Inhoud

Inleiding

Probleem

Oplossing

Inleiding

Dit document beschrijft op RCM gebaseerde UPF die niet in staat is om de configuratiepush (host/ecs/apn) te krijgen vanwege een probleem in NSO-kant

Probleem

Nadat de RCM (Redundancy Configuration Manager) de UPF (User Plane Function) opnieuw heeft opgestart, stuurt de RCM, zodra de RCM de configuratiefout van de UPF heeft ontvangen, een kennisgevingsbericht naar de NSO (Network Services Orchestrator), om verder te gaan naar de volgende stap - om de host,ecs, apn-configuratiebestanden in die volgorde te duwen.

Maar in NSO wordt de kwestie geïdentificeerd wanneer het tijdstempel van de RCM verzonden bericht wordt ontleed.

# NSO gaat niet verder voor configuratie duw naar UPF wanneer tijdstempel van de kennisgeving in het formaat is (Observe microseconde veld NIET aanwezig)

netconf-meldingen ontvangen-kennisgevingen 2024-01-25T04:59:30+00:00 0

//Sample notification - does not work on NSO

netconf-notifications received-notifications notification 2024-01-25T04:59:30+00:00 0

user          <NSO username>

subscription  alert-notification

stream        alert-notification

received-time 2024-01-25T04:59:30.042866+00:00

data smi-alert-notification starts-at ""

data smi-alert-notification ends-at ""

data smi-alert-notification alert-status Config-Push

NAME           VALUE

-------------------------------

DeviceID

Event          Config-Push

GroupID        2

ManagementIP   <IPv4 address>

NameSpace      <rcm-namespace>

RCMVIP         <IPv4 address>

RecoveryState

SSHIP          <IPv4 address>

UPFState       STANDBY

# NSO gaat voor configureren wanneer timestamp van de kennisgeving in het formaat is (Observe microseconde veld is aanwezig)

netconf-meldingen ontvangen-kennisgevingen 2024-01-25T04:43:30.045+00:00 0

//Sample notification - working on NSO

netconf-notifications received-notifications notification 2024-01-25T04:43:30.045+00:00 0

user          <NSO username>

subscription  alert-notification

stream        alert-notification

received-time 2024-01-25T04:43:30.087872+00:00

data smi-alert-notification starts-at ""

data smi-alert-notification ends-at ""

data smi-alert-notification alert-status Config-Push

NAME           VALUE

-------------------------------

DeviceID

Event          Config-Push

GroupID        2

ManagementIP  <IPv4 address>

NameSpace      <rcm-namespace>

RCMVIP        <IPv4 address>

RecoveryState

SSHIP          <IPv4 address>

UPFState       STANDBY

Opmerking: NSO-kennisgevingen kunnen worden aangevraagd bij de productieomgeving uit de NSO-logbestanden.

Oplossing

Op dit moment heeft RCM een timer van 100 minuten wachten tijd waarna het de vastzittende UPF opnieuw opstart, wachtend op de configuratie van NSO.

De nevenfix van NSO komt via Cisco bug-id CSCwi70899