Inhoud

Inleiding

Achtergrond

Optica

Interface

Poortsnelheid

Mechanisme voor foutsignalering

DWDM instelbare glasvezelkaart

IPoDWDM - samenhangende DSP

Gedetailleerde probleemoplossing

Eerste dingen om te controleren

Alarmen

Optische controllers tonen

Samenhangende DSP

PHY-controllers tonen

NPU

Samenvatting

Logbestanden verzamelen

Inleiding

Dit document beschrijft hoe u problemen met de interface of de flap-problemen kunt oplossen.

Dit document is specifiek voor Cisco IOS®XR, maar is niet beperkt tot een specifieke softwarerelease.

Dit document is specifiek voor het NCS-platform.

Achtergrond

Er zijn meerdere redenen waarom interface down, of interface flap kan gebeuren. De koppelingen kunnen naar beneden gaan vanwege meerdere apparaten zoals in afbeelding 1. Het toont een NCS router met één voorpaneelpoort aangesloten op de NPU (Network Processor Unit) via PHY (Physical Layer) apparaat ertussen (bekend als op PHY gebaseerde poorten). Er zijn platformen waar de poorten aan het voorpaneel rechtstreeks zijn aangesloten op de NPU (bekend als PHYless-poorten). Een enkele router kan beide varianten hebben.

Afbeelding 1

Optica

Interface

Merk op dat een interface altijd op deze manier op Cisco IOS XR wordt beschreven.

R/S/I/P: rack/sleuf/instantie/poort/uitbraak

R/S/I/P/B: rack/sleuf/instantie/poort

Poortsnelheid

Sommige platformen/lijnkaarten ondersteunen meerdere snelheden op sommige poorten. Voorbeelden zijn: 1/10GE, 25/40GE, 40/100GE, 1/10/25GE.

De snelheid kan op elke individuele poort of per groep poorten worden ingesteld. Bekijk de hardwarematige documentatie voor de poorttoewijzing op de NCS. Controleer of de poortsnelheid correct is ingesteld. Sommige poorten kunnen de snelheid automatisch detecteren, andere moeten worden geconfigureerd.

Sommige poorten kunnen per groep worden geconfigureerd (meestal een quad: een groep van vier).

Voorbeeld:

(config)#hw-module quad 0 location 0/0/CPU0 mode ?

WORD  10g or 25g

Sommige poorten kunnen afzonderlijk worden geconfigureerd. Dit zijn meestal de 100G poorten. 100G is de standaardsnelheid, maar u kunt 40G configureren.

Voorbeeld:

(config)#controller optics 0/0/1/0

(config-Optics)#speed 40g

Mechanisme voor foutsignalering

Merk op dat een Link Fault Signaling mechanisme een rol kan spelen bij het oplossen van problemen met de interface. Op 10G en hoger, is er Link Fault Signaling mechanisme inbegrepen in de PHY-laag. Dus wanneer een lokale fout wordt gedetecteerd, wordt de afstandsbediening geïnformeerd.

Afbeelding 2

Op de GigE interface is er geen dergelijk boordmechanisme. Controleer of "ethernetarm" als alternatief is geconfigureerd.

Voorbeeld:

interface GigabitEthernet0/6/0/2

ethernet oam

uni-directional link-fault detection

action

uni-directional link-fault efd

DWDM instelbare glasvezelkaart

Op een DWDM-glasvezelkaart die frequentieafstemming ondersteunt, gebruikt u dit om de frequentie in te stellen die kan worden gebruikt (gebaseerd op de instelling van een DWDM-circuit door de leverancier van het circuit):

Dit is de opdracht:

controller optics 0/6/0/2

dwdm-carrier {100MHz-grid | 50GHz-grid} frequency {frequency}

Controleer de instellingen:

RP/0/RP0/CPU0:NCS-5508#show controllers optics 0/6/0/2 dwdm-carrier-map

DWDM Carrier Band:: OPTICS_C_BAND

MSA ITU channel range supported: 1~96

DWDM Carrier Map table

----------------------------------------------------

ITU Ch      G.694.1     Frequency     Wavelength

Num        Ch Num        (THz)          (nm)

----------------------------------------------------

1       -35           191.35      1566.723

----------------------------------------------------

2       -34           191.40      1566.314

----------------------------------------------------

3       -33           191.45      1565.905

----------------------------------------------------

4       -32           191.50      1565.496

----------------------------------------------------

...

----------------------------------------------------

95        59           196.05      1529.163

----------------------------------------------------

96        60           196.10      1528.773

----------------------------------------------------

Op DWDM-glasvezelkabels wordt alle DWDM-specifieke afstemming uitgevoerd onder controller-DWDM-configuratie:

RP/0/RP0/CPU0:NCS-5508(config)#controller dwdm 0/6/0/2 ?

admin-state       Configure the transport admin state of the controller: in-service, out-of-service or maintenance

g709              Configure G709 parameters

laser             To be deprecated and removed in 7.5.1 release

log               Proactive log

loopback          Configure loopback mode

network           Configure DWDM network information

pm                Configure pm parameters

proactive         Enable Proactive Protection Feature

rx-los-threshold  Configure transponder receive power LOS threshold

transmit-power    Configure transponder transmit power

vtxp-monitor      Enable VTXP monitoring function

wavelength        Configure ITU Channel, Wavelength and Frequency

<cr>

RP/0/RP0/CPU0:NCS-5508(config-dwdm)#g709 fec ?

15sdfec                       15%-SD Forward Error Correction

15sdfecde                     15%-SD Forward Error Correction with Diff

ci-bch                        Continuously Interleaved BCH FEC

disable                       Disable FEC

enhanced                      Enhanced FEC mode

high-gain                     To be deprecated and removed in 7.5.1 release

high-gain-hd-fec              7% HD FEC (Staircase FEC)

high-gain-multivendor-hd-fec  7% HD FEC (Staircase FEC) Multivendor Interoperable

high-gain-sd-fec              7% CISCO SD FEC (Soft-Decision FEC)

long-haul                     To be deprecated and removed in 7.5.1 release

long-haul-hd-fec              20% HD FEC (Staircase FEC)

long-haul-sd-fec              20% CISCO SD FEC (Soft-Decision FEC)

standard                      Standard FEC mode

IPoDWDM - samenhangende DSP

Coherent DSP ondersteunt hoge snelheid (100/200/400G) over lange afstanden. De DWDM-verwerking wordt verwerkt door Coherent DSP (Digital Signal Processor).

Voorbeelden van dergelijke NCS-modules: NC55-6X200-DWDM-S of NC55-MPA-2TH-S (met CFP2-WDM-D-1HL)

RP/0/RP0/CPU0:NCS-5508(config)# controller coherentDSP 0/6/0/0

RP/0/RP0/CPU0:NCS-5508(config-CoDSP)#fec ?

CFEC                 Forward Error Correction C_FEC

EnhancedHG20         Forward Error Correction Enhanced_HG20

EnhancedHG7          Forward Error Correction Enhanced_HG7

EnhancedI4           Forward Error Correction Enhanced_I_4

EnhancedI7           Forward Error Correction Enhanced_I_7

EnhancedSD15         Forward Error Correction Soft-Decision 15

EnhancedSD15DE       Forward Error Correction Soft-Decision 15 with DE

EnhancedSD20         Forward Error Correction Soft-Decision 20

EnhancedSD27         Forward Error Correction Soft-Decision 27

EnhancedSD7          Forward Error Correction Soft-Decision 7

EnhancedStaircaseDE  Forward Error Correction Enhanced Staircase FEC with DE

EnhancedSwizzle      Forward Error Correction Enhanced_Swizzle

OFEC                 Forward Error Correction O_FEC

Standard             Forward Error Correction Standard

none                 No Forward Error Correction

Gedetailleerde probleemoplossing

In deze sectie worden de basis debugging/technieken vanuit optisch perspectief besproken.

Eerste dingen om te controleren

Controleer of de optiek in de inventaris staat. Als de optiek niet wordt weergegeven, controleert u of de optiek goed is geplaatst in de R/S/I/P en of er geen problemen zijn met de kabels.

++++++++++ show inventory details [18:06:56.572 UTC Thu Apr 06 2023] ++++++++++

NAME: "0/RP0", DESCR: "NC55A1 24Q6H SS Route Processor Card"

PID: NCS-55A1-24Q6H-SS , VID: V01, SN: FOC2528002Q

MFG_NAME: Cisco Systems, Inc., SNMP_IDX: 1 , Type: Module

PN: 73-20057-02

NAME: "TenGigE0/0/0/0", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N1T

MFG_NAME: CISCO-PRE , SNMP_IDX: 2129921 , Type: Module

PN: TSFP10G-1558.17

NAME: "TenGigE0/0/0/1", DESCR: "Cisco SFP+ 10G ZR Pluggable Optics Module"

PID: SFP-10G-ZR , VID: V02, SN: BD211218N3K

MFG_NAME: CISCO-PRE , SNMP_IDX: 2134017 , Type: Module

PN: TSFP10G-1557.36

RP/0/RP0/CPU0:NCS-5501#show controllers te0/0/0/14 internal

Internal data for interface: TenGigE0/0/0/14

Subport Number      : 255

Port Number         : 14 *

Bay Number          : 0 *

Board Type          : 0x60020201 *

Port Type           : 10GE *

Bandwidth(Kbps)     : 10000000 *

Transport mode      : LAN *

BIA MAC addr        : 008a:9617:4838

Oper. MAC addr      : 008a:9617:4838

Egress MAC addr     : 008a:9617:4838

Port Available      : true *

Status polling is   : disabled *

Status events are   : disabled

I/F Handle          : 0x00000158 *

Cfg Link Enabled    : enabled

H/W Tx Enable       : yes

MTU                 : 1514 *

H/W Speed           : 10 Gbps *

H/W Duplex          : Full *

H/W Loopback Type   : None *

FEC                 : Not Configured *

H/W FlowCtrl Type   : Disabled *

H/W AutoNeg Enable  : Off *

H/W Link Defects    : No Fault *

Link Up             : yes *

Link Led Status     : Green ON *

Pluggable Present   : Yes *

Pluggable Type      : SFP+ 10G CU3M

Pluggable PID       : SFP-H10GB-CU3M *

Pluggable Compl.    : Failed - Bad Vendor CRC

Als de transceiver niet wordt herkend, controleer of het transceivertype hier wordt ondersteund: https://tmgmatrix.cisco.com/.

De CRC van de verkoper zou correct moeten zijn.

Controleer de signaalsterkte.

Vereist DOM (Digital Optical Monitoring) ondersteuning op de transceiver!

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers hundredGigE0/0/0/10 phy

QSFP8636 EEPROM port: 10

Xcvr Type: QSFP28

Ext Type: 3.5W, CLEI, TX CDR, RX CDR,

Connector Type: MPO

Ethernet Compliance Codes: 100G BASE-SR4,

BR, nominal: 25500 Mbps

Length SMF: 0KM, OM3: 70M, OM2: 0M, OM1: 0M, Cable: 50M

Deice Tech: 850nm VCSEL,

Vendor Name: CISCO-FINISAR

Vendor OUI: 00.90.65

Vendor Part Number: FTLC9555REPM-C1   (rev.: A )

Wavelength: 850.000 nm

Wavelength Tolerance: 10.000 nm

Vendor Serial Number: FIW2638016W

Date Code (yy/mm/dd): 22/09/13  lot code:

Diagnostic Monitoring Type: RX Avg, TX,

Enhanced Options: Init Complete Flag Impl,

Extended Module Codes:

Options:

L-Tx/Rx LOS:

L-Tx Fault:

L-Tx/Rx LOL:

Module DDM: Volt, Temp, TX Power, TX Bias, RX Power,

MSA Data (Lower Memory)

0x0000: 11 07 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 00 1d 75 : 00 00 81 2f 00 00 00 00

0x0020: 00 00 20 b6 2e 9a 2d ba : 27 44 0d ed 0e 0c 0e 0c

0x0030: 0e 0c 28 46 2a dc 29 1f : 2a 72 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 01 00 00

0x0060: 00 00 ff 00 00 00 00 00 : 00 01 1f 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data (Upper Memory Page 00)

0x0080: 11 dc 0c 80 00 00 00 00 : 00 00 00 05 ff 00 00 23

0x0090: 00 00 32 00 43 49 53 43 : 4f 2d 46 49 4e 49 53 41

0x00a0: 52 20 20 20 00 00 90 65 : 46 54 4c 43 39 35 35 35

0x00b0: 52 45 50 4d 2d 43 31 20 : 41 20 42 68 07 d0 46 ef

0x00c0: 02 07 ff f6 46 49 57 32 : 36 33 38 30 31 36 57 20

0x00d0: 20 20 20 20 32 32 30 39 : 31 33 20 20 0c 10 68 3a

0x00e0: 00 00 02 3c c0 ff c6 b6 : 3b 05 e6 30 86 bb 80 05

0x00f0: df 65 71 00 00 00 00 00 : 00 00 00 00 79 eb c1 06

CLEI Code: CMUIATKCAA

Part Number: FTLC9555REPM-C1 (ver.: V03)

Product Id: QSFP-100G-SR4-S

MSA Data (Upper Memory Page 02)

0x0180: 43 4d 55 49 41 54 4b 43 : 41 41 31 30 2d 33 31 34

0x0190: 32 2d 30 33 56 30 33 20 : 01 00 00 31 20 20 20 20

0x01a0: 20 66 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x01b0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 aa aa

0x01c0: 51 53 46 50 2d 31 30 30 : 47 2d 53 52 34 2d 53 20

0x01d0: 20 20 20 20 00 00 00 00 : 00 00 00 00 00 00 00 65

0x01e0: 31 33 33 39 39 37 31 36 : 31 d8 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

Module

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Temperature:            +75.000 C             +70.000 C              +0.000 C              -5.000 C

Voltage:           3.630 Volt            3.465 Volt            3.135 Volt            2.970 Volt

Temperature: +29.457 C

Voltage: 3.315 Volt

Lanes

Thresholds:                   Alarm High          Warning High          Warning Low          Alarm Low

Bias:         15.000 mAmps          14.000 mAmps           3.000 mAmps           2.000 mAmps

Transmit Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.14450 mW (-8.40132 dBm)   0.05750 mW (-12.40332 dBm)

Receive Power:  3.46740 mW (5.40004 dBm)   1.73780 mW (2.40000 dBm)   0.09330 mW (-10.30118 dBm)   0.03720 mW (-14.29457 dBm)

TxRxIOMagId:

RxOpAmpSupprt:

Lane            Temp            Bias                   Tx Power                   Rx Power

0             N/A     7.130 mAmps   1.03100 mW (0.13259 dBm)   1.18990 mW (0.75510 dBm)

1             N/A     7.192 mAmps   1.09760 mW (0.40444 dBm)   1.19300 mW (0.76640 dBm)

2             N/A     7.192 mAmps   1.05440 mW (0.23005 dBm)   1.17110 mW (0.68594 dBm)

3             N/A     7.192 mAmps   1.08020 mW (0.33504 dBm)   1.00480 mW (0.02080 dBm)

MSA Data (Upper Memory Page 03)

0x0200: 4b 00 fb 00 46 00 00 00 : 00 00 00 00 00 00 00 00

0x0210: 8d cc 74 04 87 5a 7a 76 : 00 00 00 00 00 00 00 00

0x0220: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0230: 87 72 01 74 43 e2 03 a5 : 1d 4c 03 e8 1b 58 05 dc

0x0240: 87 72 02 3f 43 e2 05 a5 : 00 00 00 00 00 00 00 00

0x0250: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0260: a6 0f 00 00 00 00 00 00 : 00 00 66 66 00 00 33 33

0x0270: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

Gebruik deze opdracht om te controleren op problemen.

RP/0/RP0/CPU0:BRU-SPCORE-P2#show controllers optics 0/0/0/10 summary

Port                Controller State        Admin State            LED State         Lane   Laser Bias   TX Power     RX Power     Wavelength     Optics Type       Description

(dBm)        (dBm)        (nm)

------------------  ----------------------  ---------------------  ----------------  -----  ------------ -----------  ----------   -----------    --------------    -----------

Optics 0/0/0/10     Up                      In Service             Green             0      7.1mA        0.12         0.75         850.00         QSFP28-100G-SR4

1      7.2mA        0.41         0.75

2      7.2mA        0.22         0.69

3      7.2mA        0.31         0.02

Alarmen

Controleer de alarmen op onderwerp-items.

RP/0/RP0/CPU0:NCS#show alarms brief

--------------------------------------------------------------------------------

Active Alarms for 0/0

--------------------------------------------------------------------------------

Location        Severity     Group            Set Time                   Description

--------------------------------------------------------------------------------

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOS LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-0 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-1 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-2 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX LOL LANE-3 ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW ALARM

0/0/CPU0        Major        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW ALARM

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-0 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-1 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-2 LOW WARNING

0/0/CPU0        Minor        Software         04/26/2023 15:50:19 CEST    Optics0/0/0/35 - hw_optics:  RX POWER LANE-3 LOW WARNING

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics:  OPTICS Module is not supported on this port

0/0/CPU0        Major        Software         05/02/2023 11:18:17 CEST    Optics0/0/0/26 - hw_optics: Port speed not supported on the optics

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-0 ALARM

0/0/CPU0        Major        Software         05/02/2023 11:18:23 CEST    Optics0/0/0/26 - hw_optics:  RX LOS LANE-1 ALARM

…

Optische controllers tonen

Controleer of SFP/QSFP wordt gedetecteerd met de opdracht "toon controller optica <r/s/i/p>".

Controleer dit:

- Controleer of de ingebrachte optica goed wordt weergegeven (controleer de PID en VID).

- Controleer of de laser is ingeschakeld.

- Controleer of de stroomniveaus goed zijn.

- Controleer of er alarm-/storingen zijn.

Dit is voorbeelduitvoer als de optiek wordt gedetecteerd en in bedrijf is.

Controleren of de "controllerstatus" is omhoog of omlaag.

Controleer of de laserstatus aan of uit is. De status Off wordt gezien wanneer de interface wordt gesloten. Als dit niet het geval is, verzamel dit:

- toon tech-support optica

- laat technische ondersteuning van een

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/12

Controller State: Up

Transport Admin State: In Service

Laser State: Off

Controleer de LED-status. De status Off wordt weergegeven wanneer de interface wordt uitgeschakeld. Wanneer de interface niet wordt afgesloten, kan de status donkergeel of donkergroen zijn.

Als er sprake is van poortuitbraak: als zelfs één subport omhoog is, tonen alle subports groen. Als ten minste één subpoort is ingesteld (niet gesloten), zijn alle subpoorten geel. Als alle subpoorten zijn uitgeschakeld (afsluiten), is de LED uit.

Controleer de FEC-status. Het is mogelijk dat sommige platformtypes FEC hebben uitgeschakeld. Dan wordt het FEC-onderdeel niet weergegeven.Als FEC op PHY is ingeschakeld, dient het de PHY FEC-status en niet de NPU te tonen. Als de FEC-status niet correct is, controleert u de FEC-status in "Show controller <speed> <r/s/i/p>".

Lees dit artikel voor meer informatie over FEC: Inzicht in FEC en de implementatie ervan in Cisco Optics

Download deze tabel voor meer informatie over FEC-typen voor elk Cisco-optisch systeem: https://www.cisco.com/c/dam/en/us/products/se/2022/4/Collateral/fec-summary-table.pdf

Controleer of er alarm is gegenereerd naast "Gedetecteerd alarm". In het geval van Link Problemen, controleer of er RX-LOS/RX-LOL/TX-LOS/TX-LOL alarmen worden weergegeven hier of in "Toon alarmen overzicht/geschiedenis" voor de interface en tijdstempel wanneer de link knippert. Controleer bij RX-alarmen of de peer TX-alarmen heeft. Als de peer alarmen TX heeft, ga dan naar de volgende stap. Als er geen peer TX-alarmen zijn, probeer dan de kabel en/of het pluggable item opnieuw aan te sluiten. Probeer ze indien nodig te vervangen door een andere.

Controleer de TX-voeding. Als de poort naar verwachting omhoog is, maar -40 Tx vermogen heeft, ga dan naar de volgende stap. Controleer de voeding van de RX. Als de poort wordt verwacht omhoog te zijn, maar het heeft -40dBm Rx voeding, controleer of de peer TX alarmen heeft. Als de peer geen TX-alarmen heeft, probeer dan de kabel en/of het pluggable item opnieuw aan te sluiten. Probeer ze indien nodig te vervangen door een andere.

RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable

RX Power = Unavailable

LED State: Off

FEC State: FEC ENABLED

Optics Status

Optics Type: SFP28 25G SR-S

Wavelength = 850.00 nm

Alarm Status:

-------------

Detected Alarms: None

LOS/LOL/Fault Status:

Laser Bias Current = 0.0 mA Actual

TX Power = -40.00 dBm

RX Power = -0.93

Performance Monitoring: Disable

THRESHOLD VALUES

----------------

Parameter                           High Alarm  Low Alarm  High Warning  Low Warning

------------------------            ----------  ---------  ------------  -----------

Rx Power Threshold(dBm)                 5.4       -14.2              2.3       -10.3

Tx Power Threshold(dBm)                 5.4       -12.4              2.3        -8.4

LBC Threshold(mA)                     10.00        2.00             8.00         3.00

Temp. Threshold(celsius)              75.00       -5.00            70.00         0.00

Voltage Threshold(volt)                3.63        2.97             3.46         3.13

Polarization parameters not supported by optics

Temperature = 28.00 Celsius               Voltage = 3.28 V

Transceiver Vendor Details

Form Factor              : SFP28

Optics type              : SFP28 25G SR-S

Name                      : CISCO-AVAGO

OUI Number               : 00.17.6a

Part Number              : SFBR-725SMZ-CS1

Rev Number               : 01

Serial Number            : AVD2227E1FU

PID                       : SFP-25G-SR-S

VID                       : V01

Date Code(yy/mm/dd) : 18/07/07

Dit is voorbeelduitvoer als de optiek niet wordt gedetecteerd of niet in bedrijf is.

RP/0/RP0/CPU0:ios# RP/0/RP0/CPU0:ios#show controllers optics 0/0/0/13

UTC Controller State: Down

Transport Admin State: In Service

Laser State: Off

Optics not present

Optics Type: Unavailable

DWDM Carrier Info: Unavailable, MSA ITU Channel= Unavailable, Frequency= Unavailable , Wavelength= Unavailable

TX Power = Unavailable          RX Power = Unavailable

Samenhangende DSP

Als de link naar beneden is voor QDD-400G-ZR-S / QDD-400G-ZRP-S, samen met een verificatie van de alarmen en gegevens van "toon controller optica", controleer dan op alarmen in "toon controller coherente DSP <R/S/I/P>".

RP/0/RP0/CPU0:ios#show controllers coherentDSP 0/0/1/0

Port : CoherentDSP 0/0/1/0

Controller State : Up

Inherited Secondary State : Normal

Configured Secondary State : Normal

Derived State : In Service

Loopback mode : None

BER Thresholds : SF = 1.0E-5 SD = 1.0E-7

Performance Monitoring : Enable

Bandwidth : 400.0Gb/s

Alarm Information:LOS = 0 LOF = 0 LOM = 0

OOF = 0 OOM = 0 AIS = 0IAE = 0 B

IAE = 0 SF_BER = 0

SD_BER = 0 BDI = 0 TIM = 0

FECMISMATCH = 0 FEC-UNC = 0 FLEXO_GIDM = 0

FLEXO-MM = 0 FLEXO-LOM = 0 FLEXO-RDI = 0

FLEXO-LOF = 0

Detected Alarms : None

Als LOS/LOF/BER wordt gezien, controleer dan de vezelverbinding, de verre eindTX waarden, en de wijze van verrichting van lokaal en het peer eind ZR/ZRP.

ZR/ZRP ondersteunt meerdere modi. Controleer deze link configuratiegids.

De configuratiemodus, FEC, DAC en modulatie moeten overeenkomen met de interfaceconfiguratie en met de peer-configuratie.

Gebruik deze opdracht: toon optics-driver debug optics poort <fp_port> instantie <bayinst> locatie <LC>.

RP/0/RP0/CPU0:ios#show optics-driver debug optics port 0 instance 0 location 0/0/CPU0

flexcoh_hdlr : [0x0]

R_S_I_P : [0.0.1.0]

module_type : [400G-ZRPLUS:Cisco-Qualified-Module]

Traffic-Setup : [Requested/Programmed]

client_rate : [100_GAUI_2_KP4_FEC/100_GAUI_2_KP4_FEC]                      <- needs to match the configured interface speed

trunk_rate : [400G Muxponder/400G Muxponder] line_fec_mode : [oFEC/oFEC]   <- needs to match the peer end for link up

dac_rate : [1x1.25 => pulse_shaping On/1x1.25 => pulse_shaping On]         <- needs to match the peer end for link up

modulation : [16QAM/16QAM]                                                 <- needs to match the peer end for link up

framing_format : [400G_ZR/400G_ZR]

framing_mode : [Enhanced/Enhanced]

hw_cfg_in_progress : [False]

hw transactions : [3]

polling enabled : [True]

pm_notify enabled : [True]

alarms_notify enabled : [True]

sdk laser oper state : [Enabled]

sdk hw laser oper state : [Enabled]

hw laser oper state : [Enabled]

sdk channel-frequency : [1931000]

hw channel-frequency : [1931000]

sdk tx-power : [-100 0.1dBm]

hw tx-power : [-113 0.1dBm]

hw tx-power-range : [-2289, -65135 0.01dBm]

sdk cd-min : [-13000]hw cd-min : [-13000]

sdk cd-max : [13000]hw cd-max : [13000]

sdk baud-rate : [60.138546]

hw baud-rate : [60.138546]

sdk hw thresholds : [Valid]

config-thresh-flags : [0x0]

trf-cfg-lsr-pm-flags : [0x0]

polling_mask : [0xf]

is_fw_dl_in_progress : [False]

is_fw_commit_in_progress: [False]

sdk dsp-internal-loopback: [Disabled]

hw dsp-internal-loopback: [Disabled]

sdk dsp-line-loopback : [Disabled]

hw dsp-line-loopback : [Disabled]

Flexcoh SDK API execution status

--------------------------------------------------------------------------------------------------

traffic | tx-power | cd-min | cd-max | frequency | laser-set | pm-set | alarm-set | poll_set |

==================================================================================================

Success | Success  | Success| Success| Success   | Success   | Success| Success   | Success  |      <- No failure to be seen in any of the status

--------------------------------------------------------------------------------------------------

PHY-controllers tonen

Verzamel deze informatie voor de juiste interface. Deze opdracht dumpt de EEPROM-informatie.

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/1/0 phy

SFP EEPROM port: 32

Xcvr Type: SFP

Xcvr Code: SFP+ 10G SR

Encoding: 64B66B

Bit Rate: 10300 Mbps

Link Reach 50u fiber: 80 meter

Link Reach 62.5u fiber: 20 meter

Vendor Name: CISCO-SUMITOMO

Vendor OUI: 00.00.5f

Vendor Part Number: SPP5100SR-C5 (rev.: A )

Laser wavelength: 850 nm (fraction: 0.00 nm)

Optional SFP Signal: Tx_Disable, Tx_Fault, LOS

Vendor Serial Number: SPC17050AZ0

Date Code (yy/mm/dd): 13/01/31 lot code: MA

Diagnostic Monitoring: DOM, Int. Cal.,

Enhanced Options: SW RX LOS Mon., SW TX Fault Mon, SW TX Disable, Alarm/Warning Flags

MSA Data

0x0000: 03 04 07 10 00 00 00 00 : 00 00 00 06 67 00 00 00

0x0010: 08 02 00 1e 43 49 53 43 : 4f 2d 53 55 4d 49 54 4f

0x0020: 4d 4f 20 20 00 00 00 5f : 53 50 50 35 31 30 30 53

0x0030: 52 2d 43 35 20 20 20 20 : 41 20 20 20 03 52 00 e6

0x0040: 00 1a 00 00 53 50 43 31 : 37 30 35 30 41 5a 30 20

0x0050: 20 20 20 20 31 33 30 31 : 33 31 4d 41 68 f0 03 7a

0x0060: 00 00 0b ea 11 8a 3a 43 : 9d 9c 2b 0d 84 89 fd c5

0x0070: a4 0e 5b 00 00 00 00 00 : 00 00 00 00 8b 64 8d fc

Thresholds: Alarm High Warning High Warning Low Alarm Low

Temperature: +75.000 C +70.000 C +0.000 C -5.000 C

Voltage: 3.630 Volt 3.465 Volt 3.135 Volt 2.970 Volt

Bias: 10.500 mAmps 9.000 mAmps 2.500 mAmps 2.000 mAmps

Transmit Power: 1.47910 mW (1.69998 dBm) 0.74130 mW (-1.30006 dBm) 0.18620 mW (-7.30020 dBm) 0.07410 mW (-11.30182 dBm)

Receive Power: 1.58490 mW (2.00002 dBm) 0.79430 mW (-1.00015 dBm) 0.10230 mW (-9.90124 dBm) 0.04070 mW (-13.90406 dBm)

Temperature: 24.012

Voltage: 3.304 Volt

Tx Bias: 0.000 mAmps

Tx Power: 0.000 mW (<-40.00 dBm)

Rx Power: 0.000 mW (<-40.00 dBm)

Oper. Status/Control: Tx Disabled, Rx Rate Select, LOS,

EEPROM Memory (A2 lower)

0x0100: 4b 00 fb 00 46 00 00 00 : 8d cc 74 04 87 5a 7a 75

0x0110: 14 82 03 e8 11 94 04 e2 : 39 c7 02 e5 1c f5 07 46

0x0120: 3d e9 01 97 1f 07 03 ff : 00 00 00 00 00 00 00 00

0x0130: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0140: 00 00 00 00 3f 80 00 00 : 00 00 00 00 01 00 00 00

0x0150: 01 00 00 00 01 00 00 00 : 01 00 00 00 00 00 00 27

0x0160: 18 03 81 13 00 00 00 00 : 00 00 00 00 00 00 b2 00

0x0170: 00 40 00 00 00 40 00 00 : 00 00 00 00 00 00 00 00

CLEI Code: COUIA8NCAA

Part Number: 10-2415-03 (ver.: V03 )

Temp/Alarm/Power Flags: COM, commercial 0C to 70C

Minimum Temperature: 0

Maximum Temperature: 70

Calibration Constants: LBC Scale, Temperature, Laser bias current, Output power,

Product Id: SFP-10G-SR

EEPROM Memory (A2 upper)

0x0180: 43 4f 55 49 41 38 4e 43 : 41 41 31 30 2d 32 34 31

0x0190: 35 2d 30 33 56 30 33 20 : 01 00 46 00 00 00 00 c6

0x01a0: 00 00 00 00 00 00 00 00 : 00 00 85 99 8f 00 a8 3b

0x01b0: d4 4b 00 00 1e 00 0a ff : 16 93 0f 8e 00 00 aa aa

0x01c0: 53 46 50 2d 31 30 47 2d : 53 52 20 20 20 20 20 20

0x01d0: 20 20 20 20 32 33 00 00 : 00 00 00 00 00 00 00 35

0x01e0: 14 1b 20 20 20 26 20 26 : 00 00 00 00 00 00 00 00

0x01f0: 00 00 00 00 00 fb 00 00 : ff ff ff ff 00 00 00 aa

MSA Data LOWER PAGE (QSA)

0x0000: 0d 00 02 01 00 00 01 00 : 00 00 00 00 00 00 00 00

0x0010: 00 00 00 00 00 01 00 00 : 00 00 00 00 00 00 00 00

0x0020: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0030: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0040: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0050: 00 00 44 32 50 30 0f 00 : 00 00 00 00 00 00 00 00

0x0060: 00 00 00 00 01 01 00 00 : 00 00 00 00 00 00 00 00

0x0070: 00 00 00 00 00 00 00 00 : 00 00 00 00 00 00 00 00

MSA Data UPPER PAGE (QSA)

0x0080: 0d 9b 80 00 00 00 00 00 : 00 00 00 00 00 00 00 00

0x0090: 00 00 00 00 43 49 53 43 : 4f 2d 44 4e 49 20 20 20

0x00a0: 20 20 20 20 00 30 30 30 : 43 41 5a 41 44 45 52 4f

0x00b0: 2d 30 32 20 20 20 20 20 : 30 33 00 00 00 00 46 32

0x00c0: 00 00 00 00 44 54 59 32 : 32 32 31 30 36 47 38 20

0x00d0: 20 20 20 20 32 30 31 38 : 30 35 33 30 00 00 f2 c2

0x00e0: f2 00 07 d0 45 c2 18 57 : 2b 29 67 3f 51 03 49 be

0x00f0: 37 c4 da 00 00 00 00 00 : 00 00 00 00 81 96 b0 b1

NPU

Deze paragraaf behandelt specifiek wanneer de interface rechtstreeks is verbonden met de NPU. Er is dus geen PHY. Deze poorten zijn PHY-loze poorten.

RP/0/RP0/CPU0:ios#show controllers twentyFiveGigE 0/0/0/12 (partial output)

Operational data for interface TwentyFiveGigE0/0/0/12:

State:    Administrative state: disabled                ==> Check if admin state display is correct

Operational state: Down (Reason: Link is shutdown)  ==> Check if link state display is correct. If interface is down with Remote fault/Link Loss (local fault), verify the peer.

MAC address information:

Operational address: fc58.9a01.8e10

Burnt-in address: fc58.9a01.8e10

Autonegotiation disabled.

Priority flow control information for interface TwentyFiveGigE0/0/0/12:

Forward error correction: Standard (Reed-Solomon)  ==> Check if FEC status is correct.

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/14

Operational data for interface TenGigE0/0/0/14:

State:    Administrative state: enabled

Operational state: Down (Reason: Link loss or low light, no loopback) ==> This router has a Local Fault/Down.

LED state: Yellow On

RP/0/RP0/CPU0:ios#show controllers tenGigE 0/0/0/15

Operational data for interface TenGigE0/0/0/15:

State:

Administrative state: enabled

Operational state: Down (Reason: Remote Fault)   ==> The peer has a Fault

LED state: Yellow On

Samenvatting

- Controleer of de beheerstatus van de interface niet goed is. Als dat zo is, breng het dan naar de beheerstatus met het commando "no shut" op de interface.

- Controleer de FEC-status op zowel de router als het peer-apparaat. Als er een verschil is, probeert u dit te corrigeren.

- Controleer de automatische onderhandelingsstatus op zowel de router als het peer apparaat. Als er een verschil is, probeert u dit te corrigeren.

- Als FEC en automatische onderhandeling correct zijn geconfigureerd, controleer dan de alarmstatus op zowel de router als de peer in de uitvoer "toon controller optica".

RX-LOS, RX-LOL: Probleem in de ontvangstrichting van het signaal.

TX-LOS, TX-LOL: Het probleem is het signaal dat wordt ontvangen door SFP/QSFP van NPU of PHY.

Als er een Link Down/Flap met RX-LOL/RX-LOS is:

- Controleer of peer TX-LOS/TX-LOL heeft.

- Als er geen TX-alarmen zijn, probeer dan de kabel/pluggable (SFP/QSFP) te wijzigen.

Als er een Link Down/Flap met TX-LOL/TX-LOS is:

U kunt een loopback extern toepassen om de externe peer en de vezel uit te sluiten voor de externe peer. Gebruik lokaal een glasvezelkabel om het zend- (Tx) signaal fysiek om te leiden naar de ontvangstpoort (Rx). Gebruik eventueel een demper om dit te bereiken:

RP/0/RSP0/CPU0:NCS(config)#int Hu0/3/0/31

RP/0/RSP0/CPU0:NCS(config-if)#loopback ?

external Enable external loopback (requires loopback connector)

internal Enable internal loopback

line Enable line loopback

RP/0/RSP0/CPU0:NCS(config-if)#loopback external ?

<cr>

RP/0/RSP0/CPU0:NCS(config-if)#loopback external

RP/0/RSP0/CPU0:NCS(config-if)#commit

U kunt een loopback interne configuratie toepassen op zowel de router als de peer om de optica te verifiëren door een omzeiling van de vezel/optica. Dit betekent dat als de interface nog steeds niet boven komt, het aangeeft dat het probleem niet met het optische deel!

RP/0/RP0/CPU0:BRU-SPCORE-P2(config)#int hundredGigE 0/0/0/10

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal ?

<cr>

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#loopback internal

RP/0/RP0/CPU0:BRU-SPCORE-P2(config-if)#commit

Logbestanden verzamelen

Deze opdrachten op zowel de router als de peer kunnen een oorzaak van het probleem vormen.

- toon ip interfacemememorandum

- alarmsignaal tonen

- toon controlleroptica <r/s/i/p> van de interface met het probleem

- toon tech-support optica

Dit toont alarmen, LED status, Laser status en andere optica info

- toon controller <tengige/hundredgige/other> <r/s/i/p> interne interface met het probleem.

Hier wordt FEC, AN, Up/Down, Lokale fout/Remote-fout weergegeven, enzovoort.

- toon controllers npu voq-gebruik interface alle instantie all location

Geeft poort aan het voorpaneel naar pp poort, npu en core mapping.

Volledige verzameling logboeken voor het interfacekwestie:

- show version

- show running-config

- toon installeer actief

- show platform

- toon technologie-ondersteuning Ethernet platform locatie 0/x/CPU0

- Ethernet-interfaces met technische ondersteuning tonen

- toon technologie-ondersteuning Ethernet controllers locatie 0/x/CPU0

- Toon tech-support dpa locatie 0/x/CPU0

- Toon tech-ondersteuning voor een locatie 0/x/CPU0

- Toon tech-support glasvezellocatie 0/x/CPU0

- toon technologie-ondersteuning coherente locatie 0/x/CPU0

- toon tech-support pfi locatie alles

- toon technologie-ondersteuning qos platformlocatie 0/x/CPU0

- show tech-support stof

- toon controllers npu voq-gebruik interface alle instantie 0 locatie alles

- optica-spoor tonen

- toon Ethernet infra spoorplaats 0/x/cpu0

- toon Ethernet v-ether sporenplaats 0/x/CPU0

- toon vether-ea spoor alle plaats 0/x/CPU0

- toon portmapper spoor alle plaats 0/0/CPU0