Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Achtergrondinformatie

Belangrijke opmerkingen

Configureren

Netwerkdiagram

Configuraties

Configuratie van poortkanalen-subinterface

Verifiëren

Catalyst 3550

Catalyst 6500/6000

Problemen oplossen

Uitschakelen-toestand

De opdracht "snelheid nonegotiate" verschijnt niet in de draaiende configuratie

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor het configureren van een EtherChannel-installatie tussen een Catalyst 3550 en een Catalyst 6500/6000 die software voor Cisco IOS® System gebruikt. EtherChannel kan Fast EtherChannel of Gigabit EtherChannel worden genoemd, afhankelijk van de snelheid van interfaces of poorten die worden gebruikt om EtherChannel te vormen.

Opmerking: de opdrachten EtherChannel die op de Catalyst 3550-switch in dit document zijn toegepast, kunnen ook worden toegepast op Catalyst 3750 Series switches.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Catalyst 3550 switch met Cisco IOS-softwarerelease 12.1(14)EA

- Catalyst 6500/6000 switch met Cisco IOS-softwarerelease 12.1(13)E1

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Achtergrondinformatie

In dit document zijn twee Gigabit Ethernet-interfaces op een Catalyst 3550 switch - de Gigabit Ethernet-interface op de 3500 is een 10/100/1000 Ethernet-interface - gebundeld in een Fast EtherChannel met twee Fast Ethernet-interfaces van een Catalyst 6500/6000 switch die Cisco IOS-systeemsoftware exploiteert vanaf Layer 2 (L2) EtherChannel.

Opmerking: In dit document verwijzen Fast EtherChannel, Gigabit EtherChannel, poortkanaal en kanaalgroep allemaal naar EtherChannel.

De configuratie van de Catalyst switch in dit document is van toepassing op elke Catalyst 6500/6000 of Catalyst 4500/4000 Series switch die Cisco IOS-systeemsoftware gebruikt.

Dit document toont configuratiebestanden alleen voor de switches en ook uitvoer uit de bijbehorende opdrachten in de voorbeeldweergave. Raadpleeg deze documenten voor meer informatie over de manier waarop u een EtherChannel-bestand kunt configureren:

- Layer 2 EtherChannel configureren gedeelte van het configureren EtherChannel (Catalyst 3550 switch)

- Layer 3 EtherChannel configureren gedeelte van het configureren EtherChannel (Catalyst 3560 switch)

- Layer 2 EtherChannel configureren gedeelte van het configureren EtherChannel (Catalyst 3750 switch)

- Layer 3 en Layer 2 EtherChannel configureren (Catalyst 6500/6000 actieve Cisco IOS-systeemsoftware)

- Layer 2 EtherChannel-sectie van begrip en configuratie van EtherChannel (Catalyst 4500/4000 actieve Cisco IOS-systeemsoftware)

Belangrijke opmerkingen

EtherChannel kan met de juiste opdrachten handmatig worden ingesteld. U kunt EtherChannel ook automatisch met Port Aggregation Protocol (PAgP) configureren om de switch over het kanaal te laten onderhandelen met de andere kant. Raadpleeg voor meer informatie over PAgP deze documenten:

- De betekenis van het gedeelte Port Aggregation Protocol van de configuratie van EtherChannel (Catalyst 3550 switch)

- Wat betreft het gedeelte Port Aggregation Protocol van de configuratie van EtherChannel (Catalyst 3560 switch)

- Port Aggregation Protocol, sectie van EtherChannel configureren (Catalyst 3750 switch)

- Meer begrip voor het gedeelte Port Aggregation Protocol van het configureren EtherChannel (Catalyst 6500/6000 actieve Cisco IOS-systeemsoftware)

- De betekenis van het gedeelte Port Aggregation Protocol van Understanding en het configureren van EtherChannel (Catalyst 4500/4000 actieve Cisco IOS-systeemsoftware)

De configuraties in dit document worden geïmplementeerd met behulp van de gewenste modus. Als u EtherChannel handmatig wilt configureren gebruikt u de stappen die u hebt gezet om een poortkanaal te maken. Dit voorkomt problemen met Spanning Tree Protocol (STP) tijdens het configuratieproces. STP kan een aantal poorten sluiten, met een poortstatus van error-disability [foutmelding], als een kant is ingesteld als een kanaal voordat de andere kant kan worden geconfigureerd als een kanaal.

Voer deze stappen uit om een poortkanaal te maken:

1. Laat de interfaces die in de kanalisatie van de poorten gebruikt kunnen worden als administratieve sluitingen.

2. Maak het poortkanaal (kanaalgroep) op de Catalyst 6500/6000 switch.

Zorg ervoor dat u de kanaalmodus op bijvoorbeeld de kanaalgroep 1-modus instelt.

3. Maak poortkanalen op de Catalyst 3550, 3560 of 3750 switch.

Zorg ervoor dat u de kanaalmodus instelt.

4. Hiermee kunt u de interfaces herstellen die eerder op de Catalyst 6500/6000 switch zijn uitgeschakeld zonder opdracht af te sluiten.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

N.B.: Als u aanvullende informatie wilt vinden over de opdrachten in dit document, gebruikt u het Opdrachtplanningprogramma (alleen geregistreerd klanten).

Netwerkdiagram

Dit document gebruikt de netwerkinstellingen die in dit diagram worden weergegeven:

Opmerking: de Gigabit Ethernet-interface op Catalyst 3550 is een 10/100/1000 Mbps Ethernet-interface. De Gigabit-poort op Catalyst 3550 kan ook worden aangesloten op een Fast Ethernet (100 Mbps) poort op een Catalyst 6500/6000.

Opmerking: Catalyst 3750 Series switches ondersteunen cross-stack EtherChannel, waardoor interfaces van verschillende switches van stack kunnen worden samengevoegd tot dezelfde EtherChannel-groep. Raadpleeg voor meer informatie over EtherChannel in een gestapelde switch-omgeving het gedeelte EtherChannel en Switch Stacks van de Configuration EtherChannel documentatie voor Catalyst 3750 Series switches.

Configuraties

Dit document gebruikt deze configuraties:

- Catalyst 3550

- Catalyst 6500/6000

Catalyst 3550

Building configuration...

Current configuration : 1610 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat3550

!

enable password ww

!

ip subnet-zero

no ip finger

!

!

!

!

!--- A logical port-channel interface is automatically created !--- when ports are grouped into a channel group.

interface Port-channel 1

!--- In this example, the L2 EtherChannel is configured. !--- A Layer 3 (L3) EtherChannel can also be configured on the Catalyst 3550 switches. !--- For more information, refer to the document Configuring EtherChannel.

switchport mode access no ip address snmp trap link-status!

!--- Note: The Gigabit Ethernet interface on the Catalyst 3550 is a !--- 10/100/1000 Mbps negotiated Ethernet interface. The Gigabit port on the Catalyst 3550 is !--- connected to a FastEthernet (100 Mbps) port on the Catalyst 6500/6000. !--- The port is a member of channel group 1.

interface GigabitEthernet0/1

switchport mode access

no ip address

snmp trap link-status

channel-group 1 mode desirable

!

!--- The port is a member of channel group 1.

interface GigabitEthernet0/2

switchport mode access

no ip address

snmp trap link-status

channel-group 1 mode desirable

!

interface GigabitEthernet0/3

switchport mode access

no ip address

snmp trap link-status

!

!--- Output suppressed.

interface GigabitEthernet0/12

switchport mode access

no ip address

snmp trap link-status

!--- Interface VLAN1 is required for management purposes.

interface Vlan1

ip address 10.1.1.1 255.255.255.0

!

ip classless

ip http server

!

!

line con 0

transport input none

line vty 5 15

!

end

Catalyst 6500/6000

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot buffersize 126968

boot bootldr bootflash:c6msfc-boot-mz.121-4.E1

enable password ww

!

redundancy

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

!--- A logical port-channel interface is automatically created !--- when ports are grouped into a channel group.

interface Port-channel 1

no ip address

switchport

switchport mode access

!

interface GigabitEthernet1/1

no ip address

shutdown

!

interface GigabitEthernet1/2

no ip address

shutdown

!

!--- Note: The Gigabit Ethernet interface on the Catalyst 3550 is a !--- 10/100/1000 Mbps negotiated Ethernet interface. The Gigabit port on the Catalyst 3550 is !--- connected to a FastEthernet (100 Mbps) port on the Catalyst 6500/6000.

interface FastEthernet3/1

no ip address

!--- In this example, the L2 EtherChannel is configured. !--- An L3 EtherChannel can also be configured on the Catalyst 6500/6000 running !--- Cisco IOS System Software. For more details, refer to the document !--- Configuring EtherChannel. !--- On a Catalyst 6500/6000, you must issue the switchport !--- command once, without any keywords, in order to configure the interface as an L2 port. !--- By default, all the ports are router ports (L3 ports). !--- On a Catalyst 4500/4000 switch, all ports are L2 ports by default; !--- no additional command is required.

switchport

!--- This command puts the interface in VLAN1, by default.

switchport mode access

!--- The port is a member of channel group 1.

channel-group 1 mode desirable

!

interface FastEthernet3/2

no ip address

!--- On a Catalyst 6500/6000, you must issue the switchport !--- command once, without any keywords, in order to configure the interface as an L2 port. !--- By default, all the ports are router ports (L3 ports). !--- On a Catalyst 4500/4000 switch, all ports are L2 ports by default; !--- no additional command is required.

switchport

!--- This command puts the interface in VLAN1, by default.

switchport mode access

!--- The port is a member of channel group 1.

channel-group 1 mode desirable

!

interface FastEthernet3/3

no ip address

switchport

switchport mode access

!

!--- Output suppressed.

!

interface FastEthernet3/48

no ip address

switchport

switchport mode access

!

!--- Interface VLAN1 is required for management purposes.

interface Vlan1

ip address 10.1.1.2 255.255.255.0

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

Opmerking: Dit configuratievoorbeeld toont een EtherChannel-configuratie met toegangskoppelingen. Dezelfde configuratie is van toepassing op EtherChannel-trunks. Geef het bevel van de boomstam van de verbindingswijze uit, of laat de switches toe om de modus met de dynamische wenselijke modus te onderhandelen. Voor meer informatie over het configureren van trunking, raadpleegt u het gedeelte VLAN-trunks configureren van het document VLAN's configureren.

Configuratie van poortkanalen-subinterface

Een ander voorbeeld van de configuratie van Port-Channel met een subinterface in Catalyst 3560-switch met Cisco IOS-softwarerelease 12.2(25)ST.

Catalyst 3560

Building configuration...

Current configuration : 2480 bytes

!

version 12.2

!

interface Port-channel5

no switchport

no ip address

!

interface Port-channel5.690

!

interface Port-channel10

no switchport

no ip address

!

interface Port-channel10.1

!

interface Port-channel10.690

!

interface Port-channel11

no switchport

no ip address

Verifiëren

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

Om het poortkanaal in Catalyst 6500/6000 en Catalyst 3500 switches te controleren die Cisco IOS-systeemsoftware gebruiken, geeft u deze opdrachten uit:

- toon interfacepoort-kanaal kanaal-groep-nummer

- Bekijk de samenvatting van het kanaal-groep-nummer

Om de STP status in Catalyst 6500/6000 en Catalyst 3500 switches te controleren die Cisco IOS-systeemsoftware gebruiken, geeft u deze opdracht uit:

- vlan-VLAN-details tonen

Catalyst 3550

Cat3550#show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0002.4b28.db02 (bia 0002.4b28.db02)

MTU 1500 bytes, BW 200000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s

input flow-control is off, output flow-control is off

Members in this channel: Gi0/1 Gi0/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:03:27, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

26 packets input, 5344 bytes, 0 no buffer

Received 17 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

59 packets output, 5050 bytes, 0 underruns

0 output errors, 0 collisions, 2 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Cat3550#show spanning-tree vlan 1 detail

VLAN1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0002.4b28.db01

Configured hello time 2, max age 20, forward delay 15

We are the root of the spanning tree

Topology change flag not set, detected flag not set

Number of topology changes 1 last change occurred 00:00:38 ago

from Port-channel1

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 0

Port 65 (Port-channel1) of VLAN1 is forwarding

Port path cost 12, Port priority 128, Port Identifier 128.65.

Designated root has priority 32768, address 0002.4b28.db01

Designated bridge has priority 32768, address 0002.4b28.db01

Designated port id is 128.65, designated path cost 0

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 34, received 0

Cat3550# show etherchannel 1 summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

R - Layer3      S - Layer2

U - port-channel in use

Group Port-channel  Ports

-----+------------+-----------------------------------------------------------

1     Po1(SU)     Gi0/1(P)   Gi0/2(P)

Cat3550# ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Catalyst 6500/6000

Cat6500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0002.7ef1.36e1 (bia 0002.7ef1.36e1)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s

Members in this channel: Fa3/1 Fa3/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output never, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/2000, 0 drops

5 minute input rate 1000 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

407 packets input, 34994 bytes, 0 no buffer

Received 311 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

93 packets output, 16598 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Cat6500# show spanning-tree vlan 1 detail

VLAN1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 00d0.024f.6001

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0002.4b28.db01

Root port is 833 (Port-channel1), cost of root path is 12

Topology change flag not set, detected flag not set

Number of topology changes 0 last change occurred 00:02:13 ago

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 833 (Port-channel1) of VLAN1 is forwarding

Port path cost 12, Port priority 128, Port Identifier 131.65.

Designated root has priority 32768, address 0002.4b28.db01

Designated bridge has priority 32768, address 0002.4b28.db01

Designated port id is 128.65, designated path cost 0

Timers: message age 1, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 0, received 66

Cat6500# show etherchannel 1 summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

R - Layer3      S - Layer2

Group Port-channel  Ports

-----+------------+-----------------------------------------------------------

1     Po1(SU)     Fa3/1(P)   Fa3/2(P)

Cat6500# ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Problemen oplossen

Uitschakelen-toestand

Een veel voorkomend probleem tijdens de EtherChannel-configuratie is dat de interfaces in de err-modus gaan. Dit kan worden gezien wanneer EtherChannel in één switch op de ON-modus is geschakeld en de andere switch niet direct wordt ingesteld. Als hij even in deze staat blijft staan, denkt STP op de switch waar EtherChannel is ingeschakeld dat er een lus is. Dit veroorzaakt dat de kanaalhavens in err-staat worden gezet. Zie dit voorbeeld voor meer informatie over hoe u kunt bepalen of uw EtherChannel-interfaces in de status err-Enabled zijn:

%SPANTREE-2-CHNL_MISCFG: Detected loop due to etherchannel misconfiguration of Gi0/9

%PM-4-ERR_DISABLE: channel-misconfig error detected on Po10, putting Gi0/9 in err-disable state

%PM-4-ERR_DISABLE: channel-misconfig error detected on Po10, putting Gi0/10 in err-disable state

Switch1#show etherchannel summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

u - unsuitable for bundling

U - in use      f - failed to allocate aggregator

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

10     Po10(SD)         -        Gi0/9(D)    Gi0/10(D)

Switch1#show interfaces GigabitEthernet 0/9 status

Port      Name               Status       Vlan       Duplex  Speed Type

Gi0/9                        err-disabled 1            auto   auto 10/100/1000BaseTX

Switch1#show interfaces GigabitEthernet 0/10 status

Port      Name               Status       Vlan       Duplex  Speed Type

Gi0/10                       err-disabled 1            auto   auto 10/100/1000BaseTX

In het foutbericht staat dat EtherChannel een omspannende boomlus tegenkwam. Om het probleem op te lossen, stelt u de kanaalmodus in op wenselijk aan beide kanten van de verbinding en zet u de interfaces opnieuw in:

Switch1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch1(config)#interface gi0/9

Switch1(config-if)#channel-group 10 mode desirable

Dit zorgt ervoor dat elke kant alleen een kanaal vormt als ze het er allebei over eens zijn om het te kanaliseren. Als ze niet akkoord gaan met kanaliseren, blijven ze functioneren als normale poorten.

Nadat de kanaalmodus is ingesteld op wenselijk aan beide zijden van de verbinding, geeft u de afsluiten en geen sluitingsopdrachten aan op de bijbehorende interface om de poorten handmatig weer in te schakelen:

Switch1(config-if)#shutdown

Switch1(config-if)#no shutdown

De opdracht "snelheid nonegotiate" verschijnt niet in de draaiende configuratie

De snelheid nonegotiate opdracht die op een poortkanaal is ingesteld, verschijnt niet altijd in de actieve configuratie. Dit gebeurt omdat niet-onderhandeling over de interface van het havenkanaal afhangt van die van gebundelde havens. Het wordt ingevoegd wanneer het havenkanaal actief is en gebaseerd op de individuele configuratie van kanaalpoorten.

Gerelateerde informatie

- Systeemvereisten voor implementatie van EtherChannel op Catalyst-Switches

- Configuratie monster: EtherChannel tussen Catalyst Switches die CatOS en Cisco IOS-systeemsoftware uitvoeren

- Productondersteuning voor switches

- Ondersteuning voor LAN-switching technologie

- Technische ondersteuning en documentatie – Cisco Systems