목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

구성

GUI 컨피그레이션

SSID 생성

WDS AP의 로컬 RADIUS 서버 컨피그레이션

WDS 클라이언트 AP의 로컬 RADIUS 서버 컨피그레이션

WDS AP에서 WDS 사용

WDS 클라이언트 AP에서 WDS 사용

CLI 구성

WDS AP

WDS 클라이언트 AP

다음을 확인합니다.

WDS AP의 CLI 확인 출력

WDS 클라이언트 AP의 CLI 확인 출력

문제 해결

소개

이 문서에서는 로컬 RADIUS 서버를 사용하여 자동 액세스 포인트(AP) 설정에서 WDS(Wireless Domain Services)를 구성하는 방법에 대해 설명합니다. 이 문서에서는 새 GUI를 통한 구성에 초점을 맞추고 있으며 CLI(Command Line Interface) 구성도 제공합니다.

사전 요구 사항

요구 사항

자동 AP에서 기본 GUI 및 CLI 컨피그레이션에 대해 알고 있는 것이 좋습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco 3602e Series Access Point on Autonomous AP IOS® Software, 릴리스 15.2(4)JA1; 이 디바이스는 WDS AP 및 로컬 RADIUS 서버 역할을 합니다.

- Cisco 2602i Series Access Point on Autonomous AP IOS Software, 릴리스 15.2(4)JA1; 이 디바이스는 WDS 클라이언트 AP 역할을 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

구성

참고: 이 섹션에 사용된 명령에 대한 자세한 내용을 보려면 Command Lookup Tool(등록된 고객만 해당)을 사용합니다.

GUI 컨피그레이션

SSID 생성

이 절차에서는 새 SSID(Service Set Identifier)를 생성하는 방법에 대해 설명합니다.

1. Security(보안) > SSID Manager(SSID 관리자)로 이동하고 NEW(새로 만들기)를 클릭하여 새 SSID를 생성합니다.

2. EAP(Extensible Authentication Protocol) 인증을 위한 SSID를 구성합니다.

3. 원하는 암호화 수준을 설정합니다. 이 예에서는 WPA2(Wi-Fi Protected Access 2)를 사용합니다.

4. 설정을 저장하려면 Apply(적용)를 클릭합니다.

5. Security(보안) > Encryption Manager로 이동하고 필요한 암호화 암호 방법을 선택합니다.

WDS AP의 로컬 RADIUS 서버 컨피그레이션

다음 절차에서는 WDS AP에서 로컬 RADIUS 서버를 구성하는 방법에 대해 설명합니다.

1. Security(보안) > Server Manager(서버 관리자)로 이동하여 WDS AP BVI(Bridge Virtual Interface) IP를 로컬 RADIUS로 추가하고 공유 암호를 추가합니다.

2. Security(보안) > Local Radius Server(로컬 RADIUS 서버) > General Set-Up(일반 설정) 탭으로 이동합니다. 사용할 EAP 프로토콜을 정의합니다. 이 예에서는 LEAP(Light Extensible Authentication Protocol) 인증을 활성화합니다.

3. 동일한 페이지에서 NAS(Network Access Server) IP와 클라이언트 사용자 이름/암호 자격 증명을 추가할 수도 있습니다. WDS AP의 로컬 RADIUS 구성이 완료되었습니다.

WDS 클라이언트 AP의 로컬 RADIUS 서버 컨피그레이션

다음 그림은 WDS AP의 IP 주소를 RADIUS 서버로 구성하는 방법을 보여줍니다.

이제 두 AP가 모두 LEAP 인증을 위해 SSID로 구성되고 WDS 서버는 로컬 RADIUS의 역할을 합니다. 외부 RADIUS에 동일한 단계를 사용합니다. RADIUS 서버 IP만 변경됩니다.

WDS AP에서 WDS 사용

다음 절차에서는 WDS AP에서 WDS를 활성화하는 방법에 대해 설명합니다.

1. Wireless(무선) > WDS > General Set-Up(일반 설정) 탭으로 이동하고 이 AP를 무선 도메인 서비스로 사용 확인란을 활성화합니다. 이렇게 하면 AP에서 WDS 서비스가 활성화됩니다.

2. 여러 WDS AP가 있는 네트워크에서 Wireless Domain Services Priority 옵션을 사용하여 기본 WDS 및 백업 WDS를 정의합니다. 값의 범위는 1~255이며, 여기서 255가 가장 높은 우선순위입니다.

3. 같은 페이지의 Server Groups 탭으로 이동합니다. 모든 WDS 클라이언트 AP가 인증할 인프라 서버 그룹 목록을 생성합니다. WDS AP에서 로컬 RADIUS 서버를 이 용도로 사용할 수 있습니다. 이미 추가되었으므로 드롭다운 목록에 표시됩니다.

4. 다음 경우에 그룹 사용 라디오 버튼을 활성화합니다. Infrastructure Authentication(인프라 인증)을 클릭하고 Apply(적용)를 클릭하여 설정을 저장합니다.

5. WDS AP 사용자 이름 및 비밀번호를 로컬 RADIUS 서버 목록에 추가할 수 있습니다.

WDS 클라이언트 AP에서 WDS 사용

다음 절차에서는 WDS 클라이언트 AP에서 WDS를 활성화하는 방법에 대해 설명합니다.

1. Wireless(무선) > AP로 이동하고 Participate in SWAN Infrastructure(SWAN 인프라 참여) 확인란을 활성화합니다. SWAN은 정형 무선 인식 네트워크를 의미합니다.

2. WDS 클라이언트 AP는 WDS AP를 자동으로 검색할 수 있습니다. 또는 Specified Discovery(지정된 검색) 텍스트 상자에 클라이언트 등록을 위해 WDS AP의 IP 주소를 수동으로 입력할 수 있습니다.

WDS AP에 구성된 로컬 RADIUS 서버에 대해 인증을 위한 WDS 클라이언트 사용자 이름 및 비밀번호를 추가할 수도 있습니다.

CLI 구성

WDS AP

다음은 WDS AP의 샘플 컨피그레이션입니다.

Current configuration : 2832 bytes

!

! Last configuration change at 05:54:08 UTC Fri Apr 26 2013

version 15.2

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname MAIB-WDS-AP

!

!

logging rate-limit console 9

enable secret 5 $1$EdDD$dG47yIKn86GCqmKjFf1Sy0

!

aaa new-model

!

!

aaa group server radius rad_eap

server name Local-Radius

!

aaa group server radius Infrastructure

server name Local-Radius

!

aaa authentication login eap_methods group rad_eap

aaa authentication login method_Infrastructure group Infrastructure

aaa authorization exec default local

!

!

!

!

!

aaa session-id common

no ip routing

no ip cef

!

!

!

!

dot11 syslog

!

dot11 ssid WDS-EAP

authentication open eap eap_methods

authentication network-eap eap_methods

authentication key-management wpa version 2

guest-mode

!

!

dot11 guest

!

!

!

username Cisco password 7 13261E010803

username My3602 privilege 15 password 7 10430810111F00025D56797F65

!

!

bridge irb

!

!

!

interface Dot11Radio0

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

stbc

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface Dot11Radio1

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

peakdetect

dfs band 3 block

stbc

channel dfs

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface GigabitEthernet0

no ip address

no ip route-cache

duplex auto

speed auto

bridge-group 1

bridge-group 1 spanning-disabled

no bridge-group 1 source-learning

!

interface BVI1

ip address 10.106.54.146 255.255.255.192

no ip route-cache

ipv6 address dhcp

ipv6 address autoconfig

ipv6 enable

!

ip forward-protocol nd

ip http server

no ip http secure-server

ip http help-path http://www.cisco.com/warp/public/779/smbiz/prodconfig/help/eag

ip radius source-interface BVI1

!

!

radius-server local

no authentication eapfast

no authentication mac

nas 10.106.54.146 key 7 045802150C2E1D1C5A

user WDSClient1 nthash 7

072E776E682F4D5D35345B5A227E78050D6413004A57452024017B0803712B224A

!

radius-server attribute 32 include-in-access-req format %h

radius-server vsa send accounting

!

radius server Local-Radius

address ipv4 10.106.54.146 auth-port 1812 acct-port 1813

key 7 060506324F41584B56

!

bridge 1 route ip

!

!

wlccp authentication-server infrastructure method_Infrastructure

wlccp wds priority 254 interface BVI1

!

line con 0

line vty 0 4

transport input all

!

end

WDS 클라이언트 AP

다음은 WDS 클라이언트 AP의 샘플 컨피그레이션입니다.

Current configuration : 2512 bytes

!

! Last configuration change at 00:33:17 UTC Wed May 22 2013

version 15.2

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname MAIB-WDS-Client

!

!

logging rate-limit console 9

enable secret 5 $1$vx/M$qP6DY30TGiXmjvUDvKKjk/

!

aaa new-model

!

!

aaa group server radius rad_eap

server name WDS-Radius

!

aaa authentication login eap_methods group rad_eap

aaa authorization exec default local

!

!

!

!

!

aaa session-id common

no ip routing

no ip cef

!

!

!

!

dot11 syslog

!

dot11 ssid WDS-EAP

authentication open eap eap_methods

authentication network-eap eap_methods

authentication key-management wpa version 2

guest-mode

!

!

dot11 guest

!

eap profile WDS-AP

method leap

!

!

!

username Cisco password 7 062506324F41

username My2602 privilege 15 password 7 09414F000D0D051B5A5E577E6A

!

!

bridge irb

!

!

!

interface Dot11Radio0

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

stbc

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface Dot11Radio1

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

peakdetect

dfs band 3 block

stbc

channel dfs

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface GigabitEthernet0

no ip address

no ip route-cache

duplex auto

speed auto

bridge-group 1

bridge-group 1 spanning-disabled

no bridge-group 1 source-learning

!

interface BVI1

ip address 10.106.54.136 255.255.255.192

no ip route-cache

ipv6 address dhcp

ipv6 address autoconfig

ipv6 enable

!

ip forward-protocol nd

ip http server

no ip http secure-server

ip http help-path http://www.cisco.com/warp/public/779/smbiz/prodconfig/help/eag

ip radius source-interface BVI1

!

!

radius-server attribute 32 include-in-access-req format %h

radius-server vsa send accounting

!

radius server WDS-Radius

address ipv4 10.106.54.146 auth-port 1812 acct-port 1813

key 7 110A1016141D5A5E57

!

bridge 1 route ip

!

!

wlccp ap username WDSClient1 password 7 070C285F4D06485744

wlccp ap wds ip address 10.106.54.146

!

line con 0

line vty 0 4

transport input all

!

end

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다. 설정이 완료되면 WDS 클라이언트 AP가 WDS AP에 등록할 수 있어야 합니다.

WDS AP에서 WDS 상태는 Registered로 표시됩니다.

WDS 클라이언트 AP에서 WDS 상태는 Infrastructure입니다.

참고: Output Interpreter 도구(등록된 고객만 해당)는 특정 show 명령을 지원합니다. show 명령 출력의 분석을 보려면 [출력 인터프리터 도구]를 사용합니다.

WDS AP의 CLI 확인 출력

다음 절차에서는 WDS AP 컨피그레이션을 확인하는 방법을 보여줍니다.

MAIB-WDS-AP#sh wlccp wds ap

HOSTNAME MAC-ADDR IP-ADDR IPV6-ADDR STATE

MAIB-WDS-Client f872.ea24.40e6 10.106.54.136 :: REGISTERED

MAIB-WDS-AP#sh wlccp wds statistics

WDS Statistics for last 10:34:13:

Current AP count: 1

Current MN count: 0

AAA Auth Attempt count: 2

AAA Auth Success count: 2

AAA Auth Failure count: 0

MAC Spoofing Block count: 0

Roaming without AAA Auth count: 0

Roaming with full AAA Auth count:0

Fast Secured Roaming count: 0

MSC Failure count: 0

KSC Failure count: 0

MIC Failure count: 0

RN Mismatch count: 0

WDS 클라이언트 AP의 CLI 확인 출력

다음 절차에서는 WDS 클라이언트 AP 컨피그레이션을 확인하는 방법을 보여줍니다.

MAIB-WDS-Client#sh wlccp ap

WDS = bc16.6516.62c4, IP: 10.106.54.146 , IPV6: ::

state = wlccp_ap_st_registered

IN Authenticator = IP: 10.106.54.146 IPV6: ::

MN Authenticator = IP: 10.106.54.146 IPv6::

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.