목차

이 표에서는 Field Notice 74035에 대한 APSP(Access Point Service Pack) 링크를 제공합니다. 이러한 APSP는 Cisco IOS® XE 17.3.7, 17.6.5 및 17.9.3에만 적용되며 17.3.8, 17.6.6 및 17.9.4 릴리스로 대체됩니다.  APSP는 2800, 2800, 4800, 1560, IW6300, ESW6300 AP 시리즈에만 픽스를 제공합니다.

자세한 내용은 다음을 참조하십시오.

필드 알림 74035

CSCwf67316: 2800/3800/4800/1560/IW6300은 CAC 시간 이후에 필요한 레벨에서 레이더를 탐지하지 못할 수 있습니다.

릴리스

APSP 이미지

릴리스 정보

17.3.7

9800-40: https://software.cisco.com/download/home/286316412/type/286325254/release/17.3.7

이미지 이름: C9800-universalk9_wlc.17.03.07.CSCwf84244.SPA.apsp.bin

9800-80: https://software.cisco.com/download/home/286321396/type/286325254/release/17.3.7

이미지 이름: C9800-universalk9_wlc.17.03.07.CSCwf84244.SPA.apsp.bin

9800-L: https://software.cisco.com/download/home/286323430/type/286325254/release/17.3.7

이미지 이름: C9800-L-universalk9_wlc.17.03.07.CSCwf84244.SPA.apsp.bin

9800-CL: https://software.cisco.com/download/home/286322605/type/286325254/release/17.3.7

이미지 이름: C9800-CL-universalk9.17.03.07.CSCwf84244.SPA.apsp.bin

9800-SW(EWC-스위치): https://software.cisco.com/download/home/286313994/type/286325254/release/17.3.7

이미지 이름: cat9k_iosxe.17.03.07.CSCwf84244.SPA.apsp.bin

EWC C9105: https://software.cisco.com/download/home/286324858/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

EWC C9115: https://software.cisco.com/download/home/286321056/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

EWC C9117: https://software.cisco.com/download/home/286321061/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

EWC C9120: https://software.cisco.com/download/home/286323294/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

EWC C9124: https://software.cisco.com/download/home/286326614/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

EWC C9130: https://software.cisco.com/download/home/286323998/type/286325254/release/17.3.7

이미지 이름: C9800-AP-universalk9.17.03.07.CSCwf84244.SPA.apsp.zip

https://www.cisco.com/web/software/286325254/165468/Release_notes_for_APSP_17_3_7.pdf

17.6.5

9800-40: https://software.cisco.com/download/home/286316412/type/286325254/release/17.6.5

이미지 이름: C9800-universalk9_wlc.17.06.05.CSCwf84244.SPA.apsp.bin

9800-80: https://software.cisco.com/download/home/286321396/type/286325254/release/17.6.5

이미지 이름: C9800-universalk9_wlc.17.06.05.CSCwf84244.SPA.apsp.bin

9800-L: https://software.cisco.com/download/home/286323430/type/286325254/release/17.6.5

이미지 이름: C9800-L-universalk9_wlc.17.06.05.CSCwf84244.SPA.apsp.bin

9800-CL: https://software.cisco.com/download/home/286322605/type/286325254/release/17.6.5

이미지 이름: C9800-CL-universalk9.17.06.05.CSCwf84244.SPA.apsp.bin

9800-SW(EWC-스위치): https://software.cisco.com/download/home/286313994/type/286325254/release/17.6.5

이미지 이름: cat9k_iosxe.17.06.05.CSCwf84244.SPA.apsp.bin

EWC C9105: https://software.cisco.com/download/home/286324858/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

EWC C9115: https://software.cisco.com/download/home/286321056/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

EWC C9117: https://software.cisco.com/download/home/286321061/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

EWC C9120: https://software.cisco.com/download/home/286323294/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

EWC C9124: https://software.cisco.com/download/home/286326614/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

EWC C9130: https://software.cisco.com/download/home/286323998/type/286325254/release/17.6.5

이미지 이름: C9800-AP-universalk9.17.06.05.CSCwf84244.SPA.apsp.zip

https://www.cisco.com/web/software/286325254/164310/Release_note_for_APSP_17_6_5.pdf

17.9.3

9800-40: https://software.cisco.com/download/home/286316412/type/286325254/release/17.9.3

이미지 이름: C9800-universalk9_wlc.17.09.03.CSCwf84244.SPA.apsp.bin

9800-80: https://software.cisco.com/download/home/286321396/type/286325254/release/17.9.3

이미지 이름: C9800-universalk9_wlc.17.09.03.CSCwf84244.SPA.apsp.bin

9800-L: https://software.cisco.com/download/home/286323430/type/286325254/release/17.9.3

이미지 이름: C9800-L-universalk9_wlc.17.09.03.CSCwf84244.SPA.apsp.bin

9800-CL: https://software.cisco.com/download/home/286322605/type/286325254/release/17.9.3

이미지 이름: C9800-CL-universalk9.17.09.03.CSCwf84244.SPA.apsp.bin

9800-SW(EWC-스위치): https://software.cisco.com/download/home/286313994/type/286325254/release/17.9.3

이미지 이름: cat9k_iosxe.17.09.03.CSCwf84244.SPA.apsp.bin

EWC C9105: https://software.cisco.com/download/home/286324858/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

EWC C9115: https://software.cisco.com/download/home/286321056/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

EWC C9117: https://software.cisco.com/download/home/286321061/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

EWC C9120: https://software.cisco.com/download/home/286323294/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

EWC C9124: https://software.cisco.com/download/home/286326614/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

EWC C9130: https://software.cisco.com/download/home/286323998/type/286325254/release/17.9.3

이미지 이름: C9800-AP-universalk9.17.09.03.CSCwf84244.SPA.apsp.zip

https://www.cisco.com/web/software/286325254/164439/Release_note_for_APSP_17_9_3.pdf