Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Achtergrondinformatie

Topologie

Eerste verificatie

Interface- en statische routeconfiguratie

Configuratie

Definitieve verificatie

Inleiding

Dit document beschrijft het proces om routekaart tussen Global Routing Table (GRT) en VRF te configureren met Cisco IOS® XR-software.

Voorwaarden

Vereisten

Cisco raadt kennis van de volgende onderwerpen aan:

- Kennis van basis IP-routing

- Kennis van Cisco IOS en Cisco IOS XR-opdrachtregel

Gebruikte componenten

Deze procedure is niet beperkt tot enige softwarerelease in Cisco IOS XR. Daarom kunnen alle releases worden gebruikt om de volgende stappen te voltooien.

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Router met Cisco IOS XR-software

- Router met Cisco IOS-software

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Achtergrondinformatie

Het doel van deze demonstratie is de configuratie voor routelekkage tussen globale routetabel en vrf  routetabel op Cisco IOS XR.

Topologie

Eerste verificatie

Interface- en statische routeconfiguratie

ASR 9901-1 router

RP/0/RSP0/CPU0:ASR9901-1#show run interface gi0/0/0/0 Wed Oct 19 15:21:21.122 UTC interface GigabitEthernet0/0/0/0 cdp vrf ORANGE ipv4 address 192.168.10.1 255.255.255.0 !

RP/0/RSP0/CPU0:ASR9901-1#show run router static Tue Feb 7 19:24:42.730 UTC router static vrf ORANGE address-family ipv4 unicast 172.16.20.0/24 192.168.10.2

ASR 9901-2 router

RP/0/RSP0/CPU0:ASR9901-2#show run int gi0/0/0/0

Wed Oct 19 15:40:18.599 UTC

interface GigabitEthernet0/0/0/0

cdp

vrf ORANGE

ipv4 address 192.168.10.2 255.255.255.0

!

RP/0/RSP0/CPU0:ASR9901-2#show run int gi0/0/0/6

Wed Oct 19 15:41:08.593 UTC

interface GigabitEthernet0/0/0/6

cdp

ipv4 address 172.16.20.1 255.255.255.0

!

CISCO 2911-3

CISCO2911-3#show run interface gigabitEthernet0/1

Building configuration...

Current configuration : 100 bytes

!

interface GigabitEthernet0/0

ip address 172.16.20.2 255.255.255.0

duplex auto

speed auto

end

CISCO2911-3#show run | section ip route

ip route 192.168.10.0 255.255.255.0 172.16.20.1

Test connectiviteit met ping, bijvoorbeeld, ASR9901-1 kan ASR 9901-2 pingen op VRF ORANGE.

RP/0/RSP0/CPU0:ASR9901-1#ping vrf ORANGE 192.168.10.2

Wed Oct 19 15:57:50.548 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 2/2/3 ms

ASR 9901-2 kan Cisco 291-3 op standaard-Vrf (GRT) pingen.

RP/0/RSP0/CPU0:ASR9901-2#ping 172.16.20.2

Wed Oct 19 15:58:05.961 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

Als u probeert de bereikbaarheid te testen van Subnet 192.168.10.0/24 op ASR9K-1 (VRF ORANGE) naar Subnet 172.16.20.0/24 op router 2911, moet deze test mislukken omdat er geen configuratie is geïmplementeerd op ASR9K-2 om de connectiviteit tussen VRF ORANGE en GRT te voltooien.

RP/0/RSP0/CPU0:ASR9901-1#ping 172.16.20.2 vrf ORANGE

Wed Oct 19 19:45:11.801 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

.....

Success rate is 0 percent (0/5)

Configuratie

Stap 1. Configureer een BGP-proces in ASR9K-2. Dit is de router die het routelek uitvoert en waar de configuratie moet worden toegepast. Naast de creatie van het BGP proces, moet u sommige netwerkverklaringen gebruiken om ervoor te zorgen dat de prefixes die u van plan bent om te lekken in de overeenkomstige BGP lijst worden geïnstalleerd:

RP/0/RSP0/CPU0:ASR9901-2#show run router bgp

Wed Oct 19 20:21:55.118 UTC

router bgp 100

bgp router-id 10.10.10.10

address-family ipv4 unicast

network 172.16.20.0/24

!

address-family vpnv4 unicast

!

vrf ORANGE

rd 100:100

address-family ipv4 unicast

network 192.168.10.0/24

!

!

!

RP/0/RSP0/CPU0:ASR9901-2#

Zoals u kunt zien, is er geen noodzaak om een BGP-buurt te maken, BGP is nodig om deze prefixes in de BGP-tabel te plaatsen.

Stap 2. Configureer het routebeleid, dit beleid is bedoeld om u te helpen filteren welke voorvoegsels mogen worden uitgelekt. In dit voorbeeld worden het routebeleid GLOBAL-2-VRF en het routebeleid VRF-2-GLOBAL gebruikt.

RP/0/RSP0/CPU0:ASR9901-2#show run route-policy GLOBAL-2-VRF

Wed Oct 19 20:37:56.548 UTC

route-policy GLOBAL-2-VRF

if destination in (172.16.20.0/24) then

pass

endif

end-policy

!

RP/0/RSP0/CPU0:ASR9901-2#show run route-policy VRF-2-GLOBAL

Wed Oct 19 20:38:10.538 UTC

route-policy VRF-2-GLOBAL

if destination in (192.168.10.0/24 le 32) then

pass

endif

end-policy

!

RP/0/RSP0/CPU0:ASR9901-2#

Stap 3. Configureer de VRF en pas het routebeleid toe dat bij de vorige stap is gemaakt met de opdrachten importeren van standaard-vrf routebeleid <beleidsnaam> en exporteren naar standaard-vrf routebeleid <beleidsnaam> zoals in de volgende uitvoer:

RP/0/RSP0/CPU0:ASR9901-2#show run vrf ORANGE

Wed Oct 19 20:40:38.851 UTC

vrf ORANGE

address-family ipv4 unicast

import from default-vrf route-policy GLOBAL-2-VRF

import route-target

100:100

!

export to default-vrf route-policy VRF-2-GLOBAL

export route-target

100:100

!

!

!

RP/0/RSP0/CPU0:ASR9901-2#

Definitieve verificatie

Zodra de vorige configuratie is vastgelegd, kunt u de bereikbaarheid van subnetnet 192.168.10.0/24 op ASR9K-1 (VRF ORANGE) aan subnetnet 172.16.20.0/24 op router 2911 verifiëren, die aanvankelijk faalde. Echter, met de juiste configuratie, deze ping test is nu succesvol:

RP/0/RSP0/CPU0:ASR9901-1#ping 172.16.20.2 vrf ORANGE

Wed Oct 19 22:07:47.897 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 2/2/3 ms

RP/0/RSP0/CPU0:ASR9901-1#

A debug ip icmp geconfigureerd op de router 2911 kan ook helpen te verifiëren of de router het echoantwoord terugstuurt naar ASR9K-1:

CISCO2911-3#debug ip icmp

ICMP packet debugging is on

CISCO2911-3#

CISCO2911-3#

*Oct 19 21:34:20.069: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.073: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.077: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.077: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.081: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

CISCO2911-3#

Een andere verificatie is om te controleren of de prefixes in de RIB- en BGP-tabellen verschijnen. In dit voorbeeld toont de GRT of default-vrf de volgende informatie:

RP/0/RSP0/CPU0:ASR9901-2#show route

Wed Oct 19 22:15:03.930 UTC

Codes: C - connected, S - static, R - RIP, B - BGP, (>) - Diversion path

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, su - IS-IS summary null, * - candidate default

U - per-user static route, o - ODR, L - local, G  - DAGR, l - LISP

A - access/subscriber, a - Application route

M - mobile route, r - RPL, t - Traffic Engineering, (!) - FRR Backup path

Gateway of last resort is not set

C    10.88.174.0/24 is directly connected, 1d20h, MgmtEth0/RSP0/CPU0/0

L    10.88.174.223/32 is directly connected, 1d20h, MgmtEth0/RSP0/CPU0/0

L    10.10.10.10/32 is directly connected, 04:33:44, Loopback100

C 172.16.20.0/24 is directly connected, 07:03:18, GigabitEthernet0/0/0/6

L    172.16.20.1/32 is directly connected, 07:03:18, GigabitEthernet0/0/0/6

B 192.168.10.0/24 is directly connected, 03:02:21, GigabitEthernet0/0/0/0 (nexthop in vrf ORANGE)

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#show ip bgp

Wed Oct 19 22:15:13.069 UTC

BGP router identifier 10.10.10.10, local AS number 100

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000000   RD version: 5

BGP main routing table version 5

BGP NSR Initial initsync version 3 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

*> 172.16.20.0/24 0.0.0.0 0 32768 i *> 192.168.10.0/24 0.0.0.0 0 32768 i

Processed 2 prefixes, 2 paths

RP/0/RSP0/CPU0:ASR9901-2#

Nu, de volgende output toont de informatie die voor VRF ORANGE wordt getoond:

RP/0/RSP0/CPU0:ASR9901-2#show route vrf ORANGE

Wed Oct 19 22:21:24.559 UTC

Codes: C - connected, S - static, R - RIP, B - BGP, (>) - Diversion path

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, su - IS-IS summary null, * - candidate default

U - per-user static route, o - ODR, L - local, G  - DAGR, l - LISP

A - access/subscriber, a - Application route

M - mobile route, r - RPL, t - Traffic Engineering, (!) - FRR Backup path

Gateway of last resort is not set

B 172.16.20.0/24 is directly connected, 01:43:49, GigabitEthernet0/0/0/6 (nexthop in vrf default) C 192.168.10.0/24 is directly connected, 07:06:38, GigabitEthernet0/0/0/0

L    192.168.10.2/32 is directly connected, 07:06:38, GigabitEthernet0/0/0/0

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#show bgp vrf ORANGE

Wed Oct 19 22:21:34.887 UTC

BGP VRF ORANGE, state: Active

BGP Route Distinguisher: 100:100

VRF ID: 0x60000003

BGP router identifier 10.10.10.10, local AS number 100

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000012   RD version: 9

BGP main routing table version 9

BGP NSR Initial initsync version 4 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 100:100 (default for vrf ORANGE)

*> 172.16.20.0/24 0.0.0.0 0 32768 i *> 192.168.10.0/24 0.0.0.0 0 32768 i

Processed 2 prefixes, 2 paths