Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Bepaal welke HTTP Server-versie u heeft

Cisco IOS-software met de HTTP V1-server

Cisco IOS-software met de HTTP V1.1-server

HTTP V1.1-server - voor Cisco plug-in CSCeb82510

HTTP V1.1-server - Na Cisco plug-in CSCeb82510

Debuggen

Gerelateerde informatie

Inleiding

Dit document toont hoe u de toegang tot de Cisco IOS® HTTP server kunt controleren met Verificatie, autorisatie en accounting (AAA). De controle van de toegang tot de Cisco IOS HTTP server met AAA varieert op basis van de Cisco IOS-softwarerelease.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

Dit document is niet beperkt tot specifieke software- en hardware-versies.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Bepaal welke HTTP Server-versie u heeft

Geef de exec opdracht uit toon subsys naam http om te zien welke versie van de HTTP server u heeft.

router1#show subsys name http

Class         Version

http                Protocol    1.001.001

Dit is een systeem met de HTTP V1.1 server. Cisco IOS-softwarerelease 12.2(15)T en alle Cisco IOS-softwarerelease 12.3 releases hebben HTTP V1.1.

router2#show subsys name http

Class         Version

http                Protocol    1.000.001

Dit is een systeem met de HTTP V1 server. Cisco IOS-softwarereleases 12.2(15)T (inclusief Cisco IOS-softwarereleases 12.2(15)JA en 12.2(15)XR) hebben HTTP V1.

Cisco IOS-software met de HTTP V1-server

In releases van Cisco IOS-software die de HTTP V1-server bevat, gebruiken HTTP-sessies virtuele eindlijnen (vtys). Daarom worden HTTP-verificatie en -autorisatie gecontroleerd met dezelfde methoden die voor de vT's zijn ingesteld.

ip http server

!

aaa new-model

aaa authentication login VTYSandHTTP radius local

aaa authorization exec VTYSandHTTP radius local

!

ip http authentication aaa

!

line vty 0 19

!--- The number of vtys you have.

login authentication VTYSandHTTP

authorization exec VTYSandHTTP

Cisco IOS-software met de HTTP V1.1-server

In releases van Cisco IOS-software met de HTTP V1.1-server gebruiken de HTTP-sessies geen VTS. Ze gebruiken sokjes.

HTTP V1.1-server - voor Cisco plug-in CSCeb82510

Vóór de integratie van Cisco bug ID CSCeb82510 (alleen geregistreerde klanten) in Cisco IOS-softwarereleases 12.3(7.3) en 12.3(7.3)T moet de HTTP V1.1-server dezelfde verificatie- en autorisatiemethode gebruiken die voor de console is ingesteld.

ip http server

!

aaa new-model

aaa authentication login CONSOLEandHTTP radius local

aaa authorization exec CONSOLEandHTTP radius local

!

ip http authentication aaa

!

line con 0

login authentication CONSOLEandHTTP

authorization exec CONSOLEandHTTP

HTTP V1.1-server - Na Cisco plug-in CSCeb82510

Met de integratie van Cisco bug ID CSCeb82510 (alleen geregistreerde klanten) in Cisco IOS-softwarereleases 12.3(7.3) en 12.3(7.3)T kan de HTTP-server onafhankelijke verificatie- en autorisatiemethoden op eigen kracht gebruiken, met nieuwe zoekwoorden in de ip http authenticatie. De nieuwe sleutelwoorden zijn:

router(config)#ip http authentication aaa command-authorization listname

router(config)#ip http authentication aaa exec-authorization listname

router(config)#ip http authentication aaa login-authentication listname

Dit is een voorbeeld-uitvoer:

ip http server

!

aaa new-model

aaa authentication login HTTPonly radius local

aaa authorization exec HTTPonly radius local

!

ip http authentication aaa

ip http authentication aaa exec-authorization HTTPonly

ip http authentication aaa login-authentication HTTPonly

Debuggen

Geef deze debug opdrachten uit om problemen met HTTP-verificatie/autorisatie op te lossen:

debug ip tcp transactions

debug modem

!--- If you use the HTTP 1.0 server.

debug ip http authentication

debug aaa authentication

debug aaa authorization

debug radius

!--- If you use RADIUS.

debug tacacs

!--- If you use TACACS+.

Deze uitvoer toont een paar voorbeelden:

*Apr 23 13:12:16.871: TCB626DD444 created

*Apr 23 13:12:16.871: TCP0: state was LISTEN -> SYNRCVD [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:16.871: TCP0: Connection to 64.101.98.203:19662, received MSS 1460, MSS is 516

*Apr 23 13:12:16.875: TCP: sending SYN, seq 2078657456, ack 2459301798

*Apr 23 13:12:16.875: TCP0: Connection to 64.101.98.203:19662, advertising MSS 536

*Apr 23 13:12:16.899: TCP0: state was SYNRCVD -> ESTAB [80 -> 64.101.98.203(19662)]

!--- The TCP connection from the browser on 64.101.98.203 to the !--- local HTTP server is established.

*Apr 23 13:12:16.899: TCB62229100 accepting 626DD444 from 64.101.98.203.19662

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_PID (8) 626FEC84

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NO_DELAY (1) 626FEC88

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_WRITE (10) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_READ (14) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property unknown (15) 626FED14

*Apr 23 13:12:16.919: HTTP AAA Login-Authentication List name: HTTPauthen

*Apr 23 13:12:16.919: HTTP AAA Exec-Authorization List name: HTTPauthor

*Apr 23 13:12:16.919: AAA/AUTHEN/LOGIN (00000000): Pick method list 'HTTPauthen'

!--- Uses 'HTTPauthen' as the login authentication method.

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000): dropping service type,

"radius-server attribute 6 on-for-login-auth" is off

*Apr 23 13:12:16.919: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:16.919: RADIUS(00000000): sending

*Apr 23 13:12:16.919: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103 for

Radius-Server 10.1.2.3

*Apr 23 13:12:16.919: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645 id 1645/2, len 51

*Apr 23 13:12:16.919: RADIUS:  authenticator 5F 6E E6 C1 3E 40 5D E2 - FB AC E8 E8 E4 93 BA 98

*Apr 23 13:12:16.919: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:16.919: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:16.919: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

!--- Sent an Access-Request to the RADIUS server !--- at 10.1.2.3 using the username of "cisco".

*Apr 23 13:12:21.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:26.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:31.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:36.923: AAA/AUTHOR (0x0): Pick method list 'HTTPauthor'

*Apr 23 13:12:36.923: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:36.923: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:36.923: RADIUS(00000000): sending

*Apr 23 13:12:36.923: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103

for Radius-Server 10.1.2.3

*Apr 23 13:12:36.923: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645

id 1645/3, len 57

*Apr 23 13:12:36.927: RADIUS:  authenticator AA DB 63 E1 D4 BF 23 9E -

49 71 78 42 A5 A3 44 B8

*Apr 23 13:12:36.927: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:36.927: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:36.927: RADIUS:  Service-Type        [6]   6   Outbound     [5]

*Apr 23 13:12:36.927: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

*Apr 23 13:12:41.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:46.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:51.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:56.927: HTTP: Authentication failed for level 15

!--- Authentication has failed due to no response from the RADIUS server.

*Apr 23 13:12:56.927: TCB626DD444 shutdown writing

*Apr 23 13:12:56.927: TCP0: state was ESTAB -> FINWAIT1 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.927: TCP0: sending FIN

*Apr 23 13:12:56.967: TCP0: state was FINWAIT1 -> FINWAIT2 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.967: TCP0: FIN processed

*Apr 23 13:12:56.971: TCP0: state was FINWAIT2 -> TIMEWAIT [80 -> 64.101.98.203(19662)]

*Apr 23 13:13:10.227: TCP0: state was TIMEWAIT -> CLOSED [80 -> 64.101.98.203(16260)]

*Apr 23 13:13:10.227: TCB 0x626DCFA0 destroyed

!--- The TCP connection to the browser 64.101.93.203 is closed.

Gerelateerde informatie

- Terminal Access Control-systeem (TACACS+)

- Inbelservice voor externe verificatie (RADIUS)

- Verzoeken om opmerkingen (RFC’s)

- Technische ondersteuning en documentatie – Cisco Systems