Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrondinformatie

Beperkingen

Configureren

Uitdagingen tijdens probleemoplossing

Netwerkdiagram

Configuraties

Verifiëren

Problemen oplossen

Inleiding

Dit document beschrijft hoe u het Border Gateway Protocol (BGP) IPv6-verkeer op ASR1K kunt configureren.

Voorwaarden

Vereisten

Cisco raadt aan dat u kennis hebt van dit onderwerp:

- Platform Independent

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- IOS-XE

- ASR 1000 router

- ASR9K

- ASR1K

- BGP

- landloopster

- IPv6

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk levend is, zorg er dan voor dat u de mogelijke impact van om het even welke opdracht begrijpt.

Achtergrondinformatie

Flowspec specificeert procedures voor de distributie van regels van de stroomspecificatie via BGP en definieert de procedure om regels van de stroomspecificatie te coderen als BGP NLRI (Border Gateway Protocol Layer Reachability Information), die in elke toepassing kan worden gebruikt. Het definieert ook toepassing voor het doel van pakketfiltering om (gedistribueerde) ontkenning van service-aanvallen te beperken.

Beperkingen

Dit zijn de beperkingen voor de configuratie:

- Een mix van adressengezinnen is niet toegestaan in stroomgebiedregels.

- Bij meerdere matchscenario's wordt alleen de eerste matchingsdebietsregel toegepast.

- Per systeem wordt een maximum van 3000 regels voor stroomspecificaties ondersteund.

Configureren

In dit voorbeeld hebben we ASR9K als controller en ASR1K als een PE-, RR- en Flowspec-client geconfigureerd.

Dit is de minimum configuratie die vereist is voor het werken van IPv6-wissel.

On controller to push the policy to PE/client:

class-map type traffic match-all FLOWSPEC

match destination-address ipv6 2001:db8::/32   <<<<< Match destination address/subnet.

end-class-map

!

policy-map type pbr FS_P

class type traffic FLOWSPEC                    <<<<< Apply class-map under policy-map.

drop

!

flowspec

address-family ipv4

service-policy type pbr FSP_V4

!

address-family ipv6

service-policy type pbr FS_P                  <<<<< Apply policy-map inside Flowspec under AF.

!

On PE/client is to enable IPv6 flowspec AF under BGP.

address-family ipv6 flowspec                   <<<<< Under ipv6 flowspec AF, activate the neighbor.

neighbor 10.192.202.5 activate

neighbor 10.192.202.5 validation off

To apply the flowspec policy on interface, "local-install interface-all" command is must under flowspec.

flowspec

local-install interface-all                    <<<<< Push the policy on interface.

- Op basis van de configuratie van de controller moet al het verkeer dat bestemd is voor 2001:db8:/32 worden verlaagd volgens het beleid.

- Houd de validatie voor de buurman onder ipv6 adresfamilie zodat ASR1K niet op de volgende hop controleert.

- Idealiter als het beleid actief is, wordt de teller in de controller weergegeven maar in het geval dat u vloeiend geluid wilt zien op een ander apparaat, installeert u vloeiend geluid op alle gebruikersinterfaces waarvoor lokaal-installeer interface-all opdracht vereist is onder stroombereik.

Uitdagingen tijdens probleemoplossing

- Als het underlay-netwerk IPv4 en BGP debietspaak voor IPv6 is, is er een kwestie van valideringscontrole op elke hop en veroorzaakt een probleem voor IPv6 Stroombeleid. Houd de validatie dus uit zodat buurman geen validatiecontrole doet.

- Behalve een controller, kunt u de stromenbeleidsmatch/actieteller niet zien. Om de tellers te controleren, moet lokaal-installeer interface-all onder Flowspec (onder AF). Deze opdracht drukt de beleidsconfiguratie van de stroomspecificatie op alle interfaces van een apparaat voor de IPv4- en IPv6-adresfamilies en op interfaces binnen een VRF-instantie.

Netwerkdiagram

+----------------+              +-----------------+            +------------------+             +-----------------+

|                |              |                 |            |                  |             |                 |

|   Controller   +--------------+     PE/RR1      +------------+      PE/RR2      +-------------+      End-PE     |

|     ASR9K      |              |     CRR01       |            |      CRR02       |             |      DCPR01     |

+----------------+              +-----------------+            +------------------+             +-----------------+

Configuraties

Deze configuratie is gebaseerd op het netwerkdiagram, hetzelfde als uw instelling.

Controller:

RP/0/RSP0/CPU0:Controller# show running-config

Mon Apr  8 16:33:36.578 UTC

Building configuration...

!! IOS XR Configuration 5.3.4

!! Last configuration change at Wed Apr  3 17:34:59 2019 by admin

!

hostname Controller

cdp

cdp advertise v1

!

class-map type traffic match-all FLOWSPEC

match destination-address ipv6 2001:db8::/32

end-class-map

!

class-map type traffic match-all V4_FLOWSPEC

match source-address ipv4 102.102.102.102 255.255.255.255

end-class-map

!

policy-map type pbr FS_P

class type traffic FLOWSPEC

drop

!

class type traffic class-default

!

end-policy-map

!

policy-map type pbr FSP_V4

class type traffic V4_FLOWSPEC

set dscp ef

!

class type traffic class-default

!

end-policy-map

!

interface Loopback0

ipv4 address 10.192.202.5 255.255.255.255

!

interface Loopback100

ipv4 address 102.102.102.102 255.255.255.255

ipv6 address 2001:db8::1/32

!

interface TenGigE0/0/0/0

ipv4 address 10.10.12.1 255.255.255.0

ipv6 address 2001:10:10:12::1/64

!

route-policy ALL

pass

end-policy

!

router static

address-family ipv4 unicast

203.202.143.33/32 TenGigE0/0/0/0

!

address-family ipv6 unicast

2003::/64 2001:10:10:12::2

!

!

router ospfv3 1

area 0

interface TenGigE0/0/0/0

network point-to-point

!

!

!

router bgp 64696

bgp router-id 10.192.202.5

address-family ipv4 unicast

network 102.102.102.102/32

!

address-family vpnv4 unicast

!

address-family ipv4 flowspec

!

address-family ipv6 flowspec

!

neighbor 203.202.143.33

remote-as 7474

ebgp-multihop 10

update-source Loopback0

address-family ipv4 unicast

route-policy ALL in

route-policy ALL out

!

address-family vpnv4 unicast

!

address-family ipv4 flowspec

route-policy ALL in

route-policy ALL out

!

address-family ipv6 flowspec

route-policy ALL in

route-policy ALL out

!

!

!

flowspec

local-install interface-all

address-family ipv4

service-policy type pbr FSP_V4

!

address-family ipv6

service-policy type pbr FS_P

!

!

end

PE/RR1:

CRR01#show running-config

Building configuration...

!

ipv6 unicast-routing

mpls label protocol ldp

!

spanning-tree extend system-id

flowspec

local-install interface-all

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.33 255.255.255.255

ip ospf 1 area 0

!

interface Loopback1010

no ip address

ipv6 address 2001:DB8::10/32

!

interface TenGigabitEthernet0/0/0

ip address 10.10.12.2 255.255.255.0

ip ospf network point-to-point

cdp enable

ipv6 address 2001:10:10:12::2/64

!

interface TenGigabitEthernet0/0/3

ip address 10.10.23.2 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2003::1/64

mpls ip

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.33

bgp log-neighbor-changes

neighbor 10.192.202.5 remote-as 64696

neighbor 10.192.202.5 ebgp-multihop 10

neighbor 10.192.202.5 update-source Loopback0

neighbor 2001:10:10:12::1 remote-as 64696

neighbor 203.202.143.44 remote-as 7474

neighbor 203.202.143.44 update-source Loopback0

!

address-family ipv4

neighbor 10.192.202.5 activate

no neighbor 2001:10:10:12::1 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 route-reflector-client

exit-address-family

!

address-family ipv4 flowspec

neighbor 10.192.202.5 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 send-community both

neighbor 203.202.143.44 route-reflector-client

exit-address-family

!

address-family ipv6

neighbor 10.192.202.5 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 route-reflector-client

neighbor 203.202.143.44 send-label

exit-address-family

!

address-family ipv6 flowspec

neighbor 10.192.202.5 activate

neighbor 10.192.202.5 validation off

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 send-community both

neighbor 203.202.143.44 route-reflector-client

neighbor 203.202.143.44 next-hop-self

exit-address-family

!

ip route 10.192.202.5 255.255.255.255 10.10.12.1

!

!

ipv6 route 2001:DB8::1/128 2001:10:10:12::1

!

end

PE/RR2:

CRR02#show running-config

Building configuration...

Current configuration : 7227 bytes

!

! Last configuration change at 18:21:29 UTC Mon Apr 8 2019

!

hostname CRR02

!

boot-start-marker

boot system flash bootflash:asr1000rpx86-universalk9.16.10.01a.SPA.bin

boot-end-marker

!

ipv6 unicast-routing

multilink bundle-name authenticated

!

spanning-tree extend system-id

flowspec

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.44 255.255.255.255

ip ospf 1 area 0

!

interface TenGigabitEthernet1/0/0

ip address 10.10.23.3 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2003::2/64

mpls ip

!

interface TenGigabitEthernet1/0/1

ip address 10.10.34.3 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.44

bgp log-neighbor-changes

neighbor 203.202.143.33 remote-as 7474

neighbor 203.202.143.33 update-source Loopback0

neighbor 203.202.143.45 remote-as 7474

neighbor 203.202.143.45 update-source Loopback0

!

address-family ipv4

neighbor 203.202.143.33 activate

neighbor 203.202.143.45 activate

exit-address-family

!

address-family ipv4 flowspec

neighbor 203.202.143.33 activate

neighbor 203.202.143.45 activate

neighbor 203.202.143.45 send-community both

neighbor 203.202.143.45 route-reflector-client

exit-address-family

!

address-family ipv6

neighbor 203.202.143.33 activate

neighbor 203.202.143.33 send-label

exit-address-family

!

address-family ipv6 flowspec

neighbor 203.202.143.33 activate

neighbor 203.202.143.33 validation off

neighbor 203.202.143.45 activate

neighbor 203.202.143.45 send-community both

neighbor 203.202.143.45 route-reflector-client

exit-address-family

!

ipv6 route 2001:10:10:12::/64 2003::1

ipv6 route 2001:DB8::1/128 2003::1

!

end

End-PE:

DCPR01#show running-config

Building configuration...

!

hostname DCPR01

!

subscriber templating

!

ipv6 unicast-routing

!

flowspec

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.45 255.255.255.255

ip ospf 1 area 0

!

interface TenGigabitEthernet1/3/0

ip address 10.10.34.4 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2001::1/64

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.45

bgp log-neighbor-changes

neighbor 203.202.143.44 remote-as 7474

neighbor 203.202.143.44 update-source Loopback0

!

address-family ipv4 flowspec

neighbor 203.202.143.44 activate

exit-address-family

!

address-family ipv6 flowspec

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 validation off

exit-address-family

!

ipv6 route ::/0 TenGigabitEthernet1/3/0

!

end

Verifiëren

PE/RR2:

CRR02#ping 2001:db8::1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2001:DB8::1, timeout is 2 seconds:

.....

Success rate is 0 percent (0/5)

CRR02#

Controller:

RP/0/RSP0/CPU0:Controller#show bgp ipv6 flowspec

Mon Apr  8 17:55:17.041 UTC

BGP router identifier 10.192.202.5, local AS number 64696

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 20

BGP main routing table version 20

BGP NSR Initial initsync version 0 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

*> Dest:2001:db8::/0-32/56

::                                     0 i

Processed 1 prefixes, 1 paths

RP/0/RSP0/CPU0:Controller#show flowspec ipv6 detail

Mon Apr  8 17:55:36.786 UTC

AFI: IPv6

Flow           :Dest:2001:db8::/0-32

Actions      :Traffic-rate: 0 bps  (policy.1.FS_P.FLOWSPEC)

Statistics                        (packets/bytes)

Matched             :                  14/1652

Dropped             :                  14/1652

RP/0/RSP0/CPU0:BGL14.1.J.05-ASR-9000-1#

PE/RR1:

CRR01#show bgp ipv6 flowspec

BGP table version is 2, local router ID is 203.202.143.33

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   Dest:2001:DB8::/0-32

::                                     0 64696 i

CRR01#

CRR01#show flowspec ipv6 detail

AFI: IPv6

Flow           :Dest:2001:DB8::/0-32

Actions      :Traffic-rate: 0 bps  (bgp.1)

Statistics                        (packets/bytes)

Matched             :                   4/456

Dropped             :                   4/456

CRR01#

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Tip: Als u een case met 3.16.5S opent en CSCva5510 bug-id aangeraakt. Hoewel deze niet in het bug is gedocumenteerd, is deze van toepassing op IPv6. Dit wordt bevestigd door ASR1K BGP BU en is gevalideerd. Een ander bug CSCvp18767 Ook is deze in 16.12.1 gefixeerd, waardoor het beter is deze release te gebruiken. IPv6-stroming kan echter in elke 16.x-release werken.