Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrondinformatie

Configuratie

Verifiëren

Veelgestelde vragen

Bekende gebreken

Inleiding

Dit document beschrijft de configuratie en het werken van postuur-lease in Cisco ISE.

Voorwaarden

Vereisten

- Kennis van de postuur in Cisco ISE

- Kennis van AAA-beleid in Cisco ISE

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cat9300 switch versie 17.9.5

- Identity Service Engine (ISE) v3.2

- PC Windows 10 Enterprise met ISE-poortmodule 5.1.6

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Achtergrondinformatie

Posture lease is een functie in Cisco ISE die de laatst bekende nalevingsstatus opslaat tot 365 dagen in DB en niet uitkomt bij het eindpunt om te controleren of aan de vereisten wordt voldaan. Maar wanneer de postuur-lease verloopt, leidt Cisco ISE niet automatisch tot een nieuwe verificatie of een postuur-herbeoordeling voor het eindpunt. Het eindpunt blijft in dezelfde staat van naleving omdat dezelfde sessie wordt gebruikt. Wanneer het eindpunt opnieuw wordt geverifieerd, wordt de postuur uitgevoerd en wordt de postuur-leasetijd opnieuw ingesteld.

Posture lease is een endpointkenmerk dat in de Oracle DB wordt opgeslagen en de tijd in EPOCH-tijd opslaat. Hetzelfde kan worden gevalideerd vanuit Context-zichtbaarheid en Oracle DB.

Samen met de postuur-lease is er nog een functie in ISE die de laatst bekende nalevingsstatus voor configureerbare tijdsduur (max 200 dagen / 4800 uur / 288000 minuten) in de laatste bekende postuur-conforme staat. Deze eigenschap staat Cisco ISE toe om de laatste nalevingsstatus in het voorgeheugen onder te brengen, en als een eindpunt niet-volgzaam binnen de Laatste Bekende Staat van de Positie wordt, merkt ISE het eindpunt als volgzaam tot de gunstperiode die in postuur beleid wordt gevormd.

Laatst bekende Posture Compliant State waarde slaat op in de Oracle DB. Het slaat ook op in EPOCH-tijd.

Configuratie

U configureert de posterijen als volgt in Cisco ISE:

Ga naar Werkcentra > Houding > Instellingen > Houdbaarheid Lease. Controleer elke beoordeling van de houding en stel het aantal dag(en) in (1-365 dagen). Hier is het ingesteld op 1 dag.

Controleer de Cache Last Known Posture Compliant Status en configureer Last Known Posture Compliant State tijd (max 200 dagen / 4800 uur / 288000 minuten). Hier is het ingesteld voor 2 dagen.

Voor de eenvoud is slechts één postuur beleid (Windows FW check) ingeschakeld met een respijtperiode van 2 minuten.

Verifiëren

Het eindpunt maakt voor het eerst verbinding en is compatibel.

ISE-PSC.log (houding in DEBUG)

In de ise-psc.log, kunt u zien dat er geen vervaltijd in de DB is als de EP voor het eerst verbindt.

2024-11-30 22:55:08,485 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-8][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019::::- posture expriy time retrieved from DB is "" for B4-96-91-26-EB-A1

2024-11-30 22:55:08,485 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-8][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019::::- PostureExpiry value for B4-96-91-26-EB-A1 is not a number :

Het EP gaat door het postuur controleproces en voldoet aan de eisen. Wanneer het EP voldoet, werkt ISE de DB bij met een vervaltijd van 1 dag (1733073953816).

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019:alice:::- posture_bypass_test is null fast reconnect expiry time is1733073953816 2024-12-01T22:55:54.306+0530

2024-11-30 22:55:55,307 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000147BE04019:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time1733073953816 <------Updating posture lease in DB (EDF_POSTUREEXPIRY)

2024-11-30 22:55:55,307 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- updated posutre lease for session 08C9C50A000000177E20CE15

Ook werkt ISE de DB bij met de vervaltijd van de respijtperiode 1733160354306 (2 dagen).

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000147BE04019:alice:::- Starting new thread for updateGracePeriodTime

2024-11-30 22:55:55,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000147BE04019:alice:::- remove user from expiry list

2024-11-30 22:55:54,306 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], <---- grace period expiry time 1733160354306 <----------- Updating last known compliance status in DB (LAST_COMP_EXPIRY)

Na het opnieuw aansluiten van het EP, wordt de sessie direct Klacht. Als de postuur-lease is ingeschakeld, heeft ISE de postuur-vervaltijd uit de DB gehaald en de sessie als conform gemarkeerd.

2024-11-30 23:04:17,673 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-11-30 23:04:17,673 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-11-30 23:04:17,677 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733073953816" for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733073953816 2024-12-01T22:55:53.816+0530 for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733073953816 2024-12-01T22:55:53.816+0530 for B4-96-91-26-EB-A1

2024-11-30 23:04:17,679 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

2024-11-30 23:04:17,680 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PosturePolicyUtil -:::::- User null belongs to groups NAC Group:NAC:IdentityGroups:Endpoint Identity Groups:Profiled:Workstation,NAC Group:NAC:IdentityGroups:Any

2024-11-30 23:04:17,680 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Compliant

Scenario 1: Schakel Posture lease uit en Cache Last Known Posture Compliant Status met Last Known Posture Compliant State inschakelen is 2 dagen. (Dit scenario is ook geldig als de posture lease verloopt en EP daarna verbinding maakt.)

Nadat EP authenticeert, als postuur lease niet is ingeschakeld, voert ISE de postuur controle uit.

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-12-01 18:39:50,901 DEBUG [PolicyEngineEvaluationThread-3][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

Nadat het EP voldoet, werkt ISE de DB bij binnen de respijtperiode 1733231423117 (2 dagen).

2024-12-01 18:40:23,116 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000227EB700E6:alice:::- Starting new thread for updateGracePeriodTime

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000227EB700E6:alice:::- remove user from expiry list

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000227EB700E6:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733231423117 <--------------Updating last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-01 18:40:23,117 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-3][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000227EB700E6:alice:::- Starting new thread for updateLastCompExpiryTime [B4:96:91:26:EB:A1], grace period expiry time 1733057867397

Nu wordt het EP geen klacht meer.

Zoals in het postuur beleid, alleen Windows FW wordt gecontroleerd. Schakel de Windows FW uit en sluit de EP opnieuw aan.

Het EP wordt niet-klacht maar, 2 Mins grace periode is ingesteld in het postuur beleid. Hierdoor toont de AC postuur module de status als In grace periode.

In het RADIUS live log ziet u dat het EP wordt gemarkeerd als klacht, ook al is de postuur niet goed. Nadat de respijtperiode was verlopen, werd de sessie niet-conform.

In de ISE-psc.log kunt u zien dat wanneer de EP verbinding maakt, omdat de lease niet is ingeschakeld, het de LSD heeft gecontroleerd om de postuur status op te halen.

2024-11-30 23:26:16,482 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-11-30 23:26:16,482 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-11-30 23:26:16,483 DEBUG [PolicyEngineEvaluationThread-16][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

De posterijen worden gecontroleerd en voor het EP faalt dit. Na dat ISE controleerde de DB om de laatsteCompliantExpiry waarde terug te halen die 1733160354306 is (2 Dagen).

2024-11-30 23:27:19,123 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- Last compliant expiry period for device with mac: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 has not expired lastCompliantExpiry: 1733160354306.

Aangezien de laatsteCompliantExpiry nog steeds geldig is, controleert het verder de grace periode geconfigureerd op het postuur beleid dat is ingesteld als 2 Mins.

2024-11-30 23:27:19,123 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - calculateGracePeriod: B4-96-91-26-EB-A1.

2024-11-30 23:27:19,544 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- calculateGracePeriod - matched policy: Default_Firewall_Policy_Win with grace period: 2 for mac: B4-96-91-26-EB-A1

2024-11-30 23:27:19,544 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- calculateGracePeriod - grace period is: 2 for mac: B4-96-91-26-EB-A1

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000147BE04019:alice:::- Added user with mac B4-96-91-26-EB-A1 udid 6d8a638f9acadd2851a6cd7eae947060a898ebc1 grace period list with an expiration time of 2024/11/30 23:29:19 and startTime of 2024/11/30 23:27:19 <---------------- Updating the Grace period in DB (LAST_GRACE_EXPIRY)

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - device with mac: B4-96-91-26-EB-A1 - has grace period: 2 mins.

2024-11-30 23:27:19,546 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- Device with session id: 08C9C50A0000001A7E3D5087, client mac: B4-96-91-26-EB-A1 - has grace period: 2. Marking posture status as compliant

Nadat de respijtperiode is verlopen, verstuurt AC-module het mislukte rapport naar ISE. ISE controleert de respijtperiode in DB en constateert dat het is verlopen, dan markeert het de sessie als niet-klacht en verwijdert de LastCompExpiryTime en GracePeriodTime van DB.

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- value from cache 1732989439545 and db 1732989439545

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- getGracePeriodAndUpdate - StartTime 1732989439545

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- Calculated the GracePeriod exp in min 0

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000177E20CE15:alice:::- GracePeriod value is 0 and removeUser

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateGracePeriodTime

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.runtime.GracePeriodManager -:08C9C50A000000177E20CE15:alice:::- remove user from expiry list

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateLastCompExpiryTime

2024-11-30 23:29:23,289 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-4][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000177E20CE15:alice:::- Starting new thread for updateGracePeriodTime

Als het EP opnieuw verbinding maakt en niet-klacht wordt, wordt de vrijwaringsperiode niet nageleefd, aangezien de laatste conforme periode al is verlopen en de sessie direct wordt bijgewerkt als non-klacht.

2024-12-01 00:49:40,004 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000177E20CE15:alice:::- handleGracePeriod - Last compliant period expired for device with mac: B4-96-91-26-EB-A1.

Scenario 2: Schakel Posture lease samen met Cache Last Known Posture Compliant Status uit.

In dit geval, door gebrek, werkt ISE laatsteCompliantexpiry tijd aan 365 Dagen in DB bij.

Aangezien de Posture lease niet is ingeschakeld, vindt er een posture check plaats en wordt EP een klacht nadat ISE de laatsteCompliant verlooptijd bijwerkt tot 365 dagen in DB.

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is not enabled. Posture status retrieved from LSD for B4-96-91-26-EB-A1 is Unknown

2024-12-01 00:58:17,191 DEBUG [PolicyEngineEvaluationThread-12][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- PostureStatusPIP for mac B4-96-91-26-EB-A1 - Attribute Session.PostureStatus value is Unknown

2024-12-01 00:58:56,722 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.PostureHandlerImpl -:08C9C50A000000147BE04019:alice:::- handleGracePeriod - Device is compliant. Removing device with mac: B4-96-91-26-EB-A1 from grace period map

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- Last cache time period is not set, setting lastCompliant expiry time to 365 days

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A000000147BE04019:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1764530936723 <------------Updating last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-01 00:58:56,723 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-10][[]] cisco.cpm.posture.edf.PostureUdid -:08C9C50A000000147BE04019:alice:::- Starting new thread for updateLastCompExpiryTime

Scenario 3: Effect van Light Session Directory (LSD) op Posture Lease.

Het in- of uitschakelen van LSD heeft geen invloed op de postuur-lease en de laatste nalevingsstatus omdat beide kenmerken worden opgeslagen in Oracle DB en worden gerepliceerd over de implementatie. LSD slaat beperkte EP-kenmerken op in het geheugen en repliceert naar andere PSN's.

Als LSD is ingeschakeld:

Om LSD in te schakelen, navigeer naar Beheer > Systeem > Instellingen > Light Data Distribution > Controleer RADIUS Session Directory.

EP verbindt zich voor de eerste keer en gaat door de postuur check. Zodra het EP in overeenstemming wordt gebracht, worden de Posture-lease en de laatst bekende compliance-attributen in DB bijgewerkt.

2024-12-02 19:36:43,274 DEBUG [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 19:36:43,276 WARN [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.runtime.PostureManager -:::::- Cannot find endpoint B4-96-91-26-EB-A1 in end point DB

2024-12-02 19:36:43,276 INFO [PolicyEngineEvaluationThread-11][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- not able to find user name in posture pip for B4-96-91-26-EB-A1 08C9C50A0000002B87B7D6EC. Set posture status to unknown

2024-12-02 19:37:27,164 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-5][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A000000227EB700E6::::- posture expriy time retrieved from DB is "" for B4-96-91-26-EB-A1

2024-12-02 19:37:29,110 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A0000002B87B7D6EC:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733321249110 <--------------------Updated last known compliance status in DB

2024-12-02 19:37:29,113 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002B87B7D6EC:alice:::- posture_bypass_test is null fast reconnect expiry time is 1733234849113 2024-12-03T19:37:29.113+0530

2024-12-02 19:37:29,113 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-6][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002B87B7D6EC:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time 1733234849113 <------Updated posture lease in DB

Dit zijn de eigenschappen in LSD die over PSN worden verdeeld. U kunt zien dat noch posture lease, noch de laatste compliance status in de attributen.

2024-12-02 19:37:32,221 DEBUG [LSD-consumers-pool-28][[]] cisco.cpm.lsd.service.SessionDirectory -:::::- Updating session sessionID:[08C9C50A0000002B87B7D6EC] status:[Authenticated] randomId:[0352b361-e72a-40e7-a0c8-b1ef779f73a5] auditSessionID:[08C9C50A0000002B87B7D6EC] accountingSessionID:[null] endpointMAC:[B4-96-91-26-EB-A1] callingStationId: [B4-96-91-26-EB-A1] endpointIP:[10.197.201.180], IPv6 : [[]], psnIP:[10.127.197.170] psnFQDN: [labpsn01.vmlab.local] deviceIP:[10.197.201.8] destinationIP:[10.127.197.170] nasIP:[10.197.201.8] nasIPv6:[null] postureStatus: [Compliant] timeStamp:[1733148451] cts:security-group-tag:[7] cts:vn:[null] proxyFlow:[null] retry count : 1

Verifieer nu het EP met een ander PSN in de inzet.

Nadat de verificatieaanvraag op een andere PSN is geland, kunt u zien dat de PSN de postuur-leasetijd van DB ophalen en de sessie direct als conform markeren. Het zelfde kan worden geverifieerd van de levende logboeken.

2024-12-02 20:08:27,449 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-02 20:08:27,449 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:08:27,468 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-12-02 20:08:27,471 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733234849113" for B4-96-91-26-EB-A1

2024-12-02 20:08:27,471 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733234849113 2024-12-03T19:37:29.113+0530 for B4-96-91-26-EB-A1

2024-12-02 20:08:27,472 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733234849113 2024-12-03T19:37:29.113+0530 for B4-96-91-26-EB-A1

2024-12-02 20:08:27,472 DEBUG [PolicyEngineEvaluationThread-5][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

Als LSD is uitgeschakeld:

Om LSD uit te schakelen, navigeer naar Beheer > Systeem > Instellingen > Light Data Distribution > Uncheck RADIUS Session Directory.

EP verbindt voor het eerst en gaat door het postuur proces. Zodra het EP in overeenstemming wordt gebracht, worden de Posture-lease en de laatst bekende compliance-attributen in DB bijgewerkt.

2024-12-02 20:40:10,417 DEBUG [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:40:10,423 WARN [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.runtime.PostureManager -:::::- Cannot find endpoint B4-96-91-26-EB-A1 in end point DB

2024-12-02 20:40:10,423 INFO [PolicyEngineEvaluationThread-9][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- not able to find user name in posture pip for B4-96-91-26-EB-A1 08C9C50A0000003087F1EE30. Set posture status to unknown

2024-12-02 20:40:45,679 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.GracePeriodUtil -:08C9C50A0000002E87E4FE87:alice:::- updating grace period for device with udid: 6d8a638f9acadd2851a6cd7eae947060a898ebc1 , maclist: [B4:96:91:26:EB:A1], grace period expiry time 1733325045679<--------------------Updated last known compliance status in DB (LAST_COMP_EXPIRY)

2024-12-02 20:40:45,682 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002E87E4FE87:alice:::- posture_bypass_test is null fast reconnect expiry time is 1733238645682 2024-12-03T20:40:45.682+0530

2024-12-02 20:40:45,682 DEBUG [https-jsse-nio-10.127.197.170-8445-exec-1][[]] cisco.cpm.posture.runtime.PostureManager -:08C9C50A0000002E87E4FE87:alice:::- updating fast reconnect for end point B4:96:91:26:EB:A1 with 1 days of expiry time 1733238645682<------Updated posture lease in DB (EDF_POSTUREEXPIRY)

Verifieer nu het EP met een ander PSN in de inzet.

Nadat de verificatieaanvraag op een andere PSN is geland, kunt u zien dat de PSN de postuur-leasetijd van DB ophalen en de sessie direct als conform markeert. Het zelfde kan worden geverifieerd van de levende logboeken.

2024-12-02 20:49:56,115 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Posture status in session is not compliant

2024-12-02 20:49:56,115 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- fast reconnect is enabled

2024-12-02 20:49:56,119 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- Querying posture expiry time by MAC B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture expriy time retrieved from DB is "1733238645682" for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.runtime.PostureManager -:::::- posture lease expiry time 1733238645682 2024-12-03T20:40:45.682+0530 for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- retrieved fast reconnect expiry time 1733238645682 2024-12-03T20:40:45.682+0530 for B4-96-91-26-EB-A1

2024-12-02 20:49:56,123 DEBUG [PolicyEngineEvaluationThread-10][[]] cisco.cpm.posture.pip.PostureStatusPIP -:::::- B4-96-91-26-EB-A1 is within fast reconnect expiry

Uit deze twee scenario's kunt u bevestigen dat LSD niet van invloed is op de Posture Lease.

Veelgestelde vragen

1. Is Posture Lease en Cached laatste bekende houding onafhankelijk van elkaar?

Ja, Posture Lease kan worden ingeschakeld zonder de Cached laatst bekende positie in te schakelen en vice versa. Posture Lease slaat het Endpoint Compliance standbeeld op als een endpoint attribuut voor de ingestelde hoeveelheid tijd. Cached last known postuur is de tijd die in DB is opgeslagen waarin de Grace periode wordt gegeven als het Endpoint niet-conform wordt. Dit is geen endpointkenmerk.

2. Is de Posture Lease en Cached laatste bekende houding beide herhaald over de knooppunten?

De huur van de houding is een endpointattribuut en over alle knooppunten herhaald. De laatst bekende positie van Cached is geen endpointkenmerk, maar, omdat de waarde in Oracle DB staat, wordt deze ook gerepliceerd naar alle knooppunten.

3. Verwijdert de herstart van het knooppunt deze waarden?

Nee, omdat beide worden opgeslagen in de Oracle DB, worden de waarden niet verwijderd door het opnieuw laden van knooppunten.

4. Doet Posture Lease een veiligheidsprobleem ontstaan?

Wanneer de postuur-lease is ingeschakeld, controleert ISE niet op de postuur-status van het eindpunt. Het kan een veiligheidsprobleem veroorzaken omdat als het Endpoint niet in overeenstemming is, ISE het als Klacht kan behandelen. Het wordt aanbevolen om Posture Reassessment samen met de Posture lease te gebruiken om dit risico te minimaliseren.

Bekende gebreken

Cisco bug-id CSCwk07454 PSN werkt de DB niet bij met de juiste verlooptijd voor de posterijen.

Cisco bug-id CSCwi58421 PSN-knooppunt werkt de DB niet bij met de juiste Posture-verlooptijd wanneer Posture lease is ingeschakeld.