Inhoud

Inleiding

Achtergrondinformatie

Probleem

Oplossing

Inleiding

Dit document beschrijft de stappen die vereist zijn om een omschakeling van synchrone transportmodule (STM)/OC3-kaart op Cisco ASR5000 uit te voeren.

Achtergrondinformatie

De STM1/OC3-kaarten op ASR5000 bieden STM-1-poorten en moeten daarom met speciale zorg worden behandeld.

Het STM-1 (niveau 1) is de synchrone digitale Hierarchie (SDH) ITU-T standaard voor glasvezelnetwerktransmissie. Het heeft een beeldsnelheid van 155,52 Mbit/s.

SDH verschilt van Ethernet en heeft een aantal specifieke kenmerken waarmee rekening moet worden gehouden.

Probleem

De setup heeft een paar STM1/OC3-kaarten met APS-modemredundantie (Automatic Protection Switching) - kaart 21 en kaart 37. De kaart 37 is actief en kaart 21 is stand-by. De poorten 21/1 en 21/2 zijn Down en APS werken. De 37/1- en 37/2-poorten zijn in de lucht en zijn beveiligd met een APS.

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

Tentatieven van het uitvoeren van een overschakeling tussen kaarten 21 en 37 falen met "foutieve redundantie modus" fout.

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

Oplossing

De omschakeling met kaartschakelaar van X naar Y wordt niet ondersteund voor STM1/OC3 kaarten met APS mode redundantie.

In plaats daarvan moeten er specifieke APS-opdrachten worden gebruikt.

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

In dit geval werd het probleem opgelost door:

aps switch manual 37/1

aps switch manual 37/2

Opmerking: Als de handmatige overschakeling faalt, kan dit vanwege fouten op de poort zijn. Controleer de poortstatus met "toon aps poortstatus <kaart/sleuf>". De overgang kan nog steeds worden gedwongen met de ‘force' optie.

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)