Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Problemen oplossen

Caveats

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor een VPN Routing- en Forwarding (VRF)-instantie onder een generieke Routing Encapsulation (GRE)-tunnelinterface.

Voorwaarden

Vereisten

Zorg er voordat u deze configuratie probeert voor dat u aan deze vereisten voldoet:

Lezers van dit document zouden kennis moeten hebben van deze onderwerpen:

- Multiprotocol Label Switching configureren

- MPLS Virtual Private Networks

- Generic Routing Encapsulation IP Source and Destination VRF-lidmaatschap

Gebruikte componenten

De informatie in dit document is gebaseerd op Cisco IOS® softwarerelease 12.3(4)T1 op 3725 Series routers.

Gebruik Cisco Functie Navigator II (alleen geregistreerde klanten) en zoek naar de GRE Tunnel IP Source and Destination VRF Membership optie om extra software en hardwarevereisten te verkrijgen die u nodig hebt.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

De configuratie is als volgt ingesteld:

- R1-CE en R2-CE bevinden zich in VRF-BLUE.

- R1-CE bevindt zich ook in VRF GREEN door het gebruik van een GRE-tunnel naar R3-PE.

R1-CE gebruikt een statische host-route om naar R3-PE (tunnelbestemming) te gaan, die waarborgt dat een recursieve routing niet optreedt voor de GRE-tunnel (het leren van het tunneldoeladres door de tunnel).

VRF BLUE en VRF GREEN zijn in het bezit van twee verschillende ondernemingen en er vinden tussen deze ondernemingen geen weglekken plaats. Bovendien kan de toegangscontrolelijst (ACL) op de interface tussen R1-CE en R2-CE alleen worden gebruikt om GRE-verkeer tussen hen toe te staan.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten in dit document, gebruikt u het Opdrachtplanningprogramma (alleen geregistreerd klanten).

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Afbeelding 1 - Fysieke topologie

Afbeelding 2 - Logische VRF-topologie

Configuraties

Dit document gebruikt deze configuraties:

- R3-PE

- R4-PE

- R1-CE

- R2-CE

- R5-CE

- R6-CE

R3-PE (tunnelendpoint)

R3-PE# show running-config

Building configuration...

.

!

no ip domain lookup

!

ip vrf blue

rd 1:1

route-target export 311:311

route-target import 411:411

!

ip vrf green

rd 2:2

route-target export 322:322

route-target import 422:422

!

ip cef

!

interface Tunnel0

ip vrf forwarding green

ip address 200.200.200.3 255.255.255.0

tunnel source Ethernet0/0

tunnel destination 10.10.10.1

tunnel vrf blue

!--- Tunnel 0 is part of VRF GREEN; but it uses the tunnel !--- destination and source addresses from the routing !--- table of VRF BLUE, because of this tunnel vrf blue !--- command.

!

interface Ethernet0/0

ip vrf forwarding blue

ip address 20.20.20.3 255.255.255.0

!--- Connection to the VRF BLUE network and the VRF GREEN !--- network using the GRE tunnel.

!

interface Ethernet1/0

ip address 30.30.30.3 255.255.255.0

tag-switching ip

!

router bgp 1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 30.30.30.4 remote-as 1

!

address-family vpnv4

neighbor 30.30.30.4 activate

neighbor 30.30.30.4 send-community extended

exit-address-family

!

address-family ipv4 vrf green

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

address-family ipv4 vrf blue

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

ip classless

ip route vrf blue 10.10.10.1 255.255.255.255 20.20.20.2

!--- Static Host route to ensure that recursive routing !--- does not occur.

no ip http server

!

.

end

R4-PE

R4-PE# show running-config

Building configuration...

.

.

.

no ip domain lookup

!

ip vrf blue

rd 1:1

route-target export 411:411

route-target import 311:311

!

ip vrf green

rd 2:2

route-target export 422:422

route-target import 322:322

!

ip cef

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

tag-switching ip

!

interface Ethernet1/0

ip vrf forwarding green

ip address 100.100.100.4 255.255.255.0

!

interface Ethernet2/0

ip vrf forwarding blue

ip address 40.40.40.4 255.255.255.0

!

router bgp 1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 30.30.30.3 remote-as 1

!

address-family vpnv4

neighbor 30.30.30.3 activate

neighbor 30.30.30.3 send-community extended

exit-address-family

!

address-family ipv4 vrf green

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

address-family ipv4 vrf blue

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

ip classless

.

.

end

R1-CE (Tunnel-endpoint)

R1-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

ip cef

!

interface Tunnel0

ip address 200.200.200.1 255.255.255.0

tunnel source Ethernet0/0

tunnel destination 20.20.20.3

!--- Both the tunnel source and destination address are in !--- the VRF BLUE, to provide transport for the VRF GREEN !--- network.

!

interface Ethernet0/0

description Connection to R2-CE router

ip address 10.10.10.1 255.255.255.0

ip access-group 100 in

ip access-group 100 out

!--- Access-group to allow only GRE packets through the !--- R2-CE network. However, R1-CE networks data is in the !--- GRE packet.

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 Tunnel0

ip route 20.20.20.3 255.255.255.255 10.10.10.2

!--- Static Host route to ensure that recursive routing !--- does not occur.

no ip http server

!

access-list 100 permit gre host 10.10.10.1 host 20.20.20.3

access-list 100 permit gre host 20.20.20.3 host 10.10.10.1

!--- Permits only GRE packets between the endpoints.

!

.

.

end

R2-CE

R2-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

ip cef

!

interface Ethernet0/0

description Connection to R1-CE router

ip address 10.10.10.2 255.255.255.0

ip access-group 100 in

ip access-group 100 out

!

interface Ethernet1/0

ip address 20.20.20.2 255.255.255.0

!

ip classless

ip route 0.0.0.0 0.0.0.0 20.20.20.3

no ip http server

!

access-list 100 permit gre host 10.10.10.1 host 20.20.20.3

access-list 100 permit gre host 20.20.20.3 host 10.10.10.1

!--- Permits only GRE packets between the endpoints.

.

!

end

R5-CE

R5-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

interface Ethernet0/0

ip address 100.100.100.5 255.255.255.0

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 100.100.100.4

no ip http server

!

.

end

R6-CE

R6-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

interface Ethernet0/0

ip address 40.40.40.6 255.255.255.0

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 40.40.40.4

no ip http server

!

.

end

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie correct werkt.

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

- toon ip route , toon ip route vrf - geef deze opdrachten op de eindpunten van de tunnel uit om ervoor te zorgen dat de tunnelbestemming bereikbaar is. Dit zorgt ervoor dat de tunnelinterface omhoog komt.

- ping —geeft deze opdracht uit aan de andere kant van de CE om ervoor te zorgen dat de tunnels vanaf de CE bereikbaar zijn.

- Laat ip bgp vpnv4 alle labels zien - geef deze opdracht uit op de PE-apparaten om de VPN-labels te bekijken die voor elk prefix via Border Gateway Protocol (BGP) zijn verdeeld naar andere PE-apparaten.

R3-PE# show ip route vrf blue 10.10.10.1

Routing entry for 10.10.10.1/32

Known via "static", distance 1, metric 0

Routing Descriptor Blocks:

* 20.20.20.2

Route metric is 0, traffic share count is 1

R3-PE# show ip route vrf green

Routing Table: green

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C    200.200.200.0/24 is directly connected, Tunnel0

100.0.0.0/24 is subnetted, 1 subnets

B       100.100.100.0 [200/0] via 30.30.30.4, 01:11:45

R3-PE# show interfaces tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 200.200.200.3/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive not set

Tunnel source 20.20.20.3 (Ethernet0/0), destination 10.10.10.1

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Tunnel TTL 255

Checksumming of packets disabled, fast tunneling enabled

Last input 00:44:05, output 00:26:16, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/0 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

105 packets input, 11964 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

83 packets output, 10292 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

R3-PE# show ip bgp vpnv4 all labels

Network          Next Hop      In label/Out label

Route Distinguisher: 1:1 (blue)

20.20.20.0/24    0.0.0.0         16/aggregate(blue)

Route Distinguisher: 2:2 (green)

100.100.100.0/24 30.30.30.4      nolabel/16

200.200.200.0    0.0.0.0         17/aggregate(green)

R4-PE# show ip route vrf blue

Routing Table: blue

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

20.0.0.0/24 is subnetted, 1 subnets

B       20.20.20.0 [200/0] via 30.30.30.3, 01:14:05

R4-PE# show ip route vrf green

Routing Table: green

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

B    200.200.200.0/24 [200/0] via 30.30.30.3, 01:14:10

100.0.0.0/24 is subnetted, 1 subnets

C       100.100.100.0 is directly connected, Ethernet1/0

R1-CE# show ip route 20.20.20.3

Routing entry for 20.20.20.3/32

Known via "static", distance 1, metric 0

Routing Descriptor Blocks:

* 10.10.10.2

Route metric is 0, traffic share count is 1

R1-CE# show interfaces tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 200.200.200.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive not set

Tunnel source 10.10.10.1 (Ethernet0/0), destination 20.20.20.3

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Tunnel TTL 255

Checksumming of packets disabled, fast tunneling enabled

Last input 00:26:57, output 00:26:57, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/0 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

83 packets input, 10292 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

106 packets output, 12088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

R5-CE# ping 200.200.200.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 40/54/80 ms

R5-CE# ping 200.200.200.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 20/36/72 ms

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Caveats

Deze bekende voorbehouden worden geïdentificeerd voor de configuratie van deze functie. U kunt de Bug Toolkit gebruiken (alleen geregistreerde klanten) om naar insecten te zoeken.

- CSCea81266 (alleen geregistreerde klanten) — Opgelost (R) GRE: Het verkeer stopt met stromen na duidelijke ip route *.

- CSCdx74855 (alleen geregistreerde klanten) — Opgelost (R) kan IP-adres van lokale GRE-tunnelinterface niet ping.

- CSCdx5718 (alleen geregistreerde klanten) — Opgelost (R) IP-pakketverlies in GRE-tunnels wanneer Cisco Express Forwarding (CEF) uitgeschakeld is op uitgaande interface.

Gerelateerde informatie

- MPLS-ondersteuningspagina voor technologie

- Technische ondersteuning en documentatie – Cisco Systems