Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Geheugen gebruik - Overzicht

Geheugengebruik controleren

Geheugengebruik binnen IOS controleren

Geheugengebruik op IOS XE controleren

Geheugengebruik op QFP controleren

Gerelateerde informatie

Inleiding

Dit document bevat informatie over het onderhouden en controleren van de grootte van het systeemgeheugen op de Cisco ASR 1000 Series aggregation services routers (ASR). Dit document is van toepassing op alle Cisco IOS XE-softwarereleases die de Cisco ASR 1000 Series aggregation services routers ondersteunen.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Alle Cisco ASR 1000 Series aggregation services routers, die 1002, 1004 en 1006 routers omvatten.

- Alle Cisco IOS XE-softwarereleases die Cisco ASR 1000 Series aggregation services routers ondersteunen.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Geheugen gebruik - Overzicht

De routeprocessor (RP) van de Cisco ASR 1000 Series aggregation services router heeft synchroon dynamisch RAM (SDRAM), dat opslag biedt voor code, gegevens en pakketten. De RP biedt geheugenschaalbaarheid tot 4 GB voor ASR 1000-RP1 en 16 GB voor ASR 1000-RP2.

Cisco ASR 1000 Series aggregation services routers introduceren de Cisco IOS XE-software als hun softwarearchitectuur. Op basis van Cisco IOS XE-software is Cisco IOS XE-software een modulair besturingssysteem dat is gebaseerd op een Linux-kern op een routeprocessor. IOS daemon (IOSd) loopt als een standaardproces op gebruikersniveau onder Linux en biedt de Cisco IOS functieset, die routingprotocollen omvat. Bij opstarten wordt IOSd toegang verleend tot een vaste hoeveelheid fysiek geheugen op de RP meestal 50% of 1 GB op 2 GB-systemen en 2 GB op 4 GB-systemen. Dubbele IOS-bewerking met 2/4RU-chassis met 4 GB hoofdgeheugen voor softwareredundantie en gebruikt elk 1 GB.

Gebruik de opdracht Show versie op opdracht om informatie over geheugengrootte, software, hardware en web interface weer te geven.

Router#show version

Cisco IOS Software, IOS-XE Software (PPC_LINUX_IOSD-ADVIPSERVICESK9-M),

Version 12.2(33)XNB, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Fri 05-Sep-08 08:56 by mcpre

Cisco IOS-XE software, Copyright (c) 1986-2008 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

ASR1006b uptime is 6 days, 21 hours, 49 minutes

Uptime for this control processor is 6 days, 21 hours, 51 minutes

System returned to ROM by reload at 15:35:57 JST Thu Feb 5 2009

System restarted at 15:40:15 JST Thu Feb 5 2009

System image file is "bootflash:packages.conf"

Last reload reason: Reload command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco ASR1006 (RP1) processor with 1779130K/6147K bytes of memory.

!--- total memory allocated to IOSd.

16 Gigabit Ethernet interfaces

21 Gigabit Ethernet interfaces

2 Ten Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

4194304K bytes of physical memory.

!--- IOS-XE total memory size.

955063K bytes of eUSB flash at bootflash:.

39004543K bytes of SATA hard disk at harddisk:.

Configuration register is 0x2102

Geheugengebruik controleren

Geheugengebruik binnen IOS controleren

De opdracht processen toont informatie over de actieve processen. Laat het geheugen van de processen zien om de hoeveelheid geheugen te tonen dat binnen IOSd wordt gebruikt.

Router#show processes memory

Processor Pool Total: 1821391588 Used:  218319000 Free: 1603072588

lsmpi_io Pool Total:    6295088 Used:    6294116 Free:        972

PID TTY  Allocated      Freed    Holding    Getbufs    Retbufs Process

0   0  174405308    8586260  134742552        811     137870 *Init*

0   0      65688     393404        152          0          0 *Sched*

0   0   21603272   48285960     274932          3          1 *Dead*

0   0          0          0     406304          0          0 *MallocLite*

1   0     431576          0     448716          0          0 Chunk Manager

2   0        236        236      11140          0          0 Load Meter

3   0    2785880    2782996      32092          0          0 Exec

4   0          0          0      17140          0          0 Retransmission o

5   0      34360          0      17140          0          0 IPC ISSU Dispatc

6   0       3336        236      20240          0          0 Check heaps

7   0      32780      32780      17140         45          0 Pool Manager

8   0        236        236      17140          0          0 Timers

9   0  206550924  206496084      71980    9326586    9326586 ARP Input

10   0      24356      24356      17140        111        111 ARP Background

11   0        236        236      17140          0          0 ATM Idle Timer

12   0          0          0      17140          0          0 ATM ASYNC PROC

13   0          0          0      17140          0          0 AAA_SERVER_DEADT

14   0          0          0      29140          0          0 Policy Manager

15   0      59092        692      74972        172        172 Entity MIB API

Geheugengebruik op IOS XE controleren

Om het huidige systeemgeheugen gebruik op Cisco IOS XE te zien, gebruik de korte opdracht van de de status van de software van het platform controle-processor.

Router#show platform software status control-processor brief

Load Average

Slot  Status  1-Min  5-Min 15-Min

RP0 Healthy   0.20   0.23   0.19

RP1 Healthy   0.19   0.19   0.12

ESP0 Healthy   0.65   0.54   0.47

SIP1 Healthy   0.17   0.07   0.01

SIP2 Healthy   0.02   0.06   0.01

Memory (kB)

Slot  Status    Total     Used (Pct)     Free (Pct) Committed (Pct)

RP0 Healthy  3919872  2710788 (65%)  1209084 (29%)   2327484 (56%)

RP1 Healthy  3919872  2377136 (57%)  1542736 (37%)   2320964 (56%)

ESP0 Healthy  2030444  1112344 (53%)   918100 (43%)   3409068 (162%)

SIP1 Healthy   484452   293408 (55%)   191044 (36%)    244180 (46%)

SIP2 Healthy   484452   293408 (55%)   191044 (36%)    244020 (46%)

CPU Utilization

Slot  CPU   User System   Nice   Idle    IRQ   SIRQ Iowait

RP0    0  10.91   1.88   0.00  86.67   0.38   0.13   0.00

RP1    0   8.06   1.22   0.00  90.11   0.00   0.03   0.55

ESP0    0   5.78   3.61   0.00  90.51   0.02   0.05   0.00

SIP1    0   4.32   0.45   0.00  95.20   0.00   0.01   0.00

SIP2    0   3.95   0.44   0.00  95.57   0.00   0.01   0.00

Om geheugen gebruik voor elk proces te tonen dat op Cisco IOS XE loopt, gebruik de van de de software van het monitor platform {fp|rp} {actief|standby}. Nadat het scherm verschijnt, kunt u "shift + M" typen om weergegeven processen te sorteren en met geheugen te gebruiken.

RES geeft het niet-switched fysieke geheugen aan dat een proces gebruikt en SHR geeft de hoeveelheid gedeeld geheugen aan die door een proces wordt gebruikt. RES + SHR is de totale hoeveelheid van een proces en %MEM geeft het momenteel gebruikte deel van het beschikbare fysieke geheugen voor de processen aan.

Router#monitor platform software process rp active

top - 05:18:46 up 14 days, 17:33,  0 users,  load average: 0.00, 0.01, 0.00

Tasks: 119 total,   1 running, 118 sleeping,   0 stopped,   0 zombie

Cpu(s):  0.4% us,  0.4% sy,  0.0% ni, 99.1% id,  0.0% wa,  0.0% hi,  0.0% si

Mem:   3714760k total,  1454344k used,  2260416k free,    97952k buffers

Swap:        0k total,        0k used,        0k free,   875376k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

17385 root      20   0 1874m 338m  75m S  0.2  9.3  65:59.18 ppc_linux_iosd-

18098 root      20   0 71880  59m 6324 S  0.2  1.6  10:48.84 smand

16521 root      20   0 87868  51m  47m S  0.0  1.4   0:02.80 fman_rp

16903 root      20   0 27788  16m  14m S  0.0  0.5  15:41.61 imand

15957 root      20   0 24776 9696 6880 S  0.2  0.3  12:49.67 cmand

17697 root      20   0 19504 6160 4544 S  0.0  0.2   0:00.95 psd

16316 root      20   0 18232 5972 3736 S  0.0  0.2  12:43.32 emd

16732 root      20   0 16184 5556 3900 S  0.4  0.1  21:22.61 hman

17237 root      20   0 15892 5456 3088 S  0.0  0.1   0:00.99 plogd

15166 root      20   0  4056 2396 1248 S  0.0  0.1   0:00.72 pvp.sh

16937 root       9 -11  3992 2308 1232 S  0.0  0.1   0:00.13 pman.sh

15559 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

17978 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

Als dit bericht verschijnt wanneer u de opdracht voor de software van het monitor-proces op de console geeft, moet u een terminaltype instellen met de opdracht terminaltype om er een te kunnen gebruiken, zoals VT100.

Router#monitor  platform software process rp active

Terminal type 'network' unsupported for command

Change the terminal type with the 'terminal terminal-type' command.

Router#terminal terminal-type VT100

Geheugengebruik op QFP controleren

Om informatie over het geheugengebruik van QFP te tonen, gebruik de opdracht Show platform hardware qfp Active Infrastructure Exmem statistics. Exmem bevat met betrekking tot geheugen met betrekking tot i RAM, DRAM, SRAM en BQS.

Router#show platform hardware qfp active infrastructure exmem statistics

QFP exmem statistics

Type: Name: IRAM, CPP: 0

Total: 134217728

InUse: 5372928

Free: 127926272

Free protected: 918528

Free unprotected: 0

Lowest free water mark: 128844800

Largest free block: 99505152

Type: Name: DRAM, CPP: 0

Total: 402653184

InUse: 124705792

Free: 275775488

Free protected: 1041408

Free unprotected: 1130496

Lowest free water mark: 275587072

Largest free block: 273415168

Om het geheugengebruik voor elke gebruiker weer te geven, voegt u gebruikersopties toe, zoals aangegeven.

Router#show platform hardware qfp active infrastructure exmem statistics user

Type: Name: IRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

1            115200       115712       CPP_FIA

Type: Name: DRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

4            1248         4096         P/I

22           11567884     11585536     SBC

9            270600       276480       CEF

1            1138256      1138688      QM RM

3            528          3072         CFM

4            262144       262144       Qm 16

34           8405116      8436736      ING_EGR_UIDB

1            655360       655360       ING EGR INPUT CHUNK_Config_0

Om het gebruik van QFP van TCAM te tonen, gebruik de opdracht van het tonen platform hardware qfp actief tcam resource-manager.

Router#show platform hardware qfp active tcam resource-manager usage

QFP TCAM Usage Information

80 Bit Region Information

--------------------------

Name                                : Leaf Region #0

Number of cells per entry           : 1

Current 80 bit entries used         : 0

Current used cell entries           : 0

Current free cell entries           : 0

:

:

Total TCAM Cell Usage Information

----------------------------------

Name                                : TCAM #0 on CPP #0

Total number of regions             : 3

Total tcam used cell entries        : 0

Total tcam free cell entries        : 131072

Threshold status                    : below critical limit

Gerelateerde informatie

- Probleemoplossing voor Cisco ASR 1000 Series aggregation services routers

- Cisco ASR 1000 Series ondersteuningspagina voor aggregation services routers

- Technische ondersteuning en documentatie – Cisco Systems