Inhoud

Inleiding

Achtergrondinformatie

Afkortingen

Werkstroom van de MoP

Spineswitch in UltraM Setup

Voorwaarden

Gezondheidscontroles

Switch-vervangingsprocedure

Verificatie van vervangen spineswitch

Inleiding

In dit document worden de stappen beschreven die vereist zijn om een defecte centrifugeerschakelaar (Nexus 9236C) te vervangen bij een Ultra-M instelling.

Deze procedure is van toepassing op een OpenStack-omgeving via NEWTON-versie waarbij ESC Cisco Prime Access Registrar (CPAR) niet beheert en CPAR rechtstreeks op de VM wordt geïnstalleerd die op OpenStack wordt geïnstalleerd.

Achtergrondinformatie

Ultra-M is een vooraf verpakte en gevalideerde gevirtualiseerde mobiele pakketoplossing die is ontworpen om de plaatsing van VPN's te vereenvoudigen. De servers die deel uitmaken van de Ultra-M-instelling, zijn verbonden met drie verschillende typen switches:

- Catalyst switch

- bladeswitch

- Spineswitch

Dit beeld toont de netwerktopologie van een instelling Ultra-M:

Opmerking: De topologie van het Netwerk is slechts een vertegenwoordiging, de verbindingen tussen de switches zouden lichtjes kunnen variëren, het hangt van de uitgezette oplossing af.

Dit document is bedoeld voor het Cisco-personeel dat bekend is met de functies Cisco Ultra-M I en Catalyst Switch.

Afkortingen

VNF

Virtuele netwerkfunctie

CENTRIFUGEREN

Nexus 9236C switch als spine

MOP

Procedure

LAN

Local Area Network

FTP

File Transfer Protocol

TFTP

Triviaal File Transfer Protocol

CIMC

Cisco geïntegreerde beheercontroller

Werkstroom van de MoP

Deze afbeelding toont het werkschema van de vervangingsprocedure op hoog niveau.

Spineswitch in UltraM Setup

Voorwaarden

Neem een back-up van het configuratiebestand uit de spineswitch door FTP/TFTP voordat het verder gaat met de switchvervanging.

AL03-N9236c-POD2-spine1# copy running-config sftp:

Enter destination filename: [AL03-N9236c-POD2-spine1-running-config] backup-spine-cfg-2

Enter vrf (If no input, current vrf 'default' is considered): management

Enter hostname for the sftp server: 10.1.1.1

Enter username: root

The authenticity of host '10.1.1.1 (10.1.1.1)' can't be established.

ECDSA key fingerprint is SHA256:dnHSXQ6fyYX5v8DU87oqVkCoA8CSPW7CpT+o2qilNI4.

Are you sure you want to continue connecting (yes/no)? yes

Warning: Permanently added '10.1.1.1' (ECDSA) to the list of known hosts.

root@10.1.1.1's password:

Connected to 10.1.1.1.

sftp> put /var/tmp/vsh/backup-spine-cfg-2 backup-spine-cfg-2

Uploading /var/tmp/vsh/backup-spine-cfg-2 to /root/backup-spine-cfg-2

/var/tmp/vsh/backup-spine-cfg-2 0% 0 0.0KB/s --:-- ETA /var/tmp/vsh/backup-spine-cfg-2 100% 11KB 11.2KB/s 00:00

sftp> exit

Copy complete, now saving to disk (please wait)...

Copy complete.

Gezondheidscontroles

Stap 1. Controleer de huidige softwareversie die in de schakelaar draait en noteer deze.

AL03-N9236c-POD2-spine1# show ver

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (C) 2002-2018, Cisco and/or its affiliates.

All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under their own

licenses, such as open source. This software is provided "as is," and unless

otherwise stated, there is no warranty, express or implied, including but not

limited to warranties of merchantability and fitness for a particular purpose.

Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or

GNU General Public License (GPL) version 3.0 or the GNU

Lesser General Public License (LGPL) Version 2.1 or

Lesser General Public License (LGPL) Version 2.0.

A copy of each such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://opensource.org/licenses/gpl-3.0.html and

http://www.opensource.org/licenses/lgpl-2.1.php and

http://www.gnu.org/licenses/old-licenses/library.txt.

Software

BIOS: version 07.59

NXOS: version 7.0(3)I7(3)

BIOS compile time: 08/26/2016

NXOS image file is: bootflash:///nxos.7.0.3.I7.3.bin

NXOS compile time: 2/12/2018 13:00:00 [02/12/2018 19:13:48]

Hardware

cisco Nexus9000 C9236C chassis

Intel(R) Xeon(R) CPU @ 1.80GHz with 16400560 kB of memory.

Processor Board ID FDO211613CA

Device name: AL03-N9236c-POD2-spine1

bootflash: 53298520 kB

Kernel uptime is 134 day(s), 14 hour(s), 48 minute(s), 25 second(s)

Last reset at 705173 usecs after Fri Mar 2 17:56:31 2018

Reason: Reset due to upgrade

System version: 7.0(3)I5(2)

Service:

plugin

--More-- Core Plugin, Ethernet Plugin

Active Package(s):

Stap 2. Controleer het huidige licentiegebruik.

AL03-N9236c-POD2-spine1# show license uasgesage

Feature Ins Lic Status Expiry Date Comments

Count

--------------------------------------------------------------------------------

N9K_LIC_1G No - Unused -

VPN_FABRIC No - Unused -

FCOE_NPV_PKG No - Unused -

SECURITY_PKG No 0 Unused -

N9K_UPG_EX_10G No - Unused -

TP_SERVICES_PKG No - Unused -

NXOS_ADVANTAGE_GF No - Unused -

NXOS_ADVANTAGE_M4 No - Unused -

NXOS_ADVANTAGE_XF No - Unused -

NXOS_ESSENTIALS_GF No - Unused -

NXOS_ESSENTIALS_M4 No - Unused -

NXOS_ESSENTIALS_XF No - Unused -

SAN_ENTERPRISE_PKG No - Unused -

PORT_ACTIVATION_PKG No 0 Unused -

NETWORK_SERVICES_PKG No - Unused -

NXOS_ADVANTAGE_M8-16 No - Unused -

NXOS_ESSENTIALS_M8-16 No - Unused -

FC_PORT_ACTIVATION_PKG No 0 Unused -

LAN_ENTERPRISE_SERVICES_PKG Yes - In use Never -

--------------------------------------------------------------------------------

Stap 3. Zorg ervoor dat de fysieke kabels die zijn aangesloten op het kanaal van de schakelaar, VLAN en ook de poortstatus goed zijn zoals verwacht.

AL03-N9236c-POD2-spine1# show interface status | grep connected

mgmt0 -- connected routed full 100 --

Eth1/1 Connected to leaf1 connected trunk full 100G QSFP-100G-AOC5M

Eth1/2 Connected to leaf1 connected trunk full 100G QSFP-100G-AOC5M

Eth1/4 Connected to leaf2 connected trunk full 100G QSFP-100G-AOC5M

Eth1/5 Connected to leaf2 connected trunk full 100G QSFP-100G-AOC5M

Eth1/7 Connected to Leaf3 connected trunk full 100G QSFP-100G-AOC5M

Eth1/8 Connected to Leaf3 connected trunk full 100G QSFP-100G-AOC5M

Eth1/10 connect leaf4 connected trunk full 100G QSFP-100G-AOC5M

Eth1/11 connect leaf4 connected trunk full 100G QSFP-100G-AOC5M

Eth1/21/1 Connected to NMNET connected 101 full 10G QSFP-40G-SR4

Eth1/29 Connected to AL04- connected trunk full 100G QSFP-100G-AOC5M

Eth1/30 Connected to AL04- connected trunk full 100G QSFP-100G-AOC5M

Eth1/36/1 connected to ARG | connected routed full 10G QSFP-40G-SR4

Eth1/36/2 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Eth1/36/3 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Eth1/36/4 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Po10 -- connected routed full 10G --

Po10.3101 -- connected routed full 10G --

Po10.3109 -- connected routed full 10G --

Po18 -- connected trunk full 100G --

Po21 -- connected trunk full 100G --

Po22 -- connected trunk full 100G --

Po25 -- connected trunk full 100G --

Po26 -- connected trunk full 100G --

Lo1 -- connected routed auto auto --

Vlan101 -- connected routed auto auto --

Vlan1025 vPCRF 1 and vPCRF connected routed auto auto --

Vlan1026 Replication for vP connected routed auto auto --

Vlan1031 External Traffic v connected routed auto auto --

Vlan1032 External External connected routed auto auto --

Vlan1033 External Traffic connected routed auto auto --

Vlan1034 External Traffic v connected routed auto auto --

Vlan1035 External Traffic v connected routed auto auto --

Vlan1036 External Traffic v connected routed auto auto --

Vlan1041 External Traffic A connected routed auto auto --

Vlan1042 External Traffic A connected routed auto auto --

Vlan1043 External Traffic A connected routed auto auto --

Vlan2601 Global Interchassi connected routed auto auto --

Vlan2602 NMNET Interchassis connected routed auto auto --

Stap 4. Zorg ervoor dat de BGP-buren opstaan.

AL03-N9236c-POD2-spine1# show ip bgp summary vrf all

BGP summary information for VRF NMNET, address family IPv4 Unicast

BGP router identifier 10.225.247.201, local AS number 65361

BGP table version is 2, IPv4 Unicast config peers 2, capable peers 1

0 network entries and 0 paths using 0 bytes of memory

BGP attribute entries [0/0], BGP AS path entries [0/0]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

10.0.100.6 4 65361 193834 193833 2 0 0 19w1d 0

10.250.180.185 4 65137 0 0 0 0 0 19w1d Idle

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 10.0.200.1, local AS number 65361

BGP table version is 161, IPv4 Unicast config peers 2, capable peers 2

18 network entries and 29 paths using 5700 bytes of memory

BGP attribute entries [3/480], BGP AS path entries [1/6]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

10.0.100.2 4 65361 3868481 3868419 161 0 0 19w1d 12

10.163.140.225 4 65137 3868521 3868365 161 0 0 19w1d 5

AL03-N9236c-POD2-spine1# show ipv6 bgp summary vrf all

Stap 5. Zorg ervoor dat de BFD-buurstaat in orde is.

AL03-N9236c-POD2-spine1# show bfd neighbors vrf all

OurAddr NeighAddr LD/RD RH/RS Holdown(mult) State Int Vrf

10.163.140.226 10.163.140.225 1090519042/1090519042 Up 107(3) Up Po10.3101 default

AL03-N9236c-POD2-spine1# show bfd ipv6 neighbor vrf all

Switch-vervangingsprocedure

Stap 1. Installeer de nieuwe schakelaar in het rek en sluit de kabels aan op de schakelaar zoals aangegeven. De stappen voor installatie van de schakelaar kunnen in deze link worden gevonden:  Spine Nexus 2360C NX-OS mode switch hardwareinstallatiehandleiding

Stap 2. Controleer de softwareversie van de Nexus Spine-switch en upgrade/downgrade naar de softwareversie volgens de gegeven link:  Cisco Nexus 9000 Series NX-OS software-upgrade en downgraads, release 7.x

Stap 3. Breng de configuratie back-up over naar de nieuwe schakelaar en kopieer die configuratie naar de opstartconfiguratie.

server-backup$ sftp admin@10.1.1.1

The authenticity of host '10.1.1.1 (10.1.1.1)' can't be established.

RSA key fingerprint is SHA256:fnbUmd2mL5yE94zxrRoKAlvYfQbheXJfQox7m3XfpIU.

Are you sure you want to continue connecting (yes/no)? yes

Warning: Permanently added '10.1.1.1' (RSA) to the list of known hosts.

User Access Verification

Password:

Password:

Connected to 10.1.1.1.

sftp> ls

20170607_193430_poap_15489_1.log     20170607_193430_poap_15489_2.log     20170607_193430_poap_15489_init.log  backup-spine-cfg-2                   backup-spine.cfg

backup_run_02152018                  bios_daemon.dbg                      cfg-july25th                         cfg-july25th-spine1                  flash:

flash:cfg-aug8th-ybattina-afterNSO   flash:cfg-jul28th                    home                                 l3-cfg-aug10th                       license_FDO211406K1_16.lic

lost+found                           nxos.7.0.3.I4.4.bin                  nxos.7.0.3.I5.2.bin                  nxos.7.0.3.I7.3.bin                  platform-sdk.cmd

scripts                              spine-config-bkp                     starat                               virtual-instance                     vlan.dat                                                                                                                                                                  100%   33KB  21.7KB/s   00:01

sftp> put backup-spine-cfg-2

Uploading backup-spine-cfg-2 to /backup-spine-cfg-2

backup-spine-cfg-2                                                                                                                                      100%   33KB  23.5KB/s   00:01

sftp> bye

AL03-N9236c-POD2-spine1# copy bootflash:///backup-spine-cfg-2 startup-config

Copy progress 100% 33KB

Copy complete, now saving to disk (please wait)...

Copy complete.

Stap 4. Neem de schakelaar opnieuw op nadat u de reserveconfiguratie hebt geladen.

AL03-N9236c-POD2-spine1#reload

Verificatie van vervangen spineswitch

Nadat de schakelaar voor toegang beschikbaar is, voert u de gezondheidscontroles door deze opdrachten op de spineswitch uit om te controleren of de vervangen schakelaar in verwachte staat beschikbaar is.

AL03-N9236c-POD2-spine1# show port-channel summary

AL03-N9236c-POD2-spine1# show ip bgp summary vrf all

AL03-N9236c-POD2-spine1# show ipv6 bgp summary vrf all

AL03-N9236c-POD2-spine1# show bfd neighbor vrf all

AL03-N9236c-POD2-spine1# show bfd ipv6 neighbor vrf all