목차

질문

응답

관련 Cisco 지원 커뮤니티 토론

질문

최초 트리거 후 언제든지 경보에 대한 현재 실패율을 확인하는 방법.초기 실패율은 더 명확하게 찾을 수 있지만, 현재 실패율이 몇 시간 후에 발견될 수 있습니까?

응답

초기 SNMP 트랩, 로그 및 경보는 모니터링된 임계값의 초기 실패율을 추적하지만 현재 실패율을 가져오는 방법은 명확하지 않을 수 있습니다."show threshold" 하단의 명령은 마지막 폴링 간격의 현재 실패율과 관련된 모든 경보의 상태를 보고합니다.

[local]PDSN> show threshold

Friday June 12 04:39:32 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source:      System

Last Measured: 77% Raise Time: 2015-Jun-11+22:15:05

[local]PDSN> show thresh

Friday June 12 05:34:04 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source: System Last Measured: 65%

Raise Time:        2015-Jun-11+22:15:05

[local]PDSN> show thresh

Friday June 12 06:06:07 UTC 2015

Outstanding alarms:

Threshold Name:    aaa-acct-failure-rate

Alarm Source:      System

Last Measured: 61%

Raise Time:        2015-Jun-11+22:15:05

[local]PDSN> show alarm outstanding verbose

Friday June 12 04:41:28 UTC 2015

Severity Object          Timestamp                          Alarm ID

-------- ----------      ---------------------------------- ---------------------

Alarm Details

--------------------------------------------------------------------------------

Minor    Chassis         Thursday June 11 22:15:05 U        5770524519230406656

<28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

2015-Jun-11+22:15:05.418 [alarmctrl 65201 info] [8/0/5185 <evlogd:0> alarmctrl.c:192] [software internal system critical-info syslog] Alarm condition: id 5015057a08690000 (Minor): <28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

Thu Jun 11 22:15:05 2015 Internal trap notification 222 (ThreshAAAAcctFailRate) threshold 25% measured value 32%

문제 해결:

2015-Jun-12+07:15:05.210 [alarmctrl 65200 info] [8/0/5185 <evlogd:0> alarmctrl.c:285] [software internal system critical-info syslog] Alarm cleared: id 5015057a08690000: <28:aaa-acct-failure-rate> has reached or exceeded the configured threshold <25%>, the measured value is <32%>. It is detected at <System>.

Fri Jun 12 07:15:05 2015 Internal trap notification 223 (ThreshClearAAAAcctFailRate) threshold 20% measured value 0%

[local]PDSN> show threshold Friday June 12 13:45:26 UTC 2015

...

No outstanding alarm