Inhoud

Inleiding

Gebruik

ASR9K - Classic

ASR9K - eXR

NCSxxxx platforms en Whitebox

CRS

Cisco 8xxx

Inleiding

Dit document beschrijft de generieke reeks opdrachten die u bij Cisco IOS®-XR routers kunt verzamelen op het moment van/na een probleem voor TAC-cases.

Gebruik

De opdrachtlijst kan op de router CLI worden geplakt, zoals precies in de lijst staat, zonder dat er wijzigingen in worden aangebracht. Bepaalde opdrachten kunnen onjuist zijn als de overeenkomende functies niet zijn uitgevoerd. Dit is een verwachte uitkomst en geeft geen aanleiding tot problemen.

Deze gehele lijst kan in uw router worden gekopieerd/geplakt. Kunt u loggen op uw ssh/telnet-client eenvoudig opnemen.

ASR9K - Classic

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

show virtual-service list

ASR9K - eXR

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

NCSxxxx platforms en Whitebox

Dit is voor alle NCS platforms, bijvoorbeeld, maar niet beperkt tot NCS6K, NCS5K, NCS55xx, NCS540 en NCS560.

term length 0

show platform

admin show platform

show inventory

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

admin show environment

show led

admin show led

show alarms brief system active

show asic-errors all detail location 0/RP0/CPU0

show asic-errors all detail location 0/0/CPU0

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

CRS

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Cisco 8xxx

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show reboot history

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session