Function: 0

ARICtl: MFVC- ACS-, Function Group: 0

Kernel driver in use: megaraid_sas

Stap 2. Controleer het fysieke en virtuele station van Unified Computing System Series (UCS) en voer de opdracht uit:  sudo megacli -ldinfo -ALL -aAL.

$ sudo megacli -ldinfo -lALL -aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         &colon; 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteThrough, ReadAdaptive, Direct, No Write Cache if Bad                                   BBU

Default Access Policy: Read/Write

Current Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

U moet de waarde onder - Huidige cachebeleid controleren

Schrijf terug - OK

SchrijfThrough - BAD

Dit is een voorbeeld van hetzelfde:

$ sudo megacli -ldinfo -lALL –aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         : 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Default Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Disk Cache Policy   : Disk's Default

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

intucell@deb017:/intucell/maintenance_portal_6$

Stap 3. Controleer de batterij, voer opdracht: sudo megacli -AdpBuCmd -GetBuStatus -aALL-NoLog.

$ sudo megacli -AdpBbuCmd -GetBbuStatus -aALL -NoLog

BBU status for Adapter: 0

BatteryType: CVPM02

Voltage: 9849 mV

Current: 0 mA

Temperature: 25 C

Battery State: Optimal

BBU Firmware Status:

Charging Status              : None

Voltage                                 : OK

Temperature                             : OK

Learn Cycle Requested                   : No

Learn Cycle Active                      : No

Learn Cycle Status                      : OK

Learn Cycle Timeout                     : No

I2c Errors Detected                     : No

Battery Pack Missing                    : No

Battery Replacement required            : No

Remaining Capacity Low                  : No

Periodic Learn Required                 : No

Transparent Learn                       : No

No space to cache offload               : No

Pack is about to fail & should be replaced : No

Cache Offload premium feature required  : No

Module microcode update required        : No

BBU GasGauge Status: 0x654e

Pack energy             : 334 J

Capacitance             : 101

Remaining reserve space : 93

Exit Code: 0x00

Stap 4. Fysieke schijf(s) info, voer opdracht: sudo megacli -AdpAllInfo -aALL.

$ sudo megacli -AdpAllInfo -aALL

Adapter #0

==============================================================================

Versions

================

Product Name    : LSI MegaRAID SAS 9271-8i

Serial No       : SV50206143

FW Package Build: 23.29.0-0014

Mfg. Data

================

Mfg. Date       : 01/04/15

Rework Date     : 00/00/00

Revision No     : 33B

Battery FRU     : N/A

Image Versions in Flash:

================

BIOS Version       : 5.47.05.0_4.16.08.00_0x06080500

WebBIOS Version    : 6.1-71-e_71-Rel

Preboot CLI Version: 05.07-00:#%00011

FW Version         : 3.410.05-3484

NVDATA Version     : 2.1406.03-0134

Boot Block Version : 2.05.00.00-0010

BOOT Version       : 07.26.26.219

Pending Images in Flash

================

None

PCI Info

================

Controller Id   : 0000

Vendor Id       : 1000

Device Id       : 005b

SubVendorId     : 1000

SubDeviceId     : 9271

Host Interface  : PCIE

ChipRevision    : D1

Link Speed           : 0

Number of Frontend Port: 0

Device Interface  : PCIE

Number of Backend Port: 8

Port  :  Address

0        74a2e6a2b23600bf

1        0000000000000000

2        0000000000000000

3        0000000000000000

4        0000000000000000

5        0000000000000000

6        0000000000000000

7        0000000000000000

HW Configuration

================

SAS Address      : 500605b009f61dd0

BBU              : Present

Alarm            : Present

NVRAM            : Present

Serial Debugger  : Present

Memory           : Present

Flash            : Present

Memory Size      : 1024MB

TPM              : Absent

On board Expander: Absent

Upgrade Key      : Absent

Temperature sensor for ROC    : Present

Temperature sensor for controller    : Absent

ROC temperature : 74  degree Celsius

Settings

================

Current Time                     : 7:3:27 2/19, 2016

Predictive Fail Poll Interval    : 300sec

Interrupt Throttle Active Count  : 16

Interrupt Throttle Completion    : 50us

Rebuild Rate                     : 30%

PR Rate                          : 30%

BGI Rate                         : 30%

Check Consistency Rate           : 30%

Reconstruction Rate              : 30%

Cache Flush Interval             : 4s

Max Drives to Spinup at One Time : 2

Delay Among Spinup Groups        : 12s

Physical Drive Coercion Mode     : 1GB

Cluster Mode                     : Disabled

Alarm                            : Enabled

Auto Rebuild                     : Enabled

Battery Warning                  : Enabled

Ecc Bucket Size                  : 15

Ecc Bucket Leak Rate             : 1440 Minutes

Restore HotSpare on Insertion    : Disabled

Expose Enclosure Devices         : Enabled

Maintain PD Fail History         : Disabled

Host Request Reordering          : Enabled

Auto Detect BackPlane Enabled    : SGPIO/i2c SEP

Load Balance Mode                : Auto

Use FDE Only                     : Yes

Security Key Assigned            : No

Security Key Failed              : No

Security Key Not Backedup        : No

Default LD PowerSave Policy      : Automatic

Maximum number of direct attached drives to spin up in 1 min : 10

Auto Enhanced Import             : Yes

Any Offline VD Cache Preserved   : No

Allow Boot with Preserved Cache  : No

Disable Online Controller Reset  : No

PFK in NVRAM                     : Yes

Use disk activity for locate     : No

POST delay                       : 90 seconds

BIOS Error Handling              : Pause on Errors

Current Boot Mode                 :Normal

Capabilities

================

RAID Level Supported             : RAID0, RAID1, RAID5, RAID6, RAID00, RAID10, RAID50, RAID60, PRL 11, PRL 11 with spanning, SRL 3 supported, PRL11-RLQ0 DDF layout with no span, PRL11-RLQ0 DDF layout with span

Supported Drives                 : SAS, SATA

Allowed Mixing:

Mix in Enclosure Allowed

Mix of SAS/SATA of HDD type in VD Allowed

Mix of SAS/SATA of SSD type in VD Allowed

Status

================

ECC Bucket Count                 : 0

Limitations

================

Max Arms Per VD          : 32

Max Spans Per VD         : 8

Max Arrays               : 128

Max Number of VDs        : 64

Max Parallel Commands    : 1008

Max SGE Count            : 60

Max Data Transfer Size   : 8192 sectors

Max Strips PerIO         : 42

Max LD per array         : 64

Min Strip Size           : 8 KB

Max Strip Size           : 1.0 MB

Max Configurable CacheCade Size: 0 GB

Current Size of CacheCade      : 0 GB

Current Size of FW Cache       : 866 MB

Device Present

================

Virtual Drives    : 1

Degraded        : 0

Offline         : 0

Physical Devices  : 6

Disks           : 4

Critical Disks  : 0

Failed Disks    : 0

Supported Adapter Operations

================

Rebuild Rate                    : Yes

CC Rate                         : Yes

BGI Rate                        : Yes

Reconstruct Rate                : Yes

Patrol Read Rate                : Yes

Alarm Control                   : Yes

Cluster Support                 : No

BBU                             : Yes

Spanning                        : Yes

Dedicated Hot Spare             : Yes

Revertible Hot Spares           : Yes

Foreign Config Import           : Yes

Self Diagnostic                 : Yes

Allow Mixed Redundancy on Array : No

Global Hot Spares               : Yes

Deny SCSI Passthrough           : No

Deny SMP Passthrough            : No

Deny STP Passthrough            : No

Support Security                : No

Snapshot Enabled                : No

Support the OCE without adding drives : Yes

Support PFK                     : Yes

Support PI                      : Yes

Support Boot Time PFK Change    : No

Disable Online PFK Change       : No

Support LDPI Type1                      : No

Support LDPI Type2                      : No

Support LDPI Type3                      : No

PFK TrailTime Remaining         : 0 days 0 hours

Support Shield State            : Yes

Block SSD Write Disk Cache Change: No

Support Online FW Update        : Yes

Supported VD Operations

================

Read Policy          : Yes

Write Policy         : Yes

IO Policy            : Yes

Access Policy        : Yes

Disk Cache Policy    : Yes

Reconstruction       : Yes

Deny Locate          : No

Deny CC              : No

Allow Ctrl Encryption: No

Enable LDBBM         : No

Support Breakmirror  : No

Power Savings        : No

Supported PD Operations

================

Force Online                            : Yes

Force Offline                           : Yes

Force Rebuild                           : Yes

Deny Force Failed                       : No

Deny Force Good/Bad                     : No

Deny Missing Replace                    : No

Deny Clear                              : No

Deny Locate                             : No

Support Temperature                     : Yes

NCQ                                     : Yes

Disable Copyback                        : No

Enable JBOD                             : No

Enable Copyback on SMART                : No

Enable Copyback to SSD on SMART Error   : Yes

Enable SSD Patrol Read                  : No

PR Correct Unconfigured Areas           : Yes

Enable Spin Down of UnConfigured Drives : Yes

Disable Spin Down of hot spares         : No

Spin Down time                          : 30

T10 Power State                         : No

Error Counters

================

Memory Correctable Errors   : 0

Memory Uncorrectable Errors : 0

Cluster Information

================

Cluster Permitted     : No

Cluster Active        : No

Default Settings

================

Phy Polarity                     : 0

Phy PolaritySplit                : 0

Background Rate                  : 30

Strip Size                       : 64kB

Flush Time                       : 4 seconds

Write Policy                     : WB

Read Policy                      : Adaptive

Cache When BBU Bad               : Disabled

Cached IO                        : No

SMART Mode                       : Mode 6

Alarm Disable                    : Yes

Coercion Mode                    : 1GB

ZCR Config                       : Unknown

Dirty LED Shows Drive Activity   : No

BIOS Continue on Error           : 1

Spin Down Mode                   : Internal Only

Allowed Device Type              : SAS/SATA Mix

Allow Mix in Enclosure           : Yes

Allow HDD SAS/SATA Mix in VD     : Yes

Allow SSD SAS/SATA Mix in VD     : Yes

Allow HDD/SSD Mix in VD          : No

Allow SATA in Cluster            : No

Max Chained Enclosures           : 16

Disable Ctrl-R                   : Yes

Enable Web BIOS                  : Yes

Direct PD Mapping                : No

BIOS Enumerate VDs               : Yes

Restore Hot Spare on Insertion   : No

Expose Enclosure Devices         : Yes

Maintain PD Fail History         : No

Disable Puncturing               : No

Zero Based Enclosure Enumeration : No

PreBoot CLI Enabled              : Yes

LED Show Drive Activity          : No

Cluster Disable                  : Yes

SAS Disable                      : No

Auto Detect BackPlane Enable     : SGPIO/i2c SEP

Use FDE Only                     : Yes

Enable Led Header                : No

Delay during POST                : 0

EnableCrashDump                  : No

Disable Online Controller Reset  : No

EnableLDBBM                      : No

Un-Certified Hard Disk Drives    : Allow

Treat Single span R1E as R10     : No

Max LD per array                 : 64

Power Saving option              : All power saving options are enabled

Default spin down time in minutes: 30

Enable JBOD                      : No

TTY Log In Flash                 : Yes

Auto Enhanced Import             : Yes

BreakMirror RAID Support         : No

Disable Join Mirror              : No

Enable Shield State              : No

Time taken to detect CME         : 60s

Exit Code: 0x00

Stap 5. Consistentie check, run opdracht: sudo megacli -ldinfo -lALL -aALL.

$ sudo megacli -ldinfo -lALL -aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         &colon; 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Default Access Policy: Read/Write

Current Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Ongoing Progresses:

Check Consistency        : Completed 43%, Taken 11 min.

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

Stap 6. Instellingen van het interval van de consistentiecontrole, opdracht: sudo megacli -AdpCcSched -Info -aALL.

De BANK-controller voert om de zeven dagen een consistentiecontrole uit van de BANK. De waarde vertraging 168 wordt hier in uren weergegeven.

$ sudo megacli -AdpCcSched -Info -aALL

Adapter #0

Operation Mode: Concurrent

Execution Delay: 168

Next start time: 02/20/2016, 03:00:00

Current State: Active

Number of iterations: 43

Number of VD completed: 0

Excluded VDs          : None

Exit Code: 0x00

Stap 7. Pak het logboek van de gebeurtenis van de INVAL, voer opdracht: sudo megacli -AdpEventLog -GetEvents -f events.log -ALL & catevents.log | meer.

$ sudo megacli -AdpEventLog -GetEvents -f events.log -aALL && cat events.log | more

Success in AdpEventLog

Exit Code: 0x00

Adapter: 0 - Number of Events : 1404

seqNum: 0x00000002

Seconds since last reboot: 78

Code: 0x0000001e

Class: 0

Locale: 0x20

Event Description: Event log cleared

Event Data&colon;

===========

None

seqNum: 0x00000003

Seconds since last reboot: 78

Code: 0x0000002b

Class: 0

Locale: 0x20

Event Description: Test event: 'Event log adjusted, possibly due Firmware version incompatibility'

Event Data&colon;

===========

String: Event log adjusted, possibly due Firmware version incompatibility

seqNum: 0x00000004

Seconds since last reboot: 4

Code: 0x00000000

Class: 0

Locale: 0x20

Event Description: Firmware initialization started (PCI ID 005b/1000/9271/1000)

Event Data&colon;

<Snip>

Problemen zoals gezien op Cisco Integrated Management Web Interface die kijken naar Storage Controller:

Batterijcontrole

U kunt het logbestand opslaan voor een latere analyse.

Head-end Packard (HP) hardware

Voor HP is er een speciaal pakket voor Debian dat moet worden geïnstalleerd om toegang te krijgen tot de RAID-controller en fysieke disks. Het pakket heet hpacucli_9.40.1-1._amd64.deb

Stap 1. Installatie:

- Meld u aan bij uw Linux-systeem met uw privéaccount.

- Download het pakket voor uw Linux-systeem: wget http://downloads.linux.hpe.com/SDR./repo/mcp/debian/pool/non-free/hpacucli_9.40.1-1._amd64.deb

- opdracht uitvoeren:  sudo dpkg -i hpacucli_9.40.1-1._amd64.deb

Als de installatie is voltooid, kunt u met de BAL-manipulatie werken met behulp van het volgende CLI-gereedschap: pacucli

Met het gereedschap kan de juiste informatie worden opgehaald van de RAID-controller en kan de configuratie worden gewijzigd met de inval-onderdelen.

Stap 2. Geef de configuratiegegevens van de controller weer, voer opdracht uit:   hpacucli ctrl tonen alle configuratiedetails .

# hpacucli ctrl all show config detail

Smart Array P410i in Slot 0 (Embedded)

Bus Interface: PCI

Slot: 0

Serial Number: 50123456789ABCDE

Cache Serial Number: PACCQ9SY9NUH

RAID 6 (ADG) Status: Disabled

Controller Status: OK

Hardware Revision: C

Firmware Version: 2.50

Rebuild Priority: Medium

Expand Priority: Medium

Surface Scan Delay: 15 secs

Surface Scan Mode: Idle

Queue Depth: Automatic

Monitor and Performance Delay: 60  min

Elevator Sort: Enabled

Degraded Performance Optimization: Disabled

Inconsistency Repair Policy: Disabled

Wait for Cache Room: Disabled

Surface Analysis Inconsistency Notification: Disabled

Post Prompt Timeout: 0 secs

Cache Board Present: True

Cache Status: OK

Cache Ratio: 25% Read / 75% Write

Drive Write Cache: Disabled

Total Cache Size: 256 MB

Total Cache Memory Available: 144 MB

No-Battery Write Cache: Disabled

Cache Backup Power Source: Batteries

Battery/Capacitor Count: 1

Battery/Capacitor Status: OK

SATA NCQ Supported: True

Array: A

Interface Type: SAS

Unused Space: 0  MB

Status: OK

Array Type: Data

Logical Drive: 1

Size: 136.7 GB

Fault Tolerance: 1

Heads: 255

Sectors Per Track: 32

Cylinders: 35132

Strip Size: 128 KB

Full Stripe Size: 128 KB

Status: OK

Caching:  Enabled

Unique Identifier: 600508B1001037383941424344450E00

Disk Name: /dev/cciss/c0d0

Mount Points: /boot 243 MB

OS Status: LOCKED

Logical Drive Label: A00F9DBE50123456789ABCDEA8A8

Mirror Group 0:

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, SAS, 146 GB, OK)

Mirror Group 1:

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, SAS, 146 GB, OK)

Drive Type: Data

physicaldrive 1I:1:1

Port: 1I

Box: 1

Bay: 1

Status: OK

Drive Type: Data Drive

Interface Type: SAS

Size: 146 GB

Rotational Speed: 10000

Firmware Revision: HPD5

Serial Number: D0A1P9B09YJW0949

Model: HP      EG0146FARTR

Current Temperature (C): 18

Maximum Temperature (C): 39

PHY Count: 2

PHY Transfer Rate: 6.0Gbps, Unknown

physicaldrive 1I:1:2

Port: 1I

Box: 1

Bay: 2

Status: OK

Drive Type: Data Drive

Interface Type: SAS

Size: 146 GB

Rotational Speed: 10000

Firmware Revision: HPD5

Serial Number: D0A1P9B09YKM0949

Model: HP      EG0146FARTR

Current Temperature (C): 17

Maximum Temperature (C): 47

PHY Count: 2

PHY Transfer Rate: 6.0Gbps, Unknown

SEP (Vendor ID PMCSIERA, Model  SRC 8x6G) 250

Device Number: 250

Firmware Version: RevC

WWID: 50123456789ABCED

Vendor ID: PMCSIERA

Model:  SRC 8x6G

Stap 3. Toon controllerstatus, voer opdracht:  hpacucli ctrl geeft allen een status .

# hpacucli ctrl all show status

Smart Array P410i in Slot 0 (Embedded)

Controller Status: OK

Cache Status: OK

Battery/Capacitor Status: OK

Stap 4. Weergave van fysieke status, opdracht uitvoeren:    sleuf=0 pd van pacucli ctrl tonen de status.

# hpacucli ctrl slot=0 pd all show status

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, 146 GB): OK

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, 146 GB): OK

Stap 5.  Logische status weergeven, opdracht uitvoeren:  de " pacucli " - ctrl sleuf=0 heeft de status van allen getoond .

# hpacucli ctrl slot=0 pd all show status

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, 146 GB): OK

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, 146 GB): OK

root@deb011:/intucell# hpacucli ctrl slot=0 ld all show status

logicaldrive 1 (136.7 GB, 1): OK

Oplossing

Soms kan een slechte batterij in een van de servers de reden zijn. Je moet het vervangen.

Dit lost het probleem op en vermindert het hoge gebruik van diskprestaties.