Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Instructies voor het terugzetten van een Cisco-router op fabriekswaarden

Methode 1

Methode 2

Verificatie

Inleiding

Dit document beschrijft hoe u een Cisco®-router kunt terugzetten op de oorspronkelijke fabrieksinstelling settings.

Voorwaarden

Vereisten

Om de procedures uit te voeren die in dit document worden beschreven, moet u toegang tot de router mogelijk hebben (ook bekend als bevoorrechte EXEC).

Router#  <<< Privileged EXEC mode

Gebruikte componenten

Dit document is niet beperkt tot specifieke software- en hardware-versies.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Conventies

Raadpleeg de Cisco Technical Tips Conventions voor meer informatie over documentconventies.

Instructies voor het terugzetten van een Cisco-router op fabriekswaarden

Er zijn twee hoofdmethoden om een Cisco-router terug te brengen naar de oorspronkelijke fabriekswaarden. Deze twee methodes worden hierna beschreven.

Opmerking: Raadpleeg voor informatie over de opdrachten in dit artikel de Cisco IOS Configuration Fundamentals Command Reference.

Methode 1

Deze methode gebruikt de opdracht econfig-register 0x2102 in de globale configuratiemodus.

1. Geef het bevel van de showversie uit om het configuratieregister op de router te controleren.

De instelling van het configuratieregister wordt weergegeven in de laatste regel van de opdrachtoutput van de showversie en moet worden ingesteld op 0x2102.

Router#show version

Cisco IOS Software, VG3X0 Software (VG3X0-UNIVERSALK9-M), Version 15.4(3)M3, RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2015 by Cisco Systems, Inc.

Compiled Fri 05-Jun-15 17:29 by prod_rel_team

ROM: System Bootstrap, Version 15.4(3r)M1a, RELEASE SOFTWARE (fc1)

Router uptime is 1 day, 14 hours, 14 minutes

System returned to ROM by power-on

System image file is "flash0:vg3x0-universalk9-mz.SPA.154-3.M3.bin"

Last reload type: Normal Reload

Last reload reason: power-on

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Cisco VG320 (revision 1.0) with 1003520K/45056K bytes of memory.

Processor board ID FGL2023103U

2 Gigabit Ethernet interfaces

1 Virtual Private Network (VPN) Module

DRAM configuration is 32 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

255488K bytes of ATA System CompactFlash 0 (Read/Write)

License Info:

License UDI:

-------------------------------------------------

Device#   PID                   SN

-------------------------------------------------

*0        VG320                 FGL2023103U

Technology Package License Information for Module:'vg3x0'

------------------------------------------------------------------------

Technology    Technology-package                  Technology-package

Current              Type           Next reboot

------------------------------------------------------------------------

ipbase        ipbasek9             None           ipbasek9

security      securityk9           RightToUse     securityk9

uc            None                 None           None

data          datak9               RightToUse     datak9

NtwkEss       None                 None           None

CollabPro     None                 None           None

Configuration register is 0x2102

Als dit niet het geval is, ga eens het bevel van het config-register 0x2102 op globale configuratiewijze in.

Router#configure terminal

Router(config)#config-register 0x2102

Router(config)#end

Router#

Als het bevel van de showversie opnieuw wordt uitgegeven, kan de zelfde lijn in de beveloutput (0x2102 bij volgende herlading) aan het huidige registerplaatsen worden toegevoegd.

2. Wis de huidige opstartconfiguratie op de router met de opdracht wissen.

3. Laad de router opnieuw met de opdracht Opnieuw laden. Wanneer dit wordt gevraagd save de configuratie, MAG NIET save.

Router#reload

System configuration has been modified. Save?  [yes/no]: n

Proceed with reload? [confirm]

Nadat de router is herladen, verschijnt het dialoogvenster Systeemconfiguratie.

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]:

De router wordt nu teruggesteld naar de oorspronkelijke fabriekswaarden.

Methode 2

Deze methode gebruikt het bevel config-register 0x2142 in globale configuratiewijze.

1. Voer de opdracht 0x2142 in voor configuratie-configuratie in globale modus.

Router(config)#config-register 0x2142

Hierdoor negeert de router de opstartconfiguratie bij het volgende herladen. Als u een showversie opnieuw in werking stelt, heeft het (0x2142 bij volgende herlading) toegevoegd aan het huidige configuratieregister setting.

Router#show version

Cisco IOS Software, VG3X0 Software (VG3X0-UNIVERSALK9-M), Version 15.4(3)M3, RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2015 by Cisco Systems, Inc.

Compiled Fri 05-Jun-15 17:29 by prod_rel_team

ROM: System Bootstrap, Version 15.4(3r)M1a, RELEASE SOFTWARE (fc1)

Router uptime is 1 day, 14 hours, 19 minutes

System returned to ROM by power-on

System image file is "flash0:vg3x0-universalk9-mz.SPA.154-3.M3.bin"

Last reload type: Normal Reload

Last reload reason: power-on

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Cisco VG320 (revision 1.0) with 1003520K/45056K bytes of memory.

Processor board ID FGL2023103U

2 Gigabit Ethernet interfaces

1 Virtual Private Network (VPN) Module

DRAM configuration is 32 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

255488K bytes of ATA System CompactFlash 0 (Read/Write)

License Info:

License UDI:

-------------------------------------------------

Device#   PID                   SN

-------------------------------------------------

*0        VG320                 FGL2023103U

Technology Package License Information for Module:'vg3x0'

------------------------------------------------------------------------

Technology    Technology-package                  Technology-package

Current              Type           Next reboot

------------------------------------------------------------------------

ipbase        ipbasek9             None           ipbasek9

security      securityk9           RightToUse     securityk9

uc            None                 None           None

data          datak9               RightToUse     datak9

NtwkEss       None                 None           None

CollabPro     None                 None           None

Configuration register is 0x2102 (will be 0x2142 at next reload)

2. Herlaad de router met het herladenbevel in toelaten wijze. Het is niet nodig save wanneer dit wordt gevraagd save de systeemconfiguratie.

Router#reload

System configuration has been modified. Save? [yes/no]: n

Proceed with reload? [confirm]

Nadat de router is herladen, verschijnt het dialoogvenster Systeemconfiguratie.

1. Voer de vraag in: Wilt u het dialoogvenster voor de eerste configuratie invoeren?

2. Het configuratieregister wijzigen setting naar 0x2102 met de opdracht configuratie-register 0x2102, eenmaal ingevoerd in globale configuratiemodus.

3. Geef de opdracht schrijfgeheugen uit in de inschakelmodus om de huidige opstartconfiguratie te overschrijven met de configuratie die momenteel wordt uitgevoerd.

4. Herlaad de router met het herladenbevel in toelaten wijze.

5. Nadat de router is herladen, verschijnt het dialoogvenster Systeemconfiguratie.

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]:

De router wordt nu teruggesteld naar de oorspronkelijke fabriekswaarden.

Opmerking: De volgende configuraties worden opgeslagen in ROMMON en de opdrachten schrijfwissen en/of configureren-register 0x2142 kunnen deze niet terugzetten naar de fabrieksstandaard settings.

- warme herstart

- geheugenformaat-afbeelding <geen standaard>

Verificatie

Deze sectie verstrekt informatie u kunt gebruiken om te verifiëren dat uw router op de fabrieksgebreken is teruggekomen.

Opmerking: Interne en buginformatie is alleen toegankelijk voor geregistreerde Cisco-clients.

- toon in werking stelt -in werking stellen-configureren — Gebruik dit bevel om te verifiëren dat de vorige configuratie dat de router liep is gewist. De output moet resulteren in een skelet configuratie. Bijvoorbeeld, moet er geen IP adressen of beschrijvingen zijn die onder om het even welke interface op de router, geen hostname of instellingen specifiek voor uw milieu worden gevormd.

- toon versie — Gebruik dit bevel om te verifiëren dat het configuratieregister aan de standaardwaarde van 0x2102 wordt geplaatst.