Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Configureren

Netwerkdiagram

Configuraties

lokale router

Definitieve configuratie van lokale router

Definitieve configuratie externe router

Problemen oplossen

Inleiding

In dit document wordt een configuratie beschreven voor het instellen van een IPv6-routegebaseerde site-to-site tunnel tussen twee Cisco-routers met behulp van het protocol Internet Key Exchange versie 1 (IKEv1/ISAKMP).

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Fundamentele kennis van Cisco IOS®/Cisco IOS® XE CLI-configuratie

- Fundamentele kennis van Internet Security Association en Key Management Protocol (ISAKMP) en IPsec protocollen

- Inzicht in IPv6-adressering en -routering

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende softwareversies:

- Cisco IOS XE draait 17.03.04a als lokale router

- Cisco IOS met 17.03.04a als externe router

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Configureren

Netwerkdiagram

Configuraties

lokale router

Stap 1. IPv6 Unicast Routing inschakelen.

ipv6 unicast-routing

Stap 2. Configureer de routerinterfaces.

interface GigabitEthernet1

ipv6 address 2001:DB8:0:A::1/64

no shutdown

interface GigabitEthernet2

ipv6 address FC00::1/64

no shutdown

Stap 3. IPv6-standaardroute instellen.

ipv6 route ::/0 GigabitEthernet1

Stap 4. Fase 1-beleid configureren.

crypto isakmp policy 10

encryption aes

authentication pre-share

group 14

Stap 5. Configureer de sleutelhanger met een vooraf gedeelde sleutel.

crypto keyring IPV6_KEY

pre-shared-key address ipv6 2001:DB8:0:B::1/128 key cisco123

Stap 6. Het ISAKMP-profiel configureren.

crypto isakmp profile ISAKMP_PROFILE_LAB

keyring IPV6_KEY

match identity address ipv6 2001:DB8:0:B::1/128

Stap 7. Configureer het Fase 2-beleid.

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

Stap 8. Configureer het IPsec-profiel.

crypto ipsec profile Prof1

set transform-set ESP-AES-SHA

Stap 9. De tunnelinterface configureren.

interface Tunnel0

no ip address

ipv6 address 2012::1/64

ipv6 enable

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:0:B::1

tunnel protection ipsec profile Prof1

end

Stap 10. Configureer de routes voor het interessante verkeer.

ipv6 route FC00::/64 2012::1

Definitieve configuratie van lokale router

ipv6 unicast-routing

!

interface GigabitEthernet1

ipv6 address 2001:DB8:0:A::1/64

no shutdown

!

interface GigabitEthernet2

ipv6 address FC00::1/64

no shutdown

!

ipv6 route ::/0 GigabitEthernet1

!

crypto isakmp policy 10

encryption aes

authentication pre-share

group 14

!

crypto keyring IPV6_KEY

pre-shared-key address ipv6 2001:DB8:0:B::1/128 key cisco123

!

crypto isakmp profile ISAKMP_PROFILE_LAB

keyring IPV6_KEY

match identity address ipv6 2001:DB8:0:B::1/128

!

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

!

crypto ipsec profile Prof1

set transform-set ESP-AES-SHA

!

interface Tunnel0

no ip address

ipv6 address 2012::1/64

ipv6 enable

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:0:B::1

tunnel protection ipsec profile Prof1

end

!

ipv6 route FC00::/64 2012::1

Definitieve configuratie externe router

ipv6 unicast-routing

!

interface GigabitEthernet1

ipv6 address 2001:DB8:0:B::1/64

no shutdown

!

interface GigabitEthernet2

ipv6 address FC01::1/64

no shutdown

!

ipv6 route ::/0 GigabitEthernet1

!

crypto isakmp policy 10

encryption aes

authentication pre-share

group 14

!

crypto keyring IPV6_KEY

pre-shared-key address ipv6 2001:DB8:0:A::1/128 key cisco123

!

crypto isakmp profile ISAKMP_PROFILE_LAB

keyring IPV6_KEY

match identity address ipv6 2001:DB8:0:A::1/128

!

crypto ipsec transform-set ESP-AES-SHA esp-aes esp-sha-hmac

mode tunnel

!

crypto ipsec profile Prof1

set transform-set ESP-AES-SHA

!

interface Tunnel0

no ip address

ipv6 address 2012::2/64

ipv6 enable

tunnel source GigabitEthernet1

tunnel mode ipsec ipv6

tunnel destination 2001:DB8:0:A::1

tunnel protection ipsec profile Prof1

end

!

ipv6 route FC00::/64 2012::1

Problemen oplossen

Om problemen met de tunnel op te lossen, gebruikt u de foutopsporingsopdrachten:

- debug crypto isakmp

- Fout bij foutopsporing van cryptografische fout

- debug crypto ipsec

- Fout bij foutopsporing Crypto IPSec