Inhoud

Inleiding

Voorwaarden

Gebruikte componenten

Netwerkdiagram

IP-adressen

ISE-configuratie

Netwerkapparaten toevoegen

6500 (zaaizaad)

3560X (niet-zaad)

VertrouwenSEC-beveiligingsgroepen

Licentiebeleid voor netwerkapparaat

Apparaatconfiguratie (6500)

Verificatie

ISE Live Logs

PAC-bevoorrading

TrustSec-data downloaden

Configuratie zonder zaad (3560X)

Verificatie

ISE Live Logs

PAC-bevoorrading

Niet-gezuiverde verificatie

Downloaden van wederzijds peer-beleid

TrustSec-data downloaden

Interface-verificatie

Inleiding

Dit document beschrijft hoe u start- en non-zaadapparaten kunt configureren bij gebruik van trustsec met ISE (Identity Services Engine).

Trustsec gebruikt NDAC (Network Devices Admission Control) om een nieuw apparaat te authentiseren voordat het zich bij het trustsec-domein kan aansluiten. Dit voorkomt dat onbevoegden kunnen deelnemen aan de uitwisseling van betrouwbare informatie. Zaden apparaten/auteurs, in dit geval de 6500-schakelaar, moeten handmatig worden ingesteld en RADIUS via IP gebruiken om verbinding te maken met ISE. Niet-zaadapparaten/leveranciers, in dit geval de 3560X, hebben geen directe IP-connectiviteit op ISE en vereisen dat de zaadapparaten om in te schrijven en deze op het netwerk te authentiseren met 802.1X. Zodra het leverende, non-seed apparaat is geauthentiseerd zal een PAC (Protected Access Credentials) van ISE worden voorzien en zal de server informatie worden gedownload. De PAC bevat een gedeelde sleutel en een versleuteld token om in de toekomst veilig contact met ISE te maken.

Voorwaarden

ISE-verificatieserver

Trustsec geschikt zaadapparaat/authenticator

Trustsec-geschikt toestel zonder zaad/smeedster

Raadpleeg de nieuwste trustsec-compatibiliteitsmatrix:

http://www.cisco.com/c/en/us/solutions/enterprise-networks/trustsec/solution-overview-listing.html

Gebruikte componenten

- ISE 2,2 pleister 2

- WS-C6509-E [VS-SUP2T-10G]

- S2T54-poorts DS9-mz.SPA.152-1.SY3.bin

- WS-C3560X-24P-S switch

- c3560e-universalk9-mz.152-4.E4.bin

Netwerkdiagram

NDAC-topologie

IP-adressen

ISE: 14.36.143.18

6509: 10.122.165.35

3560X: 10.122.160.118

ISE-configuratie

Netwerkapparaten toevoegen

6500 (zaaizaad)

WorkCenters > TrustSec > Componenten > Network Devices > Add

Apparaatnaam en IP-adres

Radius gedeeld geheim

Credentials Trustsec

3560X (niet-zaad)

WorkCenters > TrustSec > Componenten > Network Devices > Add

Apparaatnaam en IP-adres

Radius gedeeld geheim

Credentials Trustsec

VertrouwenSEC-beveiligingsgroepen

WorkCenters > TrustSec > Componenten > Beveiligingsgroepen

Licentiebeleid voor netwerkapparaat

WorkCenters > TrustSec > TrustSEC Policy > autorisatie voor netwerkapparaten

Apparaatconfiguratie (6500)

TrustSec Credentials

6500#cts credentials id 6500 password Cisc0123

AAA configuration

6500(config)#aaa new-model

6500(config)#aaa authentication dot1x default group radius

6500(config)#aaa accounting identity default start-stop group radius

6500(config)#aaa authorization network CTSlist group radius

6500(config)#cts authorization list CTSlist

Radius Server Configuration

6500(config)#radius server ISE

6500(config-radius-server)#address ipv4 14.36.143.18 auth-port 1812 acct-port 1813

6500(config-radius-server)#pac key Cisc0123

Recognize and use vendor-specific attributes

6500(config)#radius-server vsa send authentication

Enable Change of Authorization

6500(config)#aaa server radius dynamic-author

6500(config-locsvr-da-radius)#client 14.36.143.18 server-key Cisc0123

Enable 802.1X

6500(config)#dot1x system-auth-control

Switchport TrustSec Configuration

6500(config)#int gi6/1

6500(config-if)#switchport mode trunk

6500(config-if)#cts dot1x

6500(config-if-cts-dot1x)#sap mode-list null

6500(config-if-cts-dot1x)#propagate sgt

Verificatie

PAC Download

6500#show cts pac

AID: 6F5719523570B8D229F23073404E2D37

PAC-Info:

PAC-type = Cisco Trustsec

AID: 6F5719523570B8D229F23073404E2D37

I-ID: 6500

A-ID-Info: ISE 2.2p1

Credential Lifetime: 04:27:29 UTC Oct 26 2017

PAC-Opaque: 000200B000030001000400106F5719523570B8D229F23073404E2D370006009400030100801062F6BE70E2CCB6B0D25BFC81CB5D00000013597A55C100093A8059F0E1A3FAF83A2B7C8332479B7324C0FDC4CBAE9AE4AFD19C614A7DB13C9DBD06798A344423897745F0F91F19489772E543ED205A9CD0F276A96C4505BF34CB75F132377FE770B77A3D822842DFE3A0A858130612D08DD58965B09C352E33E74DB3F6B5C7E1F6EC8C30FF215A6FEB3EA7BBC95E

Refresh timer is set for 12w5d

Environment Data

6500#show cts environment-data

CTS Environment Data

====================

Current state = COMPLETE

Last status = Successful

Local Device SGT:

SGT tag = 2-02:TrustSec_Devices

Server List Info:

Installed list: CTSServerList1-0001, 1 server(s):

*Server: 14.36.143.18, port 1812, A-ID 6F5719523570B8D229F23073404E2D37

Status = ALIVE

auto-test = TRUE, keywrap-enable = FALSE, idle-time = 60 mins, deadtime = 20 secs

Multicast Group SGT Table:

Security Group Name Table:

0-fb:Unknown

2-fb:TrustSec_Devices

3-fb:Network_Services

4-fb:Employees

5-fb:Contractors

6-fb:Guests

7-fb:Production_Users

8-fb:Developers

9-fb:Auditors

10-fb:Point_of_Sale_Systems

11-fb:Production_Servers

12-fb:Development_Servers

13-fb:Test_Servers

14-fb:PCI_Servers

15-fb:BYOD

255-fb:Quarantined_Systems

Environment Data Lifetime = 86400 secs

Last update time = 20:28:36 UTC Thu Jul 27 2017

Env-data expires in   0:23:47:05 (dd:hr:mm:sec)

Env-data refreshes in 0:23:47:05 (dd:hr:mm:sec)

Cache data applied           = NONE

State Machine is running

ISE Live Logs

Operations > RADIUS > Live Logs

PAC-bevoorrading

TrustSec-data downloaden

Configuratie zonder zaad (3560X)

TrustSec Credentials

3560X#cts credentials id 3560X password Cisc0123

AAA configuration

3560X(config)#aaa new-model

3560X(config)#aaa authentication dot1x default group radius

3560X(config)#aaa authorization network default group radius

3560X(config)#aaa accounting identity default start-stop group radius

Recognize and use vendor-specific attributes

3560X(config)#radius-server vsa send authentication

Enable Change of Authorization

3560X(config)#aaa server radius dynamic-author

3560X(config-locsvr-da-radius)#client 14.36.143.18 server-key Cisc0123

Enable 802.1X

3560X(config)#dot1x system-auth-control

Switchport TrustSec Configuration

3560X(config)#int gi0/24

3560X(config-if)#switchport trunk encapsulation dot1q

3560X(config-if)#switchport mode trunk

3560X(config-if)#cts dot1x

3560X(config-if-cts-dot1x)#sap mode-list null

3560X(config-if-cts-dot1x)#propagate sgt

Verificatie

Pac Download

3560X#show cts pac

AID: 6F5719523570B8D229F23073404E2D37

PAC-Info:

PAC-type = Cisco Trustsec

AID: 6F5719523570B8D229F23073404E2D37

I-ID: 3560X

A-ID-Info: ISE 2.2p1

Credential Lifetime: 05:32:57 UTC Oct 26 2017

PAC-Opaque: 000200B000030001000400106F5719523570B8D229F23073404E2D3700060094000301009F9B0624C0A0C5D2AFDAAE89C173D34300000013597A55C100093A8059F0E1A3FAF83A2B7C8332479B7324C0B224F18D8654C2DB14544B58296A0A97C7B52EB1B7C0725776FE16F715094AC8A766E1F6D16A2A151B70632D6EAB34C5E1874409779FADA53F5892AD4ACC3533B5A61F89D028C076D94B52744A328C23437306AF428162AC680742003C6BDDB207A08F57

Refresh timer is set for 11y42w

Environment Data

3560X#show cts environment-data

CTS Environment Data

====================

Current state = COMPLETE

Last status = Successful

Local Device SGT:

SGT tag = 2-02:TrustSec_Devices

Server List Info:

Installed list: CTSServerList1-0001, 1 server(s):

*Server: 14.36.143.18, port 1812, A-ID 6F5719523570B8D229F23073404E2D37

Status = ALIVE

auto-test = TRUE, keywrap-enable = FALSE, idle-time = 60 mins, deadtime = 20 secs

Multicast Group SGT Table:

Security Group Name Table:

0-d1:Unknown

2-d1:TrustSec_Devices

3-d1:Network_Services

4-d1:Employees

5-d1:Contractors

6-d1:Guests

7-d1:Production_Users

8-d1:Developers

9-d1:Auditors

10-d1:Point_of_Sale_Systems

11-d1:Production_Servers

12-d1:Development_Servers

13-d1:Test_Servers

14-d1:PCI_Servers

15-d1:BYOD

255-d1:Quarantined_Systems

Environment Data Lifetime = 86400 secs

Last update time = 02:41:21 UTC Mon Jan 2 2006

Env-data expires in   0:23:56:36 (dd:hr:mm:sec)

Env-data refreshes in 0:23:56:36 (dd:hr:mm:sec)

Cache data applied           = NONE

State Machine is running

ISE Live Logs

Operations > RADIUS > Live Logs

PAC-bevoorrading

Niet-gezuiverde verificatie

Downloaden van wederzijds peer-beleid

TrustSec-data downloaden

Interface-verificatie

Seed (6500)

6500#show cts interface gi6/1

Global Dot1x feature is Enabled

Interface GigabitEthernet6/1:

CTS is enabled, mode:    DOT1X

IFC state:               OPEN

Interface Active for 00:38:50.744

Authentication Status:   SUCCEEDED

Peer identity:       "3560X"

Peer's advertised capabilities: "sap"

802.1X role:         Authenticator

Authorization Status:    SUCCEEDED

Peer SGT:            2:TrustSec_Devices

Peer SGT assignment: Trusted

SAP Status:              SUCCEEDED

Dot1x Info for GigabitEthernet6/1

-----------------------------------

PAE                       = AUTHENTICATOR

Non-Seed (3560X)

3560X#show cts interface gi0/24

Global Dot1x feature is Enabled

Interface GigabitEthernet0/24:

CTS is enabled, mode:    DOT1X

IFC state:               OPEN

Interface Active for 00:08:51.317

Authentication Status:   SUCCEEDED

Peer identity:       "6500"

Peer's advertised capabilities: "sap"

802.1X role:         Supplicant

Reauth period applied to link:  Not applicable to Supplicant role

Authorization Status:    SUCCEEDED

Peer SGT:            2:TrustSec_Devices

Peer SGT assignment: Trusted

SAP Status:              SUCCEEDED

Version:             2

Dot1x Info for GigabitEthernet0/24

-----------------------------------

PAE                       = SUPPLICANT