Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Configureren

Netwerkdiagram

Configuraties

Verifiëren

Opdrachten weergeven

Gerelateerde informatie

Inleiding

Dit document beschrijft hoe u wederzijdse herdistributie tussen EIGRP en BGP kunt configureren.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Enhanced Interior Gateway Routing Protocol (EIGRP)

- BGP-protocol (border gateway protocol)

Gebruikte componenten

De informatie in dit document is gebaseerd op de Cisco 7200 Series router met Cisco IOS®softwarerelease 15.0(1).

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Configureren

In dit voorbeeld communiceren routers R1 en R2 met elkaar via EIGRP. Routers R2 en R3 gebruiken eBGP. Om de eBGP-routes onderling te herverdelen in EIGRP, gebruikt u de redistribute bgpopdracht met EIGRP-metriek. Op dezelfde manier gebruikt u de redistribute eigrp AS number  opdracht om EIGRP-routes naar BGP te herverdelen.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Netwerkdiagram

Configuraties

Dit document gebruikt de volgende configuraties:

- Router R1

- Router R2

- Router R3

Router R1

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 10.30.30.30 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.101 255.255.255.0

duplex auto

speed auto

!

router eigrp 100

network 10.30.0.0

network 192.168.1.0

no auto-summary

!

end

Router R2

!

hostname R2

!

ip cef

!

!

interface Loopback0

ip address 10.10.10.10 255.255.255.255

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.100 255.255.255.0

duplex auto

speed auto

!

interface Serial0/0

ip address 172.16.100.50 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router eigrp 100

redistribute static

redistribute bgp 1000 metric 100 1 255 1 1500

network 10.0.0.0

network 192.168.1.0

no auto-summary

!

router bgp 1000

no synchronization

bgp log-neighbor-changes

network 10.20.20.20 mask 255.255.255.255

redistribute connected

redistribute static

redistribute eigrp 100

neighbor 172.16.100.51 remote-as 2000

neighbor 172.16.100.51 next-hop-self

no auto-summary

!

end

Router R3

!

hostname R3

!

ip cef

!

interface Loopback0

ip address 10.22.22.22 255.255.255.255

!

interface Serial0/0

ip address 172.16.100.51 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router bgp 2000

no synchronization

bgp log-neighbor-changes

network 10.22.22.22 mask 255.255.255.255

network 172.16.100.0 mask 255.255.255.0

neighbor 172.16.100.50 remote-as 1000

neighbor 172.16.100.50 default-originate

default-information originate

!--- Default route is configured!

no auto-summary

!

end

Verifiëren

Gebruik deze sectie om te controleren of uw configuratie goed werkt.

De CLI Analyzer wordt gebruikt om een analyse van de show opdrachtoutput te bekijken.

Opmerking: alleen geregistreerde Cisco-gebruikers kunnen toegang krijgen tot interne Cisco-tools en -informatie.

Opdrachten weergeven

Om te verifiëren dat EIGRP de opnieuw gedistribueerde routes ontvangt, gebruik het show ip route eigrp  bevel.

ip route-eigrp tonen

In router R1

R1#show ip route eigrp

10.20.0.0/32 is subnetted, 1 subnets

D EX    10.20.20.20

[170/25625856] via 192.168.1.100, 01:00:33, FastEthernet0/0

10.22.0.0/32 is subnetted, 1 subnets

D EX    10.22.22.22

[170/25625856] via 192.168.1.100, 00:59:49, FastEthernet0/0

10.0.0.0/32 is subnetted, 1 subnets

D       10.10.10.10 [90/409600] via 192.168.1.100, 00:55:17, FastEthernet0/0

D*EX 0.0.0.0/0 [170/25625856] via 192.168.1.100, 00:46:24, FastEthernet0/0

!--- Shows the default route from router R3.

!--- EX indicates that the routes are EIGRP external routes.

Om te verifiëren dat EIGRP-routes in BGP correct worden herverdeeld, gebruikt u de show ip route bgpopdracht in router R3.

toon ip route bgp

In router R3

R3#show ip route bgp

show ip route bgp

10.20.0.0/32 is subnetted, 1 subnets

B       10.20.20.20 [20/0] via 172.16.100.50, 01:03:02

10.0.0.0/32 is subnetted, 1 subnets

B       10.10.10.10 [20/0] via 172.16.100.50, 01:03:02

B    192.168.1.0/24 [20/0] via 172.16.100.50, 01:03:02

10.30.0.0/32 is subnetted, 1 subnets

B       10.30.30.30 [20/409600] via 172.16.100.50, 00:59:06

!--- The output indicates that the EIGRP routes are

!--- redistributed in BGP.

Gerelateerde informatie

- Ondersteuningspagina voor BGP

- Casestudy’s van BGP

- EIGRP-ondersteuningspagina

- Cisco Technical Support en downloads