Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerktopologie

Configuratie van FlexVPN-server

Configuratie van RADIUS-gebruikersprofiel

Verifiëren

Afgeleide virtuele access interface

Crypto sessies

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor een VPN-routing en -forwarding (VRF)-bewuste FlexVPN in een afstandstoegangsscenario. De configuratie gebruikt een Cisco IOS® router als tunnelaggregatiemiddel met AnyConnect-clients op afstand.

Voorwaarden

Vereisten

In deze voorbeeldconfiguratie worden de VPN-verbindingen afgesloten op een MPLS (Multiprotocol Label Switching) Provider Edge (PE)-apparaat waar het tunneleindpunt in een MPLS VPN (de voorste VRF [FVRF]) is. Nadat het versleutelde verkeer is gedecrypteerd, wordt het duidelijke tekstverkeer verzonden naar een ander MPLS VPN (de interne VRF [IVRF]).

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco ASR 1000 Series aggregation services router met IOS-XE3.7.1 (15.2(4)S1) als FlexVPN-server

- Cisco AnyConnect Secure Mobility Client en Cisco AnyConnect VPN-client versie 3.1

- Microsoft Network Policy Server (NPS) RADIUS-server

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg de Cisco Technical Tips Convention voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

Opmerking: Gebruik het Opname Gereedschap (alleen geregistreerde klanten) om meer informatie te verkrijgen over de opdrachten die in deze sectie worden gebruikt.

Netwerktopologie

Het netwerk in dit document is als volgt opgebouwd:

Configuratie van FlexVPN-server

Dit is een voorbeeld van de FlexVPN serverconfiguratie:

hostname ASR1K

!

aaa new-model

!

!

aaa group server radius lab-AD

server-private 172.18.124.30 key Cisco123

!

aaa authentication login default local

aaa authentication login AC group lab-AD

aaa authorization network AC local

!

aaa session-id common

!

ip vrf fvrf

rd 2:2

route-target export 2:2

route-target import 2:2

!

ip vrf ivrf

rd 1:1

route-target export 1:1

route-target import 1:1

!

!

crypto pki trustpoint AC

enrollment mode ra

enrollment url http://lab-ca:80/certsrv/mscep/mscep.dll

fqdn asr1k.labdomain.cisco.com

subject-name cn=asr1k.labdomain.cisco.com

revocation-check crl

rsakeypair AC

!

!

crypto pki certificate chain AC

certificate 433D7311000100000259

certificate ca 52DD978E9680C1A24812470E79B8FB02

!

!

crypto ikev2 authorization policy default

pool flexvpn-pool

def-domain cisco.com

route set interface

!

crypto ikev2 authorization policy AC

pool AC

dns 10.7.7.129

netmask 255.255.255.0

banner ^CCC Welcome ^C

def-domain example.com

!

crypto ikev2 proposal AC

encryption aes-cbc-256

integrity sha1

group 5

!

crypto ikev2 policy AC

match fvrf fvrf

proposal AC

!

!

crypto ikev2 profile AC

match fvrf fvrf

match identity remote key-id cisco.com

identity local dn

authentication remote eap query-identity

authentication local rsa-sig

pki trustpoint AC

dpd 60 2 on-demand

aaa authentication eap AC

aaa authorization group eap list AC AC

virtual-template 40

!

!

crypto ipsec transform-set AC esp-aes 256 esp-sha-hmac

mode tunnel

!

crypto ipsec profile AC

set transform-set AC

set ikev2-profile AC

!

!

interface Loopback0

description BGP source interface

ip address 10.5.5.5 255.255.255.255

!

interface Loopback99

description VPN termination point in the FVRF

ip vrf forwarding fvrf

ip address 7.7.7.7 255.255.255.255

!

interface Loopback100

description loopback interface in the IVRF

ip vrf forwarding ivrf

ip address 6.6.6.6 255.255.255.255

!

interface GigabitEthernet0/0/1

description MPLS IP interface facing the MPLS core

ip address 20.11.11.2 255.255.255.0

negotiation auto

mpls ip

cdp enable

!

!

!

interface Virtual-Template40 type tunnel

no ip address

tunnel mode ipsec ipv4

tunnel vrf fvrf

tunnel protection ipsec profile AC

!

router bgp 2

bgp log-neighbor-changes

redistribute connected

redistribute static

neighbor 10.2.2.2 remote-as 2

neighbor 10.2.2.2 update-source Loopback0

!

address-family vpnv4

neighbor 10.2.2.2 activate

neighbor 10.2.2.2 send-community extended

exit-address-family

!

address-family ipv4 vrf fvrf

redistribute connected

redistribute static

exit-address-family

!

address-family ipv4 vrf ivrf

redistribute connected

redistribute static

exit-address-family

!

ip local pool AC 192.168.1.100 192.168.1.150

Configuratie van RADIUS-gebruikersprofiel

De belangrijkste configuratie die voor het RADIUS-profiel wordt gebruikt, zijn de twee VSA-attribuut-value (VSA)-paren (AV) van Cisco die de dynamisch gemaakte virtuele toegangsinterface in IVRF plaatsen en IP in de dynamisch gemaakte virtuele toegangsinterface inschakelen:

ip:interface-config=ip unnumbered loopback100

ip:interface-config=ip vrf forwarding ivrf

In Microsoft NPS, is de configuratie in de instellingen voor het netwerkbeleid zoals in dit voorbeeld:

Waarschuwing: de ip vrf-opdracht moet vóór de ip ongenummerde opdracht komen. Als de virtuele toegangsinterface uit de virtuele sjabloon wordt gekloond en de opdracht het doorsturen van ip vrf wordt toegepast, wordt elke IP-configuratie verwijderd van de virtuele toegangsinterface. Hoewel de tunnel tot stand is gebracht, is de CEF nabijheid voor de point-to-point (P2P) interface onvolledig. Dit is een voorbeeld van de show nabijheidsopdracht met een onvolledig resultaat:

ASR1k#show adjacency virtual-access 1

Protocol Interface                 Address

IP       Virtual-Access1           point2point(6) (incomplete)

Als de CEF nabijheid onvolledig is, wordt al het uitgaande VPN verkeer gedropt.

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt. Controleer de afgeleide virtuele toegangsinterface en controleer vervolgens de instellingen IVRF en FVRF.

Afgeleide virtuele access interface

Controleer dat de gemaakte virtuele toegangsinterface correct van de virtuele sjablooninterface is gekloond en alle eigenschappen die per gebruiker zijn gedownload van de RADIUS-server heeft toegepast:

ASR1K#sh derived-config interface virtual-access 1

Building configuration...Derived configuration : 250 bytes

!

interface Virtual-Access1

ip vrf forwarding ivrf

ip unnumbered Loopback100

tunnel source 7.7.7.7

tunnel mode ipsec ipv4

tunnel destination 8.8.8.10

tunnel vrf fvrf

tunnel protection ipsec profile AC

no tunnel protection ipsec initiate

end

Crypto sessies

Controleer de instellingen van IVRF en FVRF bij deze besturingssysteemuitvoer.

Dit is een voorbeeld van de output van de show crypto sessief detailopdracht:

ASR1K#show crypto session detail

Crypto session current status

Code: C - IKE Configuration mode, D - Dead Peer Detection

K - Keepalives, N - NAT-traversal, T - cTCP encapsulation

X - IKE Extended Authentication, F - IKE Fragmentation

Interface: Virtual-Access1

Uptime: 00:23:19

Session status: UP-ACTIVE

Peer: 8.8.8.10 port 57966 fvrf: fvrf ivrf: ivrf

Phase1_id: cisco.com

Desc: (none)

IKEv2 SA: local 7.7.7.7/4500 remote 8.8.8.10/57966 Active

Capabilities:(none) connid:1 lifetime:23:36:41

IPSEC FLOW: permit ip 0.0.0.0/0.0.0.0 host 192.168.1.103

Active SAs: 2, origin: crypto map

Inbound:  #pkts dec'ed 95 drop 0 life (KB/Sec) 4607990/2200

Outbound: #pkts enc'ed 44 drop 0 life (KB/Sec) 4607997/2200

Dit is een voorbeeld van de output van de opdracht showcrypto IKEv2 sessiedetails:

ASR1K#show crypto ikev2 sess detail

IPv4 Crypto IKEv2 Session

Session-id:4, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                 Remote                fvrf/ivrf            Status

1         7.7.7.7/4500          8.8.8.10/57966        fvrf/ivrf            READY

Encr: AES-CBC, keysize: 256, Hash: SHA96, DH Grp:5, Auth sign: RSA, Auth verify: EAP

Life/Active Time: 86400/1298 sec

CE id: 1004, Session-id: 4

Status Description: Negotiation done

Local spi: EE87373C2C2643CA       Remote spi: F80C8A4CB4143091

Local id: cn=asr1k.labdomain.cisco.com,hostname=asr1k.labdomain.cisco.com

Remote id: cisco.com

Remote EAP id: user1

Local req msg id:  1              Remote req msg id:  43

Local next msg id: 1              Remote next msg id: 43

Local req queued:  1              Remote req queued:  43

Local window:      5              Remote window:      1

DPD configured for 60 seconds, retry 2

NAT-T is detected  outside

Cisco Trust Security SGT is disabled

Assigned host addr: 192.168.1.103

Initiator of SA : No

Child sa: local selector  0.0.0.0/0 - 255.255.255.255/65535

remote selector 192.168.1.103/0 - 192.168.1.103/65535

ESP spi in/out: 0x88F2A69E/0x19FD0823

AH spi in/out: 0x0/0x0

CPI in/out: 0x0/0x0

Encr: AES-CBC, keysize: 256, esp_hmac: SHA96

ah_hmac: None, comp: IPCOMP_NONE, mode tunnel

IPv6 Crypto IKEv2 Session

ASR1K#

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Technische ondersteuning en documentatie – Cisco Systems