Inhoud

Inleiding

Leven van een pakket in doorsturen van ASIC

ASIC voor doorsturen van leidingen

IRPP (Poortbepaling, parser)

Punt

Pad tussen twee CPU-knooppunten

Pad van NPU naar RP

Injecteren van RP naar NPU of LC CPU

Pad van LC CPU naar NPU injecteren

CLI voor Punt/Injecteer Debugging

Afstandsbediening

Pad: Echo-aanvraag

Pad: Echo-antwoord

Lokale ping

Pad: Echo-aanvraag

Pad: Echo-antwoord

Handige debugs:

Topologie

Opdrachten om afstandsbediening te controleren

Echo-aanvraag: Lokale RP: TX

Echo-aanvraag: Remote LC: RX

Echo-antwoord: Remote-knooppunt (LC): TX

Echo-antwoord: Lokaal knooppunt (LC): RX

Lokale ping

Inleiding

Dit document beschrijft het pad dat is genomen door de pakketten van de echo van het ICMP/Echo Reactie in NCS 55xx (Fretta) vakje.

Leven van een pakket in doorsturen van ASIC

IRPP

Een pakket wordt ontvangen op een interface en doorgegeven naar IRPP, waar de eerste 128 bytes worden verwijderd en verwerkt. Hierdoor wordt de kop van het interne systeem toegevoegd.

ITM

Het pakket wordt opgeslagen in DRAM/OCB

ITPP

Indien nodig herschrijven van de systeemheader (multicast replicatie, poortbewaking, enz.)

Packets worden gesplitst in cellen en geladen om te maken

ERPP

De cellen worden ontvangen en opnieuw gemonteerd. De eerste 128 bytes worden geëxtraheerd en passen alle link-laagfilters, uitgaande ACL’s, uitgaande replicatie (multicast) toe

ETPP/ETM

Het gehele pakket wordt in een buffer opgeslagen totdat het pakket is uitgezet. Systeemkopregels worden verwijderd.

ASIC voor doorsturen van leidingen

IRPP (Poortbepaling, parser)

Poortbeëindiging: Packet dat wordt ontvangen vanaf netwerkinterface/CPU/recirculatie

- Bepaal de bronpoort en merk het pakket mee.

- Beslissen van het oorspronkelijke programma voor gebruik in Parser.

- Identificeer waar de netwerkheader begint.

Parser: Extract EtherSwitch, MAC-adressen, bepalen offset voor de volgende fasen in de pijpleiding.

IRP (Line Layer, VLAN Trans)

Link Layer: Filtering op L2 en bronadresverificatie.

VLAN-omzetting: We stellen de logische interface van het pakje in kaart.

Punt

- Door een gebrek aan TCAM-middelen zijn er slechts een paar lpg-items beschikbaar op de NPU.

- Belangrijke LPTS-raadpleging wordt uitgevoerd bij SW LPTS Pre-IFIB op LC Netio

- LPTS-puntpakket van NPU naar RP rechtstreeks via PMF TCAM raadpleging:

- OSPF, OSPFv3 mcast, ISIS-pakketten worden rechtstreeks naar actieve en standby RP gestraft

- LPTS puntpakket van NPU naar lokale CPU via raadpleging van PMF TCAM:

- Elk protocol dat TCP, UDP gebruikt; ICMP, ND

- L2-protocolpakketten worden via de BRCM CPU-val naar LC gestraft:

- ARP, RARP, CDP, LACP, LDP, Ether-link OAM, MACSec

- Uitzonderingspakketten worden via de BRCM CPU-val naar LC gestraft.

- TTL0, TTL1, MTU Overboden, Optiepakketten

Pad tussen twee CPU-knooppunten

Pad van NPU naar RP

RX Forus-pakketten worden op NPU herhaald. De ene wordt naar de actieve RP gestuurd en de andere naar de Stby RP

Injecteren van RP naar NPU of LC CPU

L3-pakketten worden direct aan NPU geïnjecteerd indien de nabijheid van de voorvoegsel is voltooid of als het een pakketje van vóór de route is

L3-pakketten worden ingespoten op LC CPU’s voor het geval:

- De prefixnabijheid is GLEAN.

- MPLS-voorroutepakket

- Packet size is groter dan MTU.

Pad van LC CPU naar NPU injecteren

Deze pakketten worden van LC CPU aan NPU toegediend:

- ARP-, ND-, ICMP-Echo-respons, gefragmenteerde pakketten

- CDP, LACP, LLDP, Ether-link OAM-pakketten

CLI voor Punt/Injecteer Debugging

Show SPP node counters location <>

show netio chain

location <>

show netio drop location <>

show ipv4/ipv6 traffic location <>

show fwd statistics location <>

show lpts pifib entry brief statistics location <>

show controllers fia diagshell

"diag counters g cdsp" location <>

show interface <> location <>

Afstandsbediening

Pad: Echo-aanvraag

Local Node[ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU] -> wire -> Remote[NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)]

Pad: Echo-antwoord

Remote Node[IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU] -> wire -> Local Node[LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)]

Lokale ping

Pad: Echo-aanvraag

RP(ICMP/IPv4 IO -> netio -> SPP -> CE) -> LC(SPP -> netio -> ICMP/ipv4 IO)

Pad: Echo-antwoord

LC(IPv4 IO/ICMP -> Netio -> SPP -> CE) -> RP(SPP -> net -> ipv4 io/ICMP)

Handige debugs:

debug icmp ipv4 location 0/0/CPU0

debug ipv4 packet location 0/0/CPU0

debug ipv4 ping events location 0/0/CPU0

Topologie

Fretta_1(GigabitEthernet0/0/0/16 ) <---->(GigabitEthernet0/0/0/16 ) Fretta_2

RP/0/RP0/CPU0:fretta_1#  ping 1.1.16.2 count 10000

Opdrachten om afstandsbediening te controleren

Echo-aanvraag: Lokale RP: TX

Path: ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU

1. I/O via IP: Controleer of Echo-aanvraag is gegenereerd:

show ipv4 traffic brief

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2.  NetIO

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/rP0/CPU0

Counters                  Errors/Total

----------------------------------------

Output                        0/10019

Input                         0/11804

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10006

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

If ping is failing then check if it is getting dropped in Netio:

RP/0/RP0/CPU0:fretta_1#show netio drops location 0/rP0/CPU0

Thu Apr 20 20:28:09.577 UTC

Drops for interfaces on node 0/RP0/CPU0

No drops

3. SPP

RP/0/RP0/CPU0:fretta_1#show spp node-counters

Thu Apr 20 20:29:05.785 UTC

0/0/CPU0:

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

0/RP0/CPU0:

socket/rx

ether raw pkts:           10002

mgmt interface pkts:            3204

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:               5

-------------------------------

fretta/classify

forwarded to spp clients:           13204

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:            3204

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10005

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:               5

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           13204

-------------------------------

4. Controleer of Echo-aanvraag via e-mail is verstuurd:

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats | be Egress

Thu Apr 20 21:17:28.176 UTC

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

Echo-aanvraag: Remote LC: RX

Path: NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)

1. Controleer of de verpakking via de draad is ontvangen:

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 20:44:22.115 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

2. Controleer de lpg-teller.

RP/0/RP0/CPU0:fretta_2#show lpts pifib hardware entry brief location 0/0/CPU0 | i ICMP

Thu Apr 20 20:45:54.687 UTC

DestIP               SrcIP                vrf   L4   LPort/Type   RPort  npu  Flowtype           DestNode     PuntPrio Accept Drop

0.0.0.0              0.0.0.0              0     1    ECHO         0      0    ICMP-local         Local LC     MEDIUM   10000  0

3. SPP

RP/0/RP0/CPU0:fretta_2#show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

4. Opmerking

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

ipv6_io             0/0               0/0             0/0/1000        0/0/1000

ipv6_nd             0/0               0/0             0/0/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

tp_oam              0/0               0/0             0/0/1000        0/0/1000

icmpv6_unreach_jump        0/0               0/0

arp                 0/2               0/0             0/1/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

5. FW-status

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_2#

6. IP IOS-software

show ipv4 traffic brief location 0/0/CPU0

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

Echo-antwoord: Remote-knooppunt (LC): TX

Path: IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU

1. IP IO

RP/0/RP0/CPU0:fretta_2#show ipv4 traffic brief location 0/0/CPU0

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2. Opmerking

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

3. STATEN VAN DE FWD

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

4. SPP

show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

5. Controleer of het pakje naar buiten is gestuurd.

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:20:22.593 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

6. Interfacestatistieken

RP/0/RP0/CPU0:fretta_2#show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:21:37.942 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964a.7040 (bia 008a.964a.7040)

Internet address is 1.1.16.2/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:00:13

ARP type ARPA, ARP timeout 04:00:00

Last input 00:56:58, output 00:56:58

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Echo-antwoord: Lokaal knooppunt (LC): RX

LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS PreIFIB Lookup -> SPP(LC) -> CE(LC) -> SPP(RP) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)

1. Controleer of pakketten via draad worden ingevoerd.

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:17:28.176 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

Input pkts 128-255 bytes    = 0

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 0

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10004

Input unicast pkts          = 10000

Input multicast pkts        = 3

Input broadcast pkts        = 1

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

2. LPTS-tellers

RP/0/RP0/CPU0:fretta_1#show lpts pifib hardware entry brief locatio 0/0/CPU0

0.0.0.0              0.0.0.0              0     1    ECHOREPLY    0      0    ICMP-app-default   Local LC     LOW      10000  0

3. SPP op LC

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

4. Netisering op LC

RP/0/RP0/CPU0:fretta_1# show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 0 pkts, 0 bytes

Protocol SAFI counts:

--------------------

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000           0           0

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

5. De FWD staat op LC.

RP/0/RP0/CPU0:fretta_1#show fwd statistics all location 0/0/CPU0

Thu Apr 20 21:04:27.767 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10007

punt_pkts: 10007

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_1#

5. SPP op LC om naar SPP te sturen op RP.

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

6. SPP op RP

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/rP0/CPU0

Thu Apr 20 21:06:33.045 UTC

socket/rx

ether raw pkts:           10002

mgmt interface pkts:           16651

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:              14

-------------------------------

fretta/classify

forwarded to spp clients:           26651

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:           16651

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10014

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:              14

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           26651

-------------------------------

7. Netio op RP.

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/RP0/CPU0

Thu Apr 20 21:05:05.977 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10031

Input                         0/25872

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10014

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10018

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10004         0/1/6000

OutputH                       0/14            0/1/3000

Puntback                      0/0             0/0/6000

PMutex_egressL                0/10004         0/1/6000

PMutex_egressH                0/14            0/1/1500

PMutex_ingressL               0/0             0/0/6000

PMutex_ingressH               0/0             0/0/1500

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

eth_mgmt            0/0               0/0

ipv6_io             0/0               0/4             0/0/1000        0/1/1000

ipv6_nd             0/4               0/0             0/1/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

icmpv6_unreach_jump        0/0               0/0

raw               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

tcp               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

udp               L 0/307             0/0           L 0/1/1600        0/0/0

H 0/0                             H 0/0/1600

arp                 0/15565           0/0             0/4/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

lspv_server         0/0               0/0

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

8. IP-O

RP/0/RP0/CPU0:fretta_1#

RP/0/RP0/CPU0:fretta_1#show ipv4 traffic brief

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

9. Interfacestatistieken:

RP/0/RP0/CPU0:fretta_1# show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:22:12.822 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964b.7040 (bia 008a.964b.7040)

Internet address is 1.1.16.1/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:01:11

ARP type ARPA, ARP timeout 04:00:00

Last input 00:58:03, output 00:58:03

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

RP/0/RP0/CPU0:fretta_1#

Lokale ping

<TBD>