Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Belangrijke opmerkingen

EtherChannel

trunking

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Catalyst 6500 show-opdrachten

Cisco 7500 router toont opdrachten

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document biedt voorbeeldconfiguraties voor Fast EtherChannel (FEC), Inter-Switch Link (ISL) en 802.1Q trunking tussen een Catalyst 6500 switch die CatalystOS (CatOS) en Cisco 7500 router draait. De resultaten van elke opdracht worden weergegeven terwijl ze worden uitgevoerd. Hoewel een Catalyst 6000 switch in deze configuratie gebruikt wordt, kunt u een Catalyst 4000 of Catalyst 5000 familieswitch vervangen die CatOS draait.

Voorwaarden

Vereisten

Zorg ervoor dat u aan deze vereisten voldoet voordat u deze configuratie probeert:

- Catalyst 6000 Series switches

- CatOS release 5.1(1) CSX of hoger is vereist voor ondersteuning van EtherChannel

- Cisco 7000 of 7500 Series routers

- Cisco 7000 Series routers met 7000 Series routeprocessor-Switch (RSP7000) of chassis-interface (RSP7000CI) of Cisco 7500 Series routers met Fast Ethernet-interfaceprocessors (FEIP) of veelzijdige interfaceprocessor-poortadapters (VIP2)

- Als u de PA-2FEISL poortadapter gebruikt, moet u hardware revisie 1.2 of later hebben.

Raadpleeg de melding uit het veld: *Verlopen* FN - 8791_1301999 - PA-2FEISL 2-poorts Fast Ethernet ISL-vervangingsaanbeveling voor meer informatie.

- De native opdracht van de insluitingstip1Q is geïntroduceerd in Cisco IOS® softwarerelease 12.1(3)T. Deze opdracht wijzigt de configuratie.

Zie het gedeelte Cisco 7500 802.1Q Configuration voor Cisco IOS-softwarereleases van vroeger dan 12.1(3)T van dit document voor meer informatie.

- Cisco Express Forwarding is standaard ingeschakeld voor Cisco 7500 Series routers. Ondersteuning van Cisco Express voor doorsturen van IP-routing tussen IEEE 802.1Q VLAN’s was echter niet beschikbaar totdat Cisco IOS-softwarerelease 12.2 en 12.2T. Het is nog steeds mogelijk om insluiting 802.1Q in vorige releases te configureren, maar u moet eerst de wereldwijde opdracht geen IP cef-opdracht uitgeven om het doorsturen van Cisco Express uit te schakelen.

- Wanneer een 7500 Series router voor Multiprotocol Label Switching (MPLS) en FEC is ondersteuning momenteel niet beschikbaar voor routing (MPLS) IP-pakketten die vanuit de MPLS-interface naar de FEC-interface stromen. Daarom wordt het niet aanbevolen dat een MPLS- en een FEC-configuratie op één router naast elkaar bestaan.

- Cisco IOS-softwarerelease 11.1(14)CA of hoger is vereist om EtherChannel te ondersteunen.

Cisco IOS-softwarerelease 11.3(1)T (elke plus functieset) of hoger is vereist om ISL-trunking te ondersteunen.

Cisco IOS-softwarerelease 12.0(1)T (elke plus functieset) of hoger is vereist om IEEE 802.1Q-trunking te ondersteunen.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Catalyst 6500 actieve CatOS-versie 5.5.14

- Cisco 7500 actieve Cisco IOS-softwarerelease 12.2.7b

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Belangrijke opmerkingen

- Houd in gedachten dat Catalyst 4000 Series switches ISL-trunking niet ondersteunen. Bovendien zijn sommige switchmodules op Catalyst 5000 Series switches niet geschikt voor EtherChannel. Geef de opdracht show port Properties uit om te bepalen of een bepaalde module in staat is EtherChannel en welke trunking insluiting het ondersteunt.

- Er zijn bepaalde richtlijnen voor de configuratie van EtherChannel en trunking. Raadpleeg altijd de softwaredocumentatie van uw switch.

Als u bijvoorbeeld softwarerelease 5.5.x op een Catalyst 5000 hebt uitgevoerd, raadpleegt u de Software Configuration Guide (5.5) en onderzoekt u zorgvuldig alle configuratierichtlijnen en beperkingen in het gedeelte Fast EtherChannel en Gigabit EtherChannel configureren.

EtherChannel

De FEC of Gigabit EtherChannel (GEC) optie maakt het mogelijk om meerdere point-to-point links te bundelen in één logische link. Catalyst 6000 ondersteunt een maximum van acht poorten in full-duplex modus, die 1600 Mbps of 1,6 Gbps doorvoersnelheid voor FEC en 16 Gbps voor GEC biedt. Cisco 7500 Series ondersteunt een maximum van vier poorten per FEC, voor 800 Mbps. De mogelijkheden en prestaties van EtherChannel zijn anders, afhankelijk van de switch of router. Raadpleeg Systeemvereisten om EtherChannel op Catalyst Switches te implementeren voor meer informatie.

EtherChannel distribueert verkeer over alle koppelingen en biedt redundantie als een of meer koppelingen defect zijn. Raadpleeg Inzicht op EtherChannel-taakverdeling en redundantie op Catalyst-Switches voor meer informatie en voorbeelden in verband met EtherChannel.

Raadpleeg de EtherChannel-pagina van Cisco Technical Support & Documentation voor meer informatie.

trunking

Trunking is een manier om verkeer van meerdere VLAN's over een point-to-point link of een EtherChannel-bundel tussen twee apparaten over te brengen. Dit zijn twee manieren waarop Ethernet trunking kan worden geïmplementeerd:

- ISL (Cisco eigen boomstaminsluiting)

- 802.1Q (IEEE-standaard insluiting)

Raadpleeg de pagina VLAN-trunkingprotocollen van Cisco Technical Support & Documentation voor meer informatie.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Gebruik het Opdrachtupgereedschap (alleen geregistreerde klanten) om meer informatie te vinden over de opdrachten die in dit document worden gebruikt.

Deze voorbeelden laten zien hoe je deze dingen doet:

- Configureer twee toegangspoorten voor werkstation 1 in VLAN 1 en voor werkstation 2 in VLAN 2 op Catalyst 6500.

- Configureer de standaardgateway voor werkstation 10.10.10.1/24 en voor werkstation 2 om 10.10.11.1/24 op de Cisco 7500 te zijn.

- Configuratie ISL en 802.1Q stammen over een 2-poorts FEC tussen een Catalyst 6500 switch en de Cisco 7500 router.

- Configuratie van twee haven-kanaalsubinterfaces met IP adressen voor de routing InterVLAN.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Trunking VLAN 1 en VLAN 2 over 2-poorts FEC

Configuraties

Dit document gebruikt deze configuraties:

- Catalyst 6500 Switch

- Cisco 7500 router

- Cisco 7500 802.1Q configuratie voor Cisco IOS-softwarereleases 12.1(3)T

Catalyst 6500 Switch

!--- Set the IP address and default gateway for VLAN 1 for management purposes.

Catalyst6500> (enable) set interface sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!--- Set the VTP mode. In this example, the mode is set to be transparent. Depending on your !--- network, set the VTP mode accordingly. !--- For details on VTP, refer to Understanding and Configuring VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

!--- Set the port speed to 100 and duplex to full. One of the requirements for EtherChannel !--- to work is for speed and duplex to be the same on both sides. To guarantee this, hard !--- code both speed and duplex on ports 3/1 and 3/2.

Catalyst6500> (enable) set port speed 3/1-2 100

Ports 3/1-2 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1-2 full

Ports 3/1-2 set to full-duplex.

!--- Enable FEC on ports 3/1 and 3/2. Because routers do not understand Port Aggregation !--- Protocol (PAgP), set the channel mode to one which causes ports to channel but which !--- does not generate PAgP frames.

Catalyst6500> (enable) set port channel 3/1-2 on

Port(s) 3/1-2 are assigned to admin group 105.

Port(s) 3/1-2 channel mode set to on.

!--- Enable trunking on ports 3/1 and 3/2. Because routers do not understand Dynamic !--- Trunking Protocol (DTP), set the trunking mode to nonegotiate, which causes ports to !--- trunk but which does not generate DTP frames. !--- Note: Because EtherChannel is configured first, any trunk settings that are applied !--- now to one port automatically apply to all other ports in the channel. !--- Enter the trunking encapsulation as either ISL…

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to isl.

!--- …or as dot1q. !--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0 10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

set port channel 3/1-2 105

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1-2  100

set port duplex     3/1-2  full

set trunk 3/1  nonegotiate isl 1-1005

set trunk 3/2  nonegotiate isl 1-1005

!--- If IEEE 802.1Q is configured, you will see this output instead: set trunk 3/1 nonegotiate dot1q 1-1005 set trunk 3/2 nonegotiate dot1q 1-1005

set port channel 3/1-2 mode on

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

Cisco 7500 router

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- If you are using ISL trunking, configure two port-channel sub-interfaces and issue the !--- encapsulation isl

command to enable ISL trunking. !--- Configure IP addresses for InterVLAN routing.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation isl 1

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation isl 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- If you are using 802.1Q trunking, issue the encapsulation dot1Q

native

!--- command to configure two port-channel sub-interfaces and enable 802.1Q trunking. !--- Configure the IP addresses for InterVLAN routing. !--- Note: The encapsulation dot1Q 1 native command was added in Cisco IOS Software !--- Release 12.1(3)T. If you are using an earlier version of Cisco IOS, see the !--- Cisco 7500 802.1Q Configuration for Cisco IOS Software Releases Earlier than 12.1(3)T !--- section of this document, to configure 802.1Q trunking on the router.

!--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation dot1Q 1 native

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command, to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: To make this setup work and to successfully ping between Workstation 1 and !--- Workstation 2, you must ensure that the default gateways on the workstations are setup !--- properly. For Workstation 1, the default gateway should be 10.10.10.1; and for !--- Workstation 2, the default gateway should be 10.10.11.1.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

interface Port-channel1

no ip address

full-duplex

hold-queue 300 in

!

interface Port-channel1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface Port-channel1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!--- If 802.1Q trunking is configured, you will see this output instead: interface Port-channel1.1 encapsulation dot1Q 1 native ip address 10.10.10.1 255.255.255.0 ! interface Port-channel1.2 encapsulation dot1Q 2 ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

Cisco 7500 802.1Q configuratie voor Cisco IOS-softwarereleases 12.1(3)T

In Cisco IOS-versies eerder dan 12.1(3)T, was de insluitingspremie punt1Q 1 opdracht onder de subinterface niet beschikbaar. Echter, het is nog steeds nodig om het inheemse VLAN over de verbinding aan te passen zoals eerder beschreven. Om 802.1Q trunking in softwareversies vroeger dan 12.1(3)T te configureren configureren u het IP-adres voor VLAN 1 op de hoofdpoort-kanaal 1 interface, en niet een poortkanaal-subinterface.

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- Do not configure an interface port-channel 1.1 !--- Instead, create a port-channel 1 main interface and configure the IP address !--- for VLAN 1 here.

7500(config)# interface port-channel 1

7500(config-if)# full-duplex

7500(config-if)# ip address 10.10.10.1 255.255.255.0

7500(config-if)# exit

7500(config)#

!--- It is still necessary to create a subinterface for VLAN 2.

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: Remember also that—in any version of software previous to 12.2 or 12.2T for the !--- 7000/7500 series—you will have to issue the no ip cef command globally before you !--- configure 802.1Q trunking on a subinterface. Otherwise, you will see this error !--- message: 802.1q encapsulation not supported with CEF configured on the interface. !--- See the Components Used section of this document for more information.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface Port-channel1

ip address 10.10.10.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface Port-channel1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

Verifiëren

Gebruik dit gedeelte om te bevestigen dat de configuratie correct werkt.

Het Uitvoer Tolk (uitsluitend geregistreerde klanten) (OIT) ondersteunt bepaalde show opdrachten. Gebruik de OIT om een analyse van tonen opdrachtoutput te bekijken.

Catalyst 6500 show-opdrachten

- toon interface-toont het sc0 IP-adres en VLAN van de beheerinterface. In dit voorbeeld, wordt het standaard VLAN gebruikt (VLAN 1).

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

- tonen ip route-toont de standaardgateway. In dit voorbeeld is 10.10.10.1 het IP-adres van havenkanaal 1 (voor 802.1Q trunking) of van havenkanaal 1.1 (voor ISL-trunking).

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

- laat de mod/poort zien - geeft een snel overzicht van de hardwaremogelijkheden van switchmodules. In dit voorbeeld kun je zien dat poort 3/1 (en 3/2) geschikt is voor EtherChannel, die inkapselingen ondersteunt en andere informatie.

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

- Toon port tellers mod/haven—geeft een snel blik op mogelijke havenfouten. In dit voorbeeld is deze haven vrij van fouten. Als u fouten op de poort hebt aangetroffen, raadpleegt u Problemen oplossen bij Switch en interfaceproblemen voor meer informatie.

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

- tonen havenmod —Toont havenstatus, VLAN, stam, en snelheid en duplexinformatie. In dit voorbeeld is de toegangspoort voor Workstation 1 3/3, dat in VLAN 1 is. De toegangspoort voor Workstation 2 is 3/4, dat VLAN 2 is. De poorten 3/1 en 3/2 zijn de trunking en FEC poorten.

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  trunk        full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!--- Output suppressed.

- toon VLAN-Toont welke poorten aan specifieke VLAN’s zijn toegewezen. Merk op dat de boomstampoorten in dit voorbeeld (3/1 en 3/2) niet in deze output verschijnen, wat normaal is.

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!--- Output suppressed.

- Toont de trunking mode, insluitingstype, toegestane VLAN’s en actieve VLAN’s. In dit voorbeeld, VLAN 1 (altijd toegestaan en actief door standaard) en VLAN 2 zijn de momenteel actieve VLANs voor de boomstam. Merk op dat beide boomstampoorten in VLAN 1 zijn.

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

3/2      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Voor trunking met 802.1Q verandert de uitvoer van de vorige opdracht in dit:

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

3/2      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Catalyst6500> (enable)

- Geeft poortkanaal weer - toont de EtherChannel-status. In dit voorbeeld is er een 2-poorts FEC (poorten 3/1 en 3/2) om te voorkomen dat PAgP-frames worden verzonden. U kunt ook de externe poort-kanaalinterface van de 7500 router zien.

Catalyst6500> (enable)  show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1  connected  on                     105   833

3/2  connected  on                     105   833

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1  7500                            Port-channel1.1           cisco RSP4

3/2

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

Voor een FEC met 802.1Q trunking verandert de uitvoer van de vorige opdracht in dit:

Catalyst6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1   connected  on                    257   769

3/2   connected  on                    257   769

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1       7500                            FastEthernet5/1/0         cisco RSP4

3/2       7500                            FastEthernet5/1/1         cisco RSP4

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

Als u de output van een opdracht voor 'show-tech' ondersteuning van uw Cisco-apparaat hebt, kunt u Uitvoer-interfacegereedschap gebruiken (alleen geregistreerde klanten) om mogelijke problemen en oplossingen weer te geven.

Cisco 7500 router toont opdrachten

- toon het kanaalnummer van het interfacepoort-kanaal - geeft de status van het lid voor fysieke interfaces. In dit voorbeeld wordt een 2-poorts FEC ingesteld tussen poorten 3/1 en 3/2 op Catalyst 6000 en tussen interface Fast Ethernet 5/1/0 en 5/1/1 op de 7500. Poortkanaal 1 verschijnt als omhoog/omhoog.

Het heeft een IP-adres ingesteld dat in dit geval betekent dat het het native VLAN IP-adres voor 802.1Q trunking is. Zie het gedeelte Cisco 7500 802.1Q Configuration voor Cisco IOS-softwarereleases van vroeger dan 12.1(3)T van dit document voor meer informatie. Uitvoer wordt ook getoond voor de VLAN 2 802.1Q subinterface, van het bevel van de showinterfacepoort kanaal 1.2.

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:14, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

6720 packets input, 923310 bytes, 0 no buffer

Received 5010 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

1902 packets output, 573088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1q Virtual LAN, Vlan ID  2.

ARP type: ARPA, ARP Timeout 04:00:00

Dit is de output voor ISL trunking en FEC:

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:01, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

113 packets input, 7278 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

13 packets output, 2264 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500# show interface port-channel 1.1

Port-channel1.1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

- toon interfaces fastethernet sleuf/poortadapter/poort —toont de status van de fysieke interfaces van de router en of er fouten op de interfaces bestaan. In dit voorbeeld is het foutloos.

7500# show interface fastethernet 5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8

(bia 0001.6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Productondersteuningspagina’s voor LAN

- Ondersteuning van EtherChannel-pagina

- Ondersteuningspagina voor LAN-switching

- Technische ondersteuning en documentatie – Cisco Systems