Inhoud

Inleiding

Hoe u IC3000 uit de console kunt herstellen

Oplossing

Inleiding

Dit document beschrijft hoe u de IC3000 met het gebruik van console kunt herstellen.

Hoe u IC3000 uit de console kunt herstellen

In bepaalde gevallen wordt de IC3000 onherroepelijk en zit hij vast in roommon> terwijl hij het beeld niet kan opstarten.

Wanneer dit zich voordoet, kan de seriële/USB-console deze uitvoer tonen:

autoboot: Restarting the system.

Rom image verified correctly

Cisco Systems ROMMON, Version 1.0.0(IC3000), RELEASE SOFTWARE

Copyright (c) 1994-2018  by Cisco Systems, Inc.

Compiled Thu 09/06/2018 11:38:52.09 by builders

Current image running: Boot ROM1

Last reset cause: LocalSoft

DIMM Slot 0 : Present

Platform IC3000-2C2F-K9 with 8192 Mbytes of main memory

MAC Address: 00:00:00:00:00:00

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

Warning: filesystem is not clean

Directory .boot_string not found

Unable to locate .boot_string directory

Unable to load .boot_string

Attempt autoboot: "boot disk0:"

Warning: filesystem is not clean

Warning: filesystem is not clean

File size is 0x01360000

Located IC3000-K9-1.0.1.SPA

Image size 20316160 inode num 12, bks cnt 4960 blk size 8*512

#######################################################################################################################################################################################################

Signature verification failed for key# 1

Failed to validate digital signature

Signature verification failed for key# 1

Signature verification failed for key# 2

Failed to validate digital signature

LFBFF signature verification failed!!

No kernel found to launch.

boot: cannot determine first file name on device "disk0:/"

autoboot: All boot attempts have failed.

autoboot: Restarting the system.

Wanneer u het opstartproces onderbreekt en probeert de afbeelding te starten, aanwezig op disk0:, kunt u dezelfde output zien als hierboven en is het apparaat in feite één of andere soort bootloop.

Oplossing

Om de IC3000 te herstellen hebt u deze vereisten nodig:

- IP-connectiviteit op de beheerpoort

- TFTP-server, bereikbaar door het netwerk op de beheerpoort

- Afbeelding IC3000, te downloaden op: https://software.cisco.com/download/home/286321941/type/286322235

- Console-aansluiting op de seriële of USB-verbinding op de IC3000

Met deze stappen kunt u de IC3000 in een bruikbare toestand herstellen:

1. Download de afbeelding IC3000 uit de hierboven vermelde URL en zorg ervoor dat deze op de TFTP-server beschikbaar is

2. Sluit aan op de IC3000-console en onderbreek het opstartproces door op ESC te drukken wanneer u dit bericht ziet:

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

3. Nadat je de normale laarsvolgorde hebt verbroken, eindig je met de Rommon>-prompt:

rommon 1 >

4. Configureer het IP-adres en de gateway voor de IC3000 op de beheerpoort. Zelfs als geen gateway nodig is, moet een waarde worden ingesteld:

rommon 1 > address 192.168.100.2

rommon 2 > netmask 255.255.255.0

rommon 3 > gateway 192.168.100.1

5. Test connectiviteit op de TFTP-server:

rommon 4 >  ping 192.168.100.1

Sending 10, 32-byte ICMP Echoes to 192.168.100.1 timeout is 4 seconds

?!!!!!!!!!

Success rate is 90 percent (9/10)

6. Stel het TFTP-serveradres en bestandsnaam in om te downloaden:

rommon 5 > server 192.168.100.1

rommon 6 > file IC3000-K9-1.0.1.SPA

7. Start de download en start de afbeelding vanaf de TFTP-server:

rommon 7 > tftpdnld

ADDRESS: 192.168.100.2

NETMASK: 255.255.255.0

GATEWAY: 192.168.100.1

SERVER: 192.168.100.1

IMAGE: IC3000-K9-1.0.1.SPA

MACADDR: 00:00:00:00:00:00

VERBOSITY: Progress

RETRY: 40

PKTTIMEOUT: 7200

BLKSIZE: 1460

CHECKSUM: Yes

PORT: GbE/0

PHYMODE: Auto Detect

Receiving IC3000-K9-1.0.1.SPA from 192.168.100.1!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

File reception completed.

Nadat het beeld met succes is overgebracht, zal IC3000 onmiddellijk van de afbeelding beginnen:

File reception completed.

Boot buffer bigbuf=348bd018

Boot image size = 102729968 (0x61f88f0) bytes

[image size]      102729968

[MD5 signaure]    294a052497277c330d6b2159cf37f1ab

LFBFF signature verified.

[    4.446627] sd 2:0:0:0: [sdb] No Caching mode page found

[    4.510305] sd 2:0:0:0: [sdb] Assuming drive cache: write through

INIT: version 2.88 booting

Starting udev

Populating dev cache

INIT: Entering runlevel: 5postinsts/000-monit...

Configuring network interfaces... Setting bridge MAC address to: 00:b8:b3:80:02:c0

done.

Starting system message bus: dbus.

Checking and Mounting BOOT filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

BOOT was not cleanly unmounted, check forced.

BOOT: Inode 12, i_size is 20316160, should be 20447232.  FIXED.

BOOT: Inode 12, i_blocks is 39728, should be 39984.  FIXED.

BOOT: 12/244320 files (0.0% non-contiguous), 22254/976892 blocks

Checking and Mounting BOOT filesystem...Done

Checking GOLDEN filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

GOLDEN was not cleanly unmounted, check forced.

GOLDEN: 12/122160 files (8.3% non-contiguous), 33504/488448 blocks

Checking GOLDEN filesystem...Done

Checking and Mounting SYSTEM filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

SYSTEM: clean, 11/535392 files, 71084/2139136 [   21.111486] fpga_i2c_init_module: FPGA base address = ffffc90001078000

blocks

Checking and Mounting SYSTEM filesystem...Done

Checking and Mounting IOX filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

IOX: clean, 11/5865472 files, 415148/23442851 blocks

Checking and Mounting IOX filesystem...Done

Checking and Mounting LOG filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

LOG: clean, 11/244800 files, 33670/977949 blocks

Checking and Mounting LOG filesystem...Done

0x0000

Authenticating ACT2...ACT2 success

System initializing...

System Type Fiber.

Mounting cgroups...Done

Checking if cgroup is provided by kernel...Yes.

Checking if cgroup is mounted...Yes.

Checking if lssubsys is available...Yes.

Checking if platform defines cgroup parameters...Yes.

Tweaking base cgroup parameters...Done.

Checking if subsystems needed by IOx exist...

Setting up cpu cgroup parameters...

Setting cpu.shares for apphosting.partition to 921...OK

Setting cpu.shares for host to 100...OK

Setting cpu.shares for host/caf to 100...OK

Setting cpuset values for apphosting.partition...OK

Setting up memory cgroup parameters...

Setting memory.limit_in_bytes for apphosting.partition to 6589061529...OK

Setting memory.limit_in_bytes for host to 1647265382...OK

Setting memory.limit_in_bytes for host/caf to 1317812305...OK

OpenBSD Secure Shell server not in use (/etc/ssh/sshd_not_to_be_run)

Starting atd: OK

starting DNS forwarder and DHCP server: dnsmasq... done.

Starting ntpd: done

Starting system log daemon...0

Starting kernel log daemon...0

Network mgmt starting with factory default configuration

User mgmt starting with factory default configuration

Starting konfd: OK

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed                                   [ ok ]

* Starting libvirt log management daemon: virtlogd                      [ ok ]

Starting crond: OK

Starting Monit 5.14 daemon with http interface at /var/run/monit.sock

ic3k>