Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrondinformatie

Concepten

Configureren

UTD verwijderen

Voorcontrole

Configuraties

Verifiëren

Configureren

Installeer UTD

Voorcontrole

Configuraties

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document beschrijft de procedure voor het installeren en verwijderen van Unified Threat Defense (UTD) via CLI op SDWAN-routers.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Cisco softwaregedefinieerde Wide Area Network (SD-WAN)

- Cisco IOS® XE Command Line Interface (CLI)

Gebruikte componenten

Dit document is gebaseerd op deze software- en hardwareversies:

- Router ISR461/K9

- Software versie 17.3.4

- Router in controllermodus

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Achtergrondinformatie

Deze stappen moeten worden toegepast wanneer de cedge zich in de CLI-modus bevindt of wanneer er geen bedieningsverbinding tussen vManager en cedge is.

Maar als u een besturingsplane hebt en uw cedge in vManager-modus staat, ga dan verder om dit andere artikel te bekijken.

Concepten

Specifieke eisen voor dit document zijn onder meer:

- Cisco vManager release 20.3 of hoger.

- Cisco geïntegreerde services routers 4431 release 17.3.4

Ga voor meer informatie over ondersteunde platforms naar UTD voor door SDWAN ondersteunde platforms en beperkingen.

Configureren

UTD verwijderen

Voorcontrole

Dit is een voorbeeld van hoe cedge router eruit ziet als eerdere UTD-desinstallatie.

* Het apparaat is op Controllerwijze en geen Malplaatje is in bijlage maar de configuratie UTD wordt toegepast.

cedge#show sdwan system

Viptela (tm) vEdge Operating System Software

Copyright (c) 2013-2022 by Viptela, Inc.

Controller Compatibility: 20.3

Version: 17.03.04a.0.5574

Build: Not applicable

Model name: ISR4461/K9 Services: None vManaged: false Commit pending: false Configuration template: None cedge#show platform software device-mode Device Operating-mode: Controller-Managed cedge#show run | sec utd utd multi-tenancy utd engine standard multi-tenancy threat-inspection whitelist profile Sig-white-list generator id 3 signature id 22089 generator id 3 signature id 36208 threat-inspection profile IPS-POLICY threat detection policy balanced logging level alert whitelist profile Sig-white-list policy utd-policy-vrf-1 vrf 511 all-interfaces threat-inspection profile IPS-POLICY app-hosting appid utd app-vnic gateway0 virtualportgroup 0 guest-interface 0 guest-ipaddress 192.168.1.2 netmask 255.255.255.252 app-vnic gateway1 virtualportgroup 1 guest-interface 1 guest-ipaddress 192.0.2.2 netmask 255.255.255.252 app-resource package-profile urlf-low start cedge# cedge#show running-config | section VirtualPortGroup0 interface VirtualPortGroup0 description Management interface vrf forwarding 65529 ip address 192.168.1.1 255.255.255.252 no mop enabled no mop sysid cedge#show running-config | section VirtualPortGroup1 interface VirtualPortGroup1 description Data interface ip address 192.0.2.1 255.255.255.252 no mop enabled no mop sysid cedge#

Opmerking: UTD-configuratie moet eerst worden verwijderd voordat het kan worden verwijderd.

Configuraties

1. Stop de UTD-service.

cedge#config-transaction

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no start

cedge(config-app-hosting)# commit

Commit complete.

Opmerking: de UTD-status verandert van Running naar Implementatie zodra geen start wordt toegepast.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#

2. Verwijder de UTD-configuratie.

cedge#config-transaction

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no policy utd-policy-vrf-1

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge#config-transaction

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no threat-inspection whitelist profile Sig-white-list

cedge(config-utd-multi-tenancy)# no threat-inspection profile IPS-POLICY

cedge(config-utd-multi-tenancy)# exit

cedge(config)# commit

Commit complete.

cedge(config)# no utd engine standard multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge#config-transaction

cedge(config)# no utd multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting)# no app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting)# no app-resource package-profile urlf-low

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#exit

cedge(config)# no app-hosting appid utd

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no interface VirtualPortGroup0

cedge(config)# no interface VirtualPortGroup1

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no iox

cedge(config)# commit

Commit complete.

cedge(config)#

3. Validering.

Dit is een voorbeeld van hoe cedge router eruit ziet nadat UTD-configuratie is verwijderd.

cedge#show running-config | section iox

cedge#show running-config | section VirtualPortGroup0

cedge#show running-config | section VirtualPortGroup1

cedge#show running-config | section utd

cedge#

cedge#show platform software utd global

UTD Global state

=========================

Engine : Standard

Global Inspection : Disabled

Operational Mode : Intrusion Detection

Fail Policy : Fail-open

Container technology : LXC

Redirect interface : Not specified

UTD interfaces

No interfaces are protected by UTD

<snipped>

Opmerking: ook al is de configuratie verwijderd, de UTD toont geïnstalleerd. Dit wordt verwacht.

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 0

<snipped>

cedge#show app-hosting list

The process for the command is not responding or is otherwise unavailable   >>>> Expected because UTD config was removed but UTD engine remains installed

** Before to remove Configuration **

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3

** After configuration is removed **

cedge#

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None

4. Verwijder de UTD-engine.

Tip: Je moet jox en app-hosting applicatie utd geactiveerd hebben om UTD engine te verwijderen.

Hier is een voorbeeld van wat gebeurt als UTD wordt verwijderd zonder iox en app-hosting activering.

cedge#app-hosting uninstall appid utd    >>>> No action is taken.

cedge#

Dit is een voorbeeld om UTD succesvol te verwijderen.

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

cedge#app-hosting uninstall appid utd

Uninstalling 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 20:26:31.653: %VIRT_SERVICE-5-INSTALL_STATE: Successfully uninstalled virtual service utd

*Mar 3 20:26:32.706: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Uninstall succeeded: utd uninstalled successfully

cedge#

Verifiëren

Voer de volgende opdrachten uit om te controleren of de UTD is verwijderd.

cedge#show app-hosting list

No App found

cedge#show virtual-service version name utd running

% Error: Virtual-service utd is not found

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 0

Total virtual services activated : 0

<snipped>

Configureren

Installeer UTD

Voorcontrole

Beoordeel UTD ondersteunde versie en download het in bootflash.

cedge#

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#

cedge#dir bootflash: | i utd

36 -rw- 55050240 Mar 1 2022 01:08:29 +00:00 secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

cedge#

Configuraties

1. Activeer jox en app-hosting.

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

2. Installeer de UTD-engine.

cedge#app-hosting install appid utd package bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

Installing package 'bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 21:07:43.529: %VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: R0/0: vman: Package 'secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for service container 'utd' is 'Cisco signed', signing level cached on original install is 'Cisco signed'

*Mar 3 21:07:56.332: %VIRT_SERVICE-5-INSTALL_STATE: Successfully installed virtual service utd

*Mar 3 21:07:56.922: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Install succeeded: utd installed successfully Current state is deployed

cedge#

3. Controleer of de UTD-motor is geïnstalleerd. Voer de volgende opdrachten uit.

Opmerking: uitgerold staat betekent geïnstalleerd maar niet geconfigureerd UTD. Onder actieve toestand wordt verstaan: UTD geïnstalleerd en geconfigureerd.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None >>>> "None", it is expected due to the fact that no config yet

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3 >>>> UTD Package installed

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1 >>>> Installed 1 but Activated 0 as expected

Total virtual services activated : 0

4. Ga verder met het configureren van IPS/URL om UTD in actieve staat te hebben. Dit is een voorbeeld uit het lab.

cedge#config-transaction

cedge(config)# interface VirtualPortGroup0

cedge(config-if)# description Management interface

cedge(config-if)# vrf forwarding 65529

cedge(config-if)# ip address 192.168.1.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# interface VirtualPortGroup1

cedge(config-if)# description Data interface

cedge(config-if)# ip address 192.168.2.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.1.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.2.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-resource package-profile urlf-low

cedge(config-app-hosting)# start

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

cedge(config-app-hosting)# exit

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# threat-inspection whitelist profile Sig-white-list

cedge(config-utd-mt-whitelist)# generator id 3 signature id 22089

cedge(config-utd-mt-whitelist)# generator id 3 signature id 36208

cedge(config-utd-mt-whitelist)# exit

cedge(config-utd-multi-tenancy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-threat)# threat detection

cedge(config-utd-mt-threat)# policy balanced

cedge(config-utd-mt-threat)# whitelist profile Sig-white-list

cedge(config-utd-mt-threat)# logging level alert

cedge(config-utd-mt-threat)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# policy utd-policy-vrf-1

cedge(config-utd-mt-policy)# vrf 511

cedge(config-utd-mt-policy)# all-interfaces

cedge(config-utd-mt-policy)# fail close

cedge(config-utd-mt-policy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-policy)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# end

cedge#

5. Controleer of de configuratie is voltooid.

cedge#show run | section utd

utd multi-tenancy

utd engine standard multi-tenancy

threat-inspection whitelist profile Sig-white-list

generator id 3 signature id 22089

generator id 3 signature id 36208

threat-inspection profile IPS-POLICY

threat detection

policy balanced

logging level alert

whitelist profile Sig-white-list

policy utd-policy-vrf-1

vrf 511

all-interfaces

threat-inspection profile IPS-POLICY

fail close

app-hosting appid utd

app-vnic gateway0 virtualportgroup 0 guest-interface 0

guest-ipaddress 192.168.1.2 netmask 255.255.255.252

app-vnic gateway1 virtualportgroup 1 guest-interface 1

guest-ipaddress 192.168.2.2 netmask 255.255.255.252

app-resource package-profile urlf-low

start

cedge#

Verifiëren

1. Start show logging en zorg ervoor dat je soortgelijke logbestanden hebt zoals hieronder wordt getoond.

*Mar 3 23:17:17.573: %LINK-3-UPDOWN: Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:18.094: %LINK-3-UPDOWN: Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:18.572: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:19.095: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:25.630: %LINEPROTO-5-UPDOWN: Line protocol on Interface Tunnel2000000001, changed state to up

*Mar 3 23:19:36.863: %VIRT_SERVICE-5-ACTIVATION_STATE: Successfully activated virtual service utd

*Mar 3 23:19:37.577: %IM-6-START_MSG: R0/0: ioxman: app-hosting: Start succeeded: utd started successfully Current state is running

*Mar 3 23:19:38.318: %ONEP_BASE-6-CONNECT: [Element]: ONEP session Application:utd_snort Host:cedge ID:6633 User: has connected.

*Mar 3 23:19:50.428: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has started

*Mar 3 23:20:06.460: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has completed

*Mar 3 23:20:08.389: %IOSXE-5-PLATFORM: R0/0: cpp_cp: QFP:0.0 Thread:011 TS:00000780131568867961 %SDVT-5-SDVT_HEALTH_UP: Service node is up for channel Threat Defense. Current Health: Green, Previous Health: Down

Opmerking: de huidige status verandert van Down naar Green als de configuratie met succes is uitgevoerd.

2. Voer deze opdrachten uit om de UTD-installatie te controleren.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      RUNNING   >>> State change from Deployed to Running

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3 >>>> Changed from NONE to "1.0.16_SV2.9.16.1_XE17.3" after config.

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 1 >>>>>>>>> Now it is activated

cedge#show virtual-service version name utd running Virtual service utd running version: Name : UTD-Snort-Feature Version : 1.0.16_SV2.9.16.1_XE17.3

Problemen oplossen

Deze sectie bevat informatie waarmee u problemen met de configuratie kunt oplossen.

Handige opdrachten

show platform software device-mode

show app-hosting list

show virtual-service version name utd running

show utd engine standard version

show utd engine standard status

show virtual-service

Gerelateerde informatie

- Security Configuration Guide: Unified Threat Defense, Cisco IOS XE 17

- Security Configuration Guide: Unified Threat Defense, Cisco IOS XE 16

- UTD voor door SDWAN ondersteunde platforms en beperkingen.

- Installeer UTD met vManager.