Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Verwante producten

Conventies

EtherSwitch-modules - concepten

Configureren

Netwerkdiagram

Configuraties

Eerste configuratie van EtherSwitch-module

VTP en VLAN configureren

Spanning Tree, Trunk- en poortkanaal configureren

Access-poort instellen

Spraakpoort configureren

Routing configureren

QoS configureren

Verifiëren

Problemen oplossen

Gerelateerde informatie

Inleiding

Dit document biedt een voorbeeldconfiguratie voor de EtherSwitch-servicemodule die in de geïntegreerde services router (ISR) is geïnstalleerd. Dit document bespreekt niet het configuratievoorbeeld voor de EtherSwitch-netwerkmodule.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco 2800 Series router op Cisco IOS® softwarerelease 12.4(10)XR

- NME 1600E-16G-P 16-poorts 10/100 Cisco EtherSwitch-servicemodule

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Verwante producten

Deze configuratie kan ook worden gebruikt met Cisco 2600/3600/3700/3800 Series routers.

Raadpleeg tabel 6 in Cisco EtherSwitch-servicemodules - Gegevensblad voor meer informatie.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

EtherSwitch-modules - concepten

Dit zijn de twee types van EtherSwitch modules beschikbaar voor Cisco ISRs:

- EtherSwitch-servicemodule (ES)—ES-modules hebben hun eigen processors, switchingmotoren, software en flash-geheugen die onafhankelijk van de host-routerbronnen werken. Nadat de ES module in de router is geïnstalleerd, kunt u de ES-module vanaf de host-router troosten. U kunt vervolgens VLAN’s maken, VLAN’s configureren, boom omoverslaan en Virtual Terminal Protocol (VTP) vanaf de ES-module. ES-modules zijn gebaseerd op Catalyst 3750-platform. Dit document geeft alleen het configuratievoorbeeld voor de ES-module weer.

- Raadpleeg Cisco EtherSwitch-servicemodules - Gegevensblad voor meer informatie over ES-modules.

- Raadpleeg de functiegids voor Cisco EtherSwitch-servicemodules voor informatie over het beheer van de EtherSwitch-modules.

- Raadpleeg Catalyst 3750 Series-switches - Configuration Guides voor informatie over de configuratie van ES-modules.

- EtherSwitch-netwerkmodule (ESW)-ESW-modules worden geconfigureerd door IOS-router. Deze modules werken geen afzonderlijke software. Het wordt geïntegreerd in de host router IOS. U kunt VLAN’s maken, VLAN’s configureren, boom overslaan en VTP vanaf de host-router. De router slaat het VLAN-gegevensbestand (vlan.dat) in de flitser op.

- Raadpleeg Cisco EtherSwitch-netwerkmodules - Gegevensblad voor meer informatie over ESW-modules.

- Raadpleeg de functiekaart voor Cisco EtherSwitch-netwerkmodules voor informatie over de configuratie van ESW-modules.

- Raadpleeg het ESW-configuratievoorbeeld (EtherSwitch Network Module) voor informatie over de basisconfiguratie van de ESW-module.

Configureren

Deze sectie bevat informatie over het configureren van de functies die in dit document worden beschreven.

Opmerking: Gebruik het Opname Gereedschap (alleen geregistreerde klanten) om meer informatie te verkrijgen over de opdrachten die in deze sectie worden gebruikt.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Configuraties

Dit document gebruikt deze configuraties:

- Eerste configuratie van EtherSwitch-module

- VTP configureren, VLAN

- Spanning Tree, Trunk- en poortkanaal configureren

- Access-poort instellen

- Spraakpoort configureren

- Routing configureren

- QoS configureren

Eerste configuratie van EtherSwitch-module

Nadat de ES module op de router is geïnstalleerd, ziet u een nieuwe Gigabit Ethernet interface x/0 (waar x het sleufnummer is) door IOS herkend. Deze uitvoer wordt uitgevoerd nadat de ES module op de router is geïnstalleerd:

Router1#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0         1.1.1.3         YES NVRAM  up                    down

GigabitEthernet0/1         unassigned      YES NVRAM  administratively down down

GigabitEthernet1/0         unassigned      YES unset  administratively down down

Vlan1                      unassigned      YES NVRAM  up                    up

De service-module Gigabit Ethernet x/0 sessie opdracht is het bevoorrechte EXEC mode bevel dat wordt gebruikt om in de ES module van de host router te troosten. U dient de ES-module te troosten om deze te configureren. Om in de ES module te console, is het vereist om het IP adres voor de Gigabit Ethernet interface x/0 te configureren. Als u probeert om in de module te console zonder een IP adres toe te wijzen, ontvangt u deze foutmelding:

Router1#service-module gigabitEthernet 1/0 session

IP address needs to be configured on interface GigabitEthernet1/0

router1

Find out the router interface connected to the ES module.

Router1#show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID    Local Intrfce   Holdtme    Capability   Platform    Port ID

Lab-2811     Gi 1/0          157               R     NME-16ES-1G Gi 1/0/2

!--- The Local interface shows the interface !--- on the router connected internally to the switch.

Configure the host router to manage the ES module.

Router1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router1(config)#interface gigabitethernet 1/0

Router1(config-if)#ip address 172.16.1.1 255.255.255.0

Router1(config-if)#no shutdown

Router1(config-if)#exit

Router1(config)#exit

Console into the ES Module

Router1#service-module gigabitEthernet 1/0 session

Trying 172.16.1.1, 2066 ... Open

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]:

Switch>enable

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#hostname Switch-ES

Switch-ES(config)#interface gigabitethernet 1/0/2

Switch-ES(config-if)#no switchport

Switch-ES(config-if)#ip address 172.16.1.2 255.255.255.0

Switch-ES(config-if)#exit

!--- GigabitEthernet 1/0/2 connects the ES module to the router.

Switch-ES(config)#line console 0

Switch-ES(config-line)#password a99l3

Switch-ES(config-line)#exec-timeout 30

Switch-ES(config-line)#exit

Switch-ES(config)#line vty 0 4

Switch-ES(config-line)#password a99l3

Switch-ES(config-line)#login

Switch-ES(config-line)#exec-timeout 30

Switch-ES(config-line)#exit

Deze uitvoer toont de tonen ip interface korte opdracht van de ES module. De Gigabit Ethernet1/0/2 interface sluit de ES module aan op de Gigabit Ethernet1/0 interface van de host router.

Switch-ES#show ip int brief

Interface              IP-Address      OK? Method Status                Protocol

Vlan1                  unassigned      YES unset  administratively down down

FastEthernet1/0/1      unassigned      YES unset  down                  down

FastEthernet1/0/2      unassigned      YES unset  down                  down

FastEthernet1/0/3      unassigned      YES unset  down                  down

FastEthernet1/0/4      unassigned      YES unset  down                  down

FastEthernet1/0/5      unassigned      YES unset  down                  down

FastEthernet1/0/6      unassigned      YES unset  down                  down

FastEthernet1/0/7      unassigned      YES unset  down                  down

FastEthernet1/0/8      unassigned      YES unset  down                  down

FastEthernet1/0/9      unassigned      YES unset  down                  down

FastEthernet1/0/10     unassigned      YES unset  down                  down

FastEthernet1/0/11     unassigned      YES unset  down                  down

FastEthernet1/0/12     unassigned      YES unset  down                  down

FastEthernet1/0/13     unassigned      YES unset  down                  down

FastEthernet1/0/14     unassigned      YES unset  down                  down

FastEthernet1/0/15     unassigned      YES unset  down                  down

FastEthernet1/0/16     unassigned      YES unset  down                  down

GigabitEthernet1/0/1   unassigned      YES unset  down                  down

GigabitEthernet1/0/2   172.16.1.2      YES manual  up                    up

Als de ES-module of de apparaten die op deze ES-module zijn aangesloten moeten communiceren met het externe netwerk via de host-router, moet deze poort (Gigabit Ethernet1/0/2) een Layer 3-poort zijn of moet deze een lid zijn van Layer 3 VLAN. Zie de sectie Routing van dit document configureren om de routing op basis van de ES-module te configureren.

In dit diagram worden de host-router en de logische connectiviteit van de ES-module uitgelegd:

U moet op Ctrl+Shift+6 drukken en vervolgens X om terug te keren naar de host-router.

Als u de sessie van de router moet ontruimen, geef de service-module gigabitEthernet x/0 sessie uit bevel van de router bevoorrechte EXEC modus.

VTP en VLAN configureren

Standaard is de VTP-modus server en is de VTP-domeinnaam ongeldig in de ES-module. Standaard behoren alle poorten tot VLAN1. In dit voorbeeld wordt een DHCP-server (172.16.10.20) in VLAN 10 gesitueerd. Het ip-adres 172.16.10.20 wordt op alle VLAN's behalve VLAN 10 geconfigureerd om de IP-adressen van de VLAN te krijgen DHCP-server voor de apparaten in deze VLAN’s.

Switch-ES

VTP Configuration

Switch-ES(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode.

Switch-ES(config)#vtp domain LAB

Changing VTP domain name from NULL to LAB

Switch-ES(config)#

Create VLANs

Switch-ES(config)#vlan 10,50,51,100,200

Switch-ES(config-vlan)#exit

Switch-ES(config)#

Configure VLANs

Switch-ES(config)#interface vlan 10

Switch-ES(config-if)#ip address 172.16.10.1 255.255.255.0

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 50

Switch-ES(config-if)#ip address 172.16.50.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 51

Switch-ES(config-if)#ip address 172.16.51.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 100

Switch-ES(config-if)#ip address 172.16.100.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 200

Switch-ES(config-if)#ip address 172.16.200.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa1/0/1, Fa1/0/2, Fa1/0/3

Fa1/0/4, Fa1/0/7, Fa1/0/8

Fa1/0/9, Fa1/0/10, Fa1/0/11

Fa1/0/12, Fa1/0/13, Fa1/0/14

Fa1/0/15, Fa1/0/16, Gi1/0/1

Gi1/0/2

10   VLAN0010                         active

50   VLAN0050                         active

51   VLAN0051                         active

100  VLAN0100                         active

200  VLAN0200                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

10   enet  100010     1500  -      -      -        -    -        0      0

50   enet  100050     1500  -      -      -        -    -        0      0

51   enet  100051     1500  -      -      -        -    -        0      0

100  enet  100100     1500  -      -      -        -    -        0      0

200  enet  100200     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Remote SPAN VLANs

------------------------------------------------------------------------------

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

Switch-ES#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 10

VTP Operating Mode              : Transparent

VTP Domain Name                 : LAB

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0x21 0x51 0xD5 0x4E 0x30 0xA5 0x46 0x3C

Configuration last modified by 0.0.0.0 at 10-27-06 18:28:10

Spanning Tree, Trunk- en poortkanaal configureren

Deze sectie toont de configuratie van de overspannende-boom op de ES module en de schakelaar Access1. Deze sectie toont ook het havenkanaal en de boomconfiguratie tussen de ES module en de Access1 schakelaar. Dit voorbeeld vormt de snelle overspannende boom op alle switches. De ES module wordt ingesteld als de omspannende-boomwortel voor alle VLAN’s.

Switch-ES

Spanning-Tree Configuration

Switch-ES(config)#spanning-tree mode rapid-pvst

Switch-ES(config)#spanning-tree vlan 10,50,51,100,200 root primary

Trunk & Port Channel Configuration

Switch-ES(config)#interface port-channel 1

Switch-ES(config-if)#switchport trunk encapsulation dot1q

Switch-ES(config-if)#switchport mode trunk

Switch-ES(config-if)#switchport trunk allowed vlan 100,200

Switch-ES(config-if)#exit

Switch-ES(config)#interface range fastethernet 1/0/5-6

Switch-ES(config-if-range)#switchport trunk encapsulation dot1q

Switch-ES(config-if-range)#switchport mode trunk

Switch-ES(config-if-range)#switchport trunk allowed vlan 100,200

Switch-ES(config-if-range)#channel-group 1 mode on

Switch-ES(config-if-range)#exit

Toegang1

Access1 switch configuration

Access1(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode.

Access1(config)#vtp domain LAB

Changing VTP domain name from NULL to LAB

Access1(config)#vlan 100,200

Access1(config-vlan)#exit

Access1(config)#spanning-tree mode rapid-pvst

Access1(config)#interface port-channel 1

Access1(config-if)#switchport trunk encapsulation dot1q

Access1(config-if)#switchport mode trunk

Access1(config-if)#switchport trunk allowed vlan 100,200

Access1(config-if)#exit

Access1(config)#interface range FastEthernet 0/1 - 2

Access1(config-if-range)#switchport trunk encapsulation dot1q

Access1(config-if-range)#switchport mode trunk

Access1(config-if-range)#switchport trunk allowed vlan 100,200

Access1(config-if-range)#channel-group 1 mode on

Access1(config-if-range)#exit

Switch-ES#show spanning-tree summary

Switch is in rapid-pvst mode

Root bridge for: VLAN0001, VLAN0100, VLAN0200

Extended system ID           is enabled

Portfast Default             is disabled

PortFast BPDU Guard Default  is disabled

Portfast BPDU Filter Default is disabled

Loopguard Default            is disabled

EtherChannel misconfig guard is enabled

UplinkFast                   is disabled

BackboneFast                 is disabled

Configured Pathcost method used is short

Name                   Blocking Listening Learning Forwarding STP Active

---------------------- -------- --------- -------- ---------- ----------

VLAN0001                     0         0        0          1          1

VLAN0100                     0         0        0          1          1

VLAN0200                     0         0        0          1          1

---------------------- -------- --------- -------- ---------- ----------

3 vlans                      0         0        0          3          3

Switch-ES#show interface port-channel 1 trunk

Port        Mode         Encapsulation  Status        Native vlan

Po1         on           802.1q         trunking      1

Port      Vlans allowed on trunk

Po1         100,200

Port        Vlans allowed and active in management domain

Po1         100,200

Port        Vlans in spanning tree forwarding state and not pruned

Po1         100,200

Access-poort instellen

De configuratie van de toegangspoort is vergelijkbaar met de standaardconfiguratie van de LAN-schakelaar.

Switch-ES

Configure the port for server

Switch-ES(config)#interface fastEthernet 1/0/7

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 10

Switch-ES(config-if)#spanning-tree portfast

Switch-ES(config-if)#speed 100

Switch-ES(config-if)#duplex full

Switch-ES(config-if)#exit

Configure Port for Printer

Switch-ES(config)#interface fastethernet 1/0/8

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 51

Switch-ES(config-if)#spanning-tree portfast

Switch-ES(config-if)#exit

Spraakpoort configureren

De configuratie van de spraakpoort is gelijk aan de standaard LAN-switchconfiguratie.

Switch-ES

Configure the port for Voice

Switch-ES(config)#interface fastethernet 1/0/9

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 51

Switch-ES(config-if)#switchport voice vlan 50

Switch-ES(config-if)#spanning-tree portfast

Routing configureren

Dit voorbeeld gebruikt statische routes om het routing te configureren.

Switch-ES

Configure the default route

Switch-ES(config)#ip routing

Switch-ES(config)#ip route 0.0.0.0 0.0.0.0 172.16.1.1

router1

Configure the route to LAN

Router1(config)#ip route 172.16.0.0 255.255.0.0 172.16.1.2

QoS configureren

Deze sectie gebruikt auto QoS om QoS te configureren. Raadpleeg het Witboek AutoQoS van Cisco voor meer informatie over auto-QoS.

Switch-ES

Configure QoS on the port where IP phone is connected

Switch-ES(config)#interface fastethernet 1/0/9

Switch-ES(config-if)#auto qos voip cisco-phone

Switch-ES(config-if)#exit

Configure QoS on the uplink port to the host router.

Switch-ES(config)#interface gigabitEthernet 1/0/2

Switch-ES(config-if)#auto qos voip trust

router1

Create Class map

Router1(config)#class-map match-any VoIP-Control

Router1(config-cmap)#match ip dscp AF31

Router1(config-cmap)#exit

Router1(config)#class-map match-any VoIP-RTP

Router1(config-cmap)#match ip dscp EF

Router1(config-cmap)#exit

Create Policy map

Router1(config)#policy-map Policy-VoIP

Router1(config-pmap)#class VoIP-RTP

Router1(config-pmap-c)#priority percent 70

Router1(config-pmap-c)#class VoIP-Control

Router1(config-pmap-c)#bandwidth percent 5

Router1(config-pmap-c)#class class-default

Router1(config-pmap-c)#fair-queue

Router1(config-pmap-c)#exit

Router1(config-pmap)#exit

Apply the policy on the interface connects to the ES Module

Router1(config)#interface gigabitEthernet 1/0

Router1(config-if)#service-policy output Policy-VoIP

Router1(config-if)#exit

Verifiëren

Er is momenteel geen verificatieprocedure beschikbaar voor deze configuratie.

Problemen oplossen

Er is momenteel geen specifieke troubleshooting-informatie beschikbaar voor deze configuratie.

Gerelateerde informatie

- Routerinterfaces en -modules voor probleemoplossing

- Ondersteuning van routers

- Technische ondersteuning en documentatie – Cisco Systems