Inhoud

Inleiding

Achtergrondinformatie

Afkortingen

Voorwaarde voor probleemoplossing bij vPC-poortkanalen

vPC-validatie

1. vPC Status: toon vpc

2. vPC Rollen, vPC System mac en LAG ID: toon vpc rol

3. Poortkanaal Status: toon poortkanaal-kanaal uitgebreid

4. TEP details en Logical Peer-link status: toon systeem interne epm vpc

5. ZMQ Connection details: toon systeem interne vpcm zmq statistieken

Problemen met VPC-poortkanaal oplossen

1. Fysieke poort is niet beschikbaar

2. Schorsing door LACP

3. Opschorting door vPC

4. LACS schorst individuele

Andere fouten

1. mcp-loop-err-uitschakelen

2. Uitschakelen van bpdu-guard-err

Inleiding

Dit document beschrijft hoe u problemen kunt identificeren en oplossen die zich met vPC in ACI kunnen voordoen.

Achtergrondinformatie

Een virtueel poortkanaal (vPC) maakt het mogelijk dat koppelingen die fysiek verbonden zijn met twee verschillende ACI-bladknooppunten als één poortkanaal worden weergegeven naar een derde switch (dat wil zeggen netwerkmodule, server of een ander netwerkapparaat dat de technologie voor linkaggregatie ondersteunt). vPC's bestaan uit twee ACI-switches die zijn aangewezen als vPC-peer switches. Van de vPC-peers is er één primair en één secundair. Het systeem dat door de switches wordt gevormd, wordt een vPC-domein genoemd

Geen specifieke peer-link tussen de vPC peers; in plaats daarvan dient de stof zelf als de MCT.

· Peer Reachability Protocol - ZMQ wordt gebruikt in plaats van CFS.

· ZMQ is een opensource high-performance berichtenbibliotheek die TCP als transport gebruikt.

· Deze mediawisselaar is verpakt als libzmq op de switch en is gekoppeld aan elke applicatie die moet communiceren met vPC peer.

Peer-bereikbaarheid wordt niet verwerkt via een fysieke peer-link; in plaats daarvan worden routing triggers gebruikt om peer reach te detecteren.

· De vPC Manager registreert bij URIB voor meldingen van peer-route.

· Wanneer ISIS een route naar de peer ontdekt, meldt URIB vPC manager, die op zijn beurt probeert ZMQ socket met de peer te openen.

· Wanneer de peer-route door ISIS wordt ingetrokken, wordt de vPC-beheerder opnieuw door URIB op de hoogte gesteld en brengt hij de MCT-link naar beneden.

Als onderdeel van de best practices voor upgrades wordt aanbevolen om switches in elke capsule in ten minste twee aparte groepen te upgraden, zodat de helft van de blad- en wervelknooppunten in elke capsule op een gegeven moment omhoog zijn. Een voorbeeld is een groep die zelfs genummerde blad- en wervelknooppunten heeft, en een andere groep om oneven genummerd blad en stekels in elke peul te hebben. Met vPC-geconfigureerd apparaten kunnen we ervoor zorgen dat ten minste één apparaat is ingeschakeld tijdens de upgrade door ze in verschillende groepen te plaatsen. Dit voorkomt storingen tijdens de upgrade, omdat ten minste één apparaat omhoog blijft terwijl de andere wordt geüpgraded.

Afkortingen

ACI: Application Center-infrastructuur

vPC: virtueel poortkanaal

MCT: Multichassis EtherChannel Trunk

CFS: Cisco Fabric-services

ZMQ: Nul berichtenwachtrij

LACP: protocol voor controle van linkaggregatie

PDU: protocol data-eenheid

LAG: linkaggregatie

Voorwaarde voor probleemoplossing bij vPC-poortkanalen

Zie voor informatie over vPC-configuratie

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/4-x/L2-configuration/Cisco-APIC-Layer2-Configuration-Guide-42x/Cisco-APIC-Layer2-Configuration-Guide-421_chapter_0111.html

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/2-x/L2_config/b_Cisco_APIC_Layer_2_Configuration_Guide/b_Cisco_APIC_Layer_2_Configuration_Guide_chapter_0100.html

vPC-validatie

1. vPC Status: toon vpc

FAB3-L1# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    up     success     success                    86

FAB3-L2# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po2    up     success     success                    86

Output shows, peer nabijheid wordt gevormd met vPC domein id 101, Note vPC houden levendige status is uitgeschakeld in ACI, aangezien geen specifieke link nodig is. Po3 is UP in vPC met actief VLAN 86. Let op dat poortkanaalgetallen op vPC-switches verschillend kunnen zijn.

2. vPC Rollen, vPC System mac en LAG ID: toon vpc rol

FAB3-L1# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : primary, operational secondary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:81:c4:b1:25:4f

vPC local role-priority         : 101

FAB3-L2# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : secondary, operational primary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:5d:73:57:c4:2c

vPC local role-priority         : 102

Deze opdracht laat zien dat L1 primair is en L2 tweededags.

Aangezien de eindapparaten zijn verbonden met twee verschillende vPC-switches moet er een mechanisme zijn waarmee ze vPC-peers als één logisch toestel kunnen identificeren. Dit wordt bereikt door het gebruik van vPC-systeem mac in de LAG ID die wordt gedeeld tussen de peers. Dit maakt eindapparaat vPC-peers zien als één logische eenheid.

N3K# show lacp interface ethernet 1/24

Interface Ethernet1/24 is up

Channel group is 1 port channel is Po1

PDUs sent: 31726

PDUs rcvd: 31634

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 4121), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 15d)] ]

Operational as aggregated link since Fri Sep  2 08:05:52 2022

Local Port: Eth1/24   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x15d

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x4121

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x4121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

N3K# show lacp interface ethernet 1/25

Interface Ethernet1/25 is up

Channel group is 1 port channel is Po1

PDUs sent: 31666

PDUs rcvd: 31651

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 111), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 161)] ]

Operational as aggregated link since Fri Sep  2 08:00:34 2022

Local Port: Eth1/25   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x161

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x111

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x111

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

Uitvoer toont LAG ID (7f9b, 0-23-4-ee-be-65, 82ae, 8000, 4121), een combinatie van Prioriteit als Systeem ID (32667 in Hex), vPC systeem mac (00:23:04:ee:be:65), operationele Key (33454 in Hex) en poort-identifier.

3. Poortkanaal Status: toon poortkanaal-kanaal uitgebreid

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SU)     101-102                  LACP      Eth1/33(P)

Toon port-kanaal uitgebreide toont meer informatie over de staat van de fysieke verbindingen die deel uitmaken van port-kanaal bundel.

4. TEP details en Logical Peer-link status: toon systeem interne epm vpc

FAB3-L1# show system internal epm vpc

Local TEP IP                  : 10.3.208.64

Peer TEP IP                   : 10.3.208.67

vPC configured                : Yes

vPC VIP                       : 10.3.16.67

MCT link status               : Up

Local vPC version bitmap      : 0x7

Peer vPC version bitmap       : 0x7

Negotiated vPC version        : 3

Peer advertisement received   : Yes

Tunnel to vPC peer            : Up

vPC# 686

if : port-channel3, if index : 0x16000002

local vPC state : MCEC_STATE_UP, peer vPC state : MCEC_STATE_UP

current link state : LOCAL_UP_PEER_UP

vPC fast conv : Off

5. ZMQ Connection details: toon systeem interne vpcm zmq statistieken

FAB3-L1# show system internal vpcm zmq statistics

--------------------------------------------

MCECM ZMQ counters

----------------------------------------------

ZMQ server                                        : 1

ZmQ: Registered ZmQ print callback

ZmQ: ====== Start ZMQ statistics printing ======

ZmQ: ZMQ socket type: 5, local ID: 40d0030a

ZmQ:     Socket base 0x1109c3b4, #endpoints 1

ZmQ:     Total 1 I/O pipes, CONNECT CNT: 0, DISCONNECT CNT: 0

ZmQ:     RX CNT: 66, BYTES: 124132, ERRORS: 0

ZmQ:     TX CNT: 66, BYTES: 125096, ERRORS: 0

ZmQ:         Pipe tcp://10.3.208.64:5001 (ID:  FD 54 flag 1 state 0): read 66 (124132 bytes) write 66 (125096 bytes) Peer I/O pipe: read  66 (125096 bytes) write 66 (124132 bytes)

ZmQ:         Stream engine 0xae90049c ZMQ SOCKET 0x1109c3b4 TCP FD: 54 @ 10.3.208.67:58740

ZmQ:             RX CNT: 72 BYTES: 124494 ERRORS: 0 TX CNT: 73 BYTES: 125458 ERRORS: 0

ZmQ:             CONNECT CNT: 0 DISCONNECT CNT: 0

ZmQ: ====== End ZMQ statistics printing ======

De statistieken van ZMQ tonen, staat van de ZMQ zitting, aantal tijden verbinding en onderbrekingen gebeurde en om het even welke fouten voorkwamen.

Problemen met VPC-poortkanaal oplossen

1. Fysieke poort is niet beschikbaar

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  success     success

Uitloopschoenen Po3 is omlaag.

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

We kijken verder naar de staat van de interfaces die deel uitmaken van het havenkanaal. Hier is Eth1/33 in Down staat. LACP is ingesteld als het bundelingsprotocol.

FAB3-L1# show int e1/33

Ethernet1/33 is down (notconnect)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:08:15

Last clearing of "show interface" counters never

9 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

Show interface output geeft meer details over interface e1/33. We kunnen E1/33 ons zien neer met niet verbinden staat.

Aanbevolen actie:

Zorg ervoor dat de poort op de juiste manier is aangesloten en de juiste configuratie heeft.

2. Schorsing door LACP

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SD)     101-102                  LACP      Eth1/33(s)

Output toont Eth1/33 is in opgeschorte staat. Daarna kijken we naar de showinterface Eth1/33 voor meer details.

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspended-due-to-no-lacp-pdus)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:00:13

Last clearing of "show interface" counters never

12 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 1640 bits/sec, 0 packets/sec

Show interface suggereert dat de poort is opgeschort vanwege geen LACP PDU's. We kunnen verder kijken naar de LACP-tellers en vaststellen of LACP PDU's worden verzonden en ontvangen.

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       314    264      0      0        0      0        0

FAB3-L1#

FAB3-L1#

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       315    264      0      0        0      0        0

Output toont aan dat de teller slechts stijgt voor Verzonden LACPDUs en Recv teller constant blijft. Dit suggereert dat we LACP PDU niet hebben ontvangen van een afgelegen einde.

We kunnen ook kijken naar LACP onderhandelingsparameters, tellers en ga zo maar door., voor specifieke interface gebruik "toon lacp interface e1/33".

FAB3-L1# show lacp interface e1/33

Interface Ethernet1/33 is suspended

Channel group is 3 port channel is Po3

PDUs sent: 317

PDUs rcvd: 264   received

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 00-23-04-ee-be-65, 82ae, 8000, 121), (0, 0-0-0-0-0-0, 0, 0, 0)] ]

Operational as aggregated link since  Mon Aug 22 09:29:53 2022

Local Port: Eth1/33   MAC Address= 00-81-c4-b1-25-4f

System Identifier=0x8000,00-81-c4-b1-25-4f

Port Identifier=0x8000,0x121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=(Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0)

Actor Oper State=Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0

Neighbor: 0x0

MAC Address= 0-0-0-0-0-0

System Identifier=0x0,0x0

Port Identifier=0x0,0x0

Operational key=0

LACP_Activity=unknown

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner Admin State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Partner Oper State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Aggregate or Individual(True=1)= 2

Verder kan een pakketopname ook gedaan worden op het blad voor LACP-pakketten, u kunt specifieke filters gebruiken om de betreffende interface uit te filteren.

tcpdump -vvvi kpm_inb ether proto 0x8809

Aanbevolen actie:

Zorg ervoor dat LACP goed is geconfigureerd aan de kant van de afstandsbediening en dat het apparaat LACP PDU's op de juiste interface stuurt.

3. Opschorting door vPC

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  failed      vpc port channel

mis-config due to

vpc links in the 2

switches connected

to different

partners

Deze uitvoer laat zien dat vPC poort-kanaal is down vanwege een vPC misconfig. Laten we verder kijken naar de status van het havenkanaal.

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

Hier is Eth1/33 in Down staat, Verder kijken we naar 'show interface e1/33' voor meer details.

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspend-by-vpc)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

vPC maakt gebruik van LAG ID om te bepalen of de vPC peers zijn verbonden met dezelfde host. Als de LAG ID niet klopt, worden interfaces opgeschort door vPC.

"Toon vpc-samenvatting" laat zien dat fysieke koppelingen in het poortkanaal op vPC-peers niet met hetzelfde externe apparaat zijn verbonden.

LAG ID vergelijking kan worden gecontroleerd met "toon vpc consistentie-parameters interface poort-kanaal 3".

FAB3-L1# show vpc consistency-parameters interface port-channel 3

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

lag-id                      1     [(7f9b,                [(7f9b,

0-23-4-ee-be-65, 82ae, 0-23-4-ee-be-68, 82ae,

0, 0), (8000,          0, 0), (8000,

0-a6-ca-75-6f-c1,      0-a6-ca-75-6f-c1,

8000, 0, 0)]           8000, 0, 0)]

mode                        1     active                 active

Speed                       1     10 Gb/s                10 Gb/s

Duplex                      1     full                   full

Port Mode                   1     trunk                  trunk

Native Vlan                 1     0                      0

MTU                         1     9000                   9000

vPC card type               1     Empty                  Empty

Allowed VLANs               -     86                     86

Local suspended VLANs       -     -                      -

Als er sprake is van een miskraam in de LAG-ID-poorten worden geschorst.

Aanbevolen actie:

Zorg ervoor dat de fysieke koppelingen in het poortkanaal zijn verbonden met hetzelfde externe apparaat.

4. LACS schorst individuele

LACP stelt een haven aan de geschorste staat als het geen LACP PDU van de peer ontvangt. Dit kan ertoe leiden dat sommige servers niet opstarten omdat ze LACP nodig hebben om de poort op logische wijze te brengen. U kunt het gedrag afstemmen op individueel gebruik door LACP schorsing individu uit te schakelen. Om dit te doen, maak een poortkanaalbeleid in uw vPC beleidsgroep, en nadat de modus naar LACP actief is ingesteld, verwijder Suspend Individual Port. De poorten in de vPC blijven nu actief en blijven LACP-pakketten verzenden.

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

1     Po1(SD)     101-102                  LACP      Eth1/33(I)

De output laat zien dat hoewel we geen LACP PDU's op Eth1/33 hebben ontvangen nadat de LACP Suspend-Individual vlag is verwijderd, de haven is UP als Individuele haven. Merk op dat we nog steeds LACP PDU's van ACI-blad met deze configuratie sturen, zodra LACP PDU's zijn ontvangen, gaat de poort terug naar de gebundelde modus.

Andere fouten

Er zijn nog maar weinig interfacefouten die niet specifiek zijn voor vPC, maar nog steeds van toepassing zijn op vPC interfaces. Zie de links voor meer informatie.

1. mcp-loop-err-uitschakelen

https://www.cisco.com/c/dam/en/us/solutions/collateral/data-center-virtualization/application-centric-infrastructure/aci-guide-using-mcp-mis-cabling-protocol.pdf

2. Uitschakelen van bpdu-guard-err

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/aci_virtual_edge/configuration/1-x/b_Virtual_Edge_Config_Guide_1_2_1/b_Virtual_Edge_Config_Guide_1_2_1_chapter_0101.pdf