목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

클록

구성

네트워크 다이어그램

구성

다음을 확인합니다.

라우터 asj3640-1

라우터 asj3640-2

문제 해결

관련 정보

소개

이 문서에서는 두 Cisco 3640 라우터와 T1 연결을 연결하고 테스트하기 위한 샘플 컨피그레이션을 제공합니다.

이 샘플 컨피그레이션에서는 클록 소스가 internal로 설정된 Cisco 라우터 asj3640-1을 구성했습니다. 즉, 통신 사업자 또는 전화 회사(telco)가 시계를 제공하지 않으므로 T1은 내부적으로 시계를 도출해야 하며 이 경우 "마스터"입니다. 또한 마스터(cisco router asj3640-1)에서 잠금을 획득하고 "슬레이브" 역할을 하려면 이 T1에 직접 연결된 다른 모든 디바이스를 구성해야 합니다. 설정에서는 슬레이브가 Cisco 라우터 asj3640-2입니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- asj3640-1의 Cisco IOS® Software 릴리스 11.3(10)T. 여기서는 NM-1CT1-CSU 네트워크 모듈을 사용합니다.

- asj3640-2의 Cisco IOS Software 릴리스 12.2(1). 여기서는 NM-2CT1-CSU 네트워크 모듈을 사용합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 정보

클록

Clocking은 T1 네트워크에서 중요한 기능입니다. Clocking은 T1 캐리어의 타이밍 및 동기화를 모두 의미합니다. 타이밍(타이밍)은 전송된 데이터 신호 내에서 인코딩되며 네트워크 전체에서 동기화를 보장하는 데 사용됩니다. 일반적으로 T1의 한 쪽이 마스터 시계를 제공하고 다른 쪽은 마스터 클럭의 슬레이브입니다.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

그림 1 - 네트워크 다이어그램

구성

이 문서에서는 다음 구성을 사용합니다.

- asj3640-1

- asj3640-2

asj3640-1

asj3640-1#show running-config

Building configuration...

Current configuration:

!

version 11.3

!

hostname asj3640-1

!

!

controller T1 1/0

framing esf

clock source internal

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

!

interface Serial1/0:1

ip address 10.10.10.1 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.116 255.255.255.240

!

!

line con 0

transport input none

line aux 0

line vty 0 4

exec-timeout 60 0

login

!

end

asj3640-2

asj3640-2#show running-config

Building configuration...

!

version 12.2

!

hostname asj3640-2

!

!

controller T1 1/0

framing esf

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

controller T1 1/1

shutdown

!

interface Serial1/0:1

ip address 10.10.10.2 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.117 255.255.255.240

!

!

line con 0

transport input none

line 1 18

line aux 0

line vty 0 4

login

!

end

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

- show interfaces serial—직렬 인터페이스에 대한 정보를 표시합니다.

- show controllers - 물리적 포트 디바이스에 대한 정보를 표시합니다.

- show diag - 환경 통계 및 전원 켜기 진단 상태를 표시합니다.

그림 1에 표시된 디바이스에 입력된 이러한 명령의 출력입니다. 이 출력은 네트워크가 제대로 작동하고 있음을 보여줍니다.

라우터 asj3640-1

asj3640-1#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.1/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set, keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:02, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/2 (size/max/drops); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

56408 packets input, 3194092 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

52431 packets output, 1988028 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-1#show controllers t1

T1 1/0 is up.

T1 with CSU interface.

Cable Length is LONG, Rcv gain is 36 db and Tx gain is 0 db.

No alarms detected.

Framing is ESF, Line Code is B8ZS, Clock Source is Internal.

Data in current interval (765 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

asj3640-1#show diag

Slot 1:

CT1 (CSU) port adapter, 1 port

Port adapter is analyzed

Port adapter insertion time unknown

Hardware revision 1.1           Board revision A0

Serial number     5706080       Part number    800-01228-03

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 26 01 01 00 57 11 60 50 04 CC 03 00 00 00 00

0x30: 50 00 00 00 97 10 11 17 FF FF FF FF FF FF FF FF

라우터 asj3640-2

asj3640-2#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.2/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:03, output 04:23:19, output hang never

Last clearing of "show interface" counters 1d20h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 8

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 48 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34363 packets input, 1305984 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

37049 packets output, 2090260 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-2#show controllers t1

T1 1/0 is up.

Applique type is Channelized T1

Cablelength is long gain36 0db

No alarms detected.

alarm-trigger is not set

Framing is ESF, Line Code is B8ZS, Clock Source is Line.

Data in current interval (557 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 1 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 1 Severely Err Secs, 0 Unavail Secs

asj3640-2#show diag

Slot 1:

CT1 (CSU) Port adapter, 2 ports

Port adapter is analyzed

Port adapter insertion time unknown

EEPROM contents at hardware discovery:

Hardware revision 1.1           Board revision B0

Serial number     16809907      Part number    800-01229-04

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 27 01 01 01 00 7F B3 50 04 CD 04 00 00 00 00

0x30: 58 00 00 00 99 11 02 00 FF FF FF FF FF FF FF FF

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- 액세스 기술 지원 페이지

- Technical Support - Cisco Systems