목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

관련 제품

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

Windows 2000 Server 호스트

문제 해결

문제 해결 명령

관련 정보

소개

이 문서에서는 외부 모뎀을 사용하는 PPP(Point-to-Point Protocol) 전화 접속 구성을 보여 줍니다.

사전 요구 사항

요구 사항

이 구성에 TACACS+(Terminal Access Controller Access Controller System) 또는 RADIUS(Remote Authentication Dial-in User Service) 서버가 없으므로 전화를 걸 수 있는 각 사용자에 대해 사용자 이름과 비밀번호를 구성해야 합니다. 모든 IP 주소는 풀에서 클라이언트로 전달됩니다.

이 컨피그레이션에는 다음이 필요합니다.

- 클라이언트가 사용할 사용자 이름 및 비밀번호(나중에 TACACS+ 또는 RADIUS를 추가하려는 경우에도 라우터에 몇 가지 이름을 추가하여 행을 테스트합니다).

- 풀 생성 및 정적 라우팅을 위한 IP 주소 지정 체계.

사용되는 구성 요소

이 문서의 정보는 아래 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco 2511이 Lab 환경에서 구성이 지워졌습니다.

- 라우터의 Cisco IOS® 버전 12.2(10b)입니다.

- 4개의 외부 비동기 모뎀

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 라이브 네트워크에서 작업하는 경우, 명령을 사용하기 전에 명령의 잠재적인 영향을 이해해야 합니다.

관련 제품

다음 하드웨어 및 소프트웨어 버전에서 이 컨피그레이션을 사용할 수도 있습니다.

- 비동기 인터페이스를 구성할 수 있는 비동기 인터페이스 및 직렬 인터페이스가 있는 라우터

- WIC-2A/S, 8개 또는 16개의 비동기식 포트 직렬 인터페이스를 사용할 수 있습니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 이 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성

이 문서에서는 아래 표시된 구성을 사용합니다.

이 구성은 2511 Series 라우터에서 Cisco IOS Software 릴리스 12.2(10b)를 사용하여 테스트되었습니다. 11.0(3) 이상에서 시작하는 유사한 라우터 토폴로지 또는 기타 Cisco IOS 릴리스에도 동일한 컨피그레이션 개념이 적용됩니다.

Cisco 2511

Current configuration:

!

version 12.2

service timestamps debug datetime msec

no service password-encryption

no service udp-small-servers

no service tcp-small-servers

!

hostname router1

!

enable secret <deleted>

!

username jason password foo

username laura password letmein

username russ password opensesame

username syed password bar

username tito password knockknock

!--- Usernames and passwords for clients making incoming calls.

modemcap entry default

!--- Modemcap named "default" is applied to the line 2 and line 3 !--- of Serial interfaces. Refer to the Modem-Router Connection Guide !--- and modemcap entry for more information.

!

interface Ethernet0

ip address 192.168.39.1 255.255.255.0

!

interface Serial0

no ip address

!

interface Serial1

no ip address

!

interface Group-Async1

!--- Async configuration for the external modems.

ip unnumbered ethernet0

encapsulation ppp

async mode interactive

peer default ip address pool dialup

!--- Assigns ip address for incoming calls !--- from the "dialup" pool.

no cdp enable

ppp authentication chap

group-range 1 16

!--- Includes lines 1 through 16 in the group-async1 interface.

!

ip local pool dialup 192.168.39.239 192.168.39.254

!--- Defines the range of ip addresses available !--- to the "dialup" pool.

!

line con 0

login

line 1 16

!--- Line configuration for the external modems.

login local

!--- Authenticate incoming calls locally with username and password !--- configured on the router.

autoselect during-login

autoselect ppp

!--- Launch PPP when PPP packets are received from the client.

modem InOut

!--- Allow incoming and outgoing calls.

transport input all

modem autoconfigure type default

!--- Apply the modemcap "default" (configured previously) to initalize !--- the modem. Refer to the link Modem-Router Connection Guide !--- for more information.

stopbits 1 flowcontrol hardware

line aux 0

line vty 0 4

exec-timeout 20 0

password letmein

login

!

end

짧은 기간 동안 중앙 사무실에 무작위로 연결하려는 원격 사용자의 경우 이러한 유형의 전화 접속 연결을 통해 더 저렴한 솔루션을 제공합니다. 위 컨피그레이션에서는 사용자가 모뎀을 통해 데스크톱에서 전화를 걸어 PSTN 네트워크를 통해 중앙 사무실에 대한 PPP 연결을 설정합니다.

이 컨피그레이션을 구현하려면 다음을 구성해야 합니다.

- 비동기 인터페이스.

- 비동기 회선.

- 전역 컨피그레이션 모드의 IP 주소 풀입니다.

- 모뎀 매개변수 - modemcap 항목 및 Modem-Router 연결 설명서.

- 전화 접속 네트워킹은 호스트에서 구성해야 합니다.

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

- 사용자 표시

- show interface

- 라인 표시

- IP 경로 표시

router1#show users

Line       User       Host(s)              Idle       Location

*  0 con 0                idle                 00:00:00

1 tty 1     jason      Async interface      00:00:34   PPP: 192.168.39.240

3 tty 3                Modem Autoconfigure  00:00:00

4 tty 4                Modem Autoconfigure  00:00:00

5 tty 5                Modem Autoconfigure  00:00:00

6 tty 6                Modem Autoconfigure  00:00:01

7 tty 7                Modem Autoconfigure  00:00:01

8 tty 8                Modem Autoconfigure  00:00:01

9 tty 9                Modem Autoconfigure  00:00:01

10 tty 10               Modem Autoconfigure  00:00:01

11 tty 11               Modem Autoconfigure  00:00:01

12 tty 12               Modem Autoconfigure  00:00:00

13 tty 13               Modem Autoconfigure  00:00:00

14 tty 14               Modem Autoconfigure  00:00:01

15 tty 15               Modem Autoconfigure  00:00:01

16 tty 16               Modem Autoconfigure  00:00:00

Interface  User  Mode  Idle  Peer  Address

router1#show interface asynchronous 1

Async1 is up, line protocol is up

Hardware is Async Serial

Interface is unnumbered. Using address of Ethernet0 (192.168.39.1)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set  Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Open

Open: IPCP

Last input 00:00:28, output 00:00:43, output hang never

Last clearing of "show interface" counters 00:29:49

Input queue: 1/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total )

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 86 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34 packets input, 3147 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

2 input errors, 2 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

16 packets output, 383 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#show line

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

*    0 CTY              -    -      -    -    -      0       0     0/0       -

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

*    2 TTY  38400/38400 - inout     -    -    -      0       0     0/0       -

*    3 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    4 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    5 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*    6 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    7 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    8 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    9 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*   10 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   11 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   12 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   13 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   14 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   15 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   16 TTY    300/300   - inout     -    -    -      0       0     0/0       -

17 AUX   9600/9600  -    -      -    -    -      0       0     0/0       -

18 VTY              -    -      -    -    -      0       0     0/0       -

19 VTY              -    -      -    -    -      0       0     0/0       -

20 VTY              -    -      -    -    -      0       0     0/0       -

21 VTY              -    -      -    -    -      0       0     0/0       -

router1#show line 1

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

Line 1, Location: "PPP: 192.168.39.240", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner, Async Interface Active

Modem Detected, CTS Raised

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD, Line usable as async interface

Modem Autoconfigure

Modem state: Ready

Group codes: 0

Line is running PPP for address 192.168.39.240.

0 output packets queued, 1 input packets.

Async Escape map is 00000000000000000000000000000000

Modem hardware state: CTS DSR DTR RTS, Modem Configured

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x none - - none

Timeouts: Idle EXEC Idle Session Modem Answer Session Dispatch

00:10:00 never none not set

Idle Session Disconnect Warning

never

router1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.39.0/24 is directly connected, Ethernet0

Windows 2000 Server 호스트

Windows 2000 호스트에서 전화 접속 연결을 설정합니다. 사용자 이름, 비밀번호 및 전화 번호를 구성하고 연결을 다이얼합니다.

전화 접속 연결이 설정되면 라우터에 구성된 전화 접속 풀에서 IP 주소가 할당됩니다. 호스트에서 ipconfig 명령을 실행하여 이를 확인할 수 있습니다. 호스트에 PPP 어댑터로 표시됩니다.

C:\Documents and Settings\Administrator>ipconfig

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Media State . . . . . . . . . . . : Cable Disconnected

PPP adapter Dial-up Connection:

Connection-specific DNS Suffix . :

IP Address. . . . . . . . . . . . : 192.168.39.240

Subnet Mask . . . . . . . . . . . : 255.255.255.255

Default Gateway . . . . . . . . . : 192.168.39.240

Windows 2000 서버 호스트에서 Cisco 2511 라우터로의 연결 설정을 확인하려면 호스트에서 라우터 이더넷 포트로 ping하고 연결 설정을 확인할 수 있습니다. 여기서 192.168.39.1은 라우터의 이더넷 포트 IP 주소입니다.

C:\Documents and Settings\Administrator>ping 192.168.39.1

Pinging 192.168.39.1 with 32 bytes of data:

Reply from 192.168.39.1: bytes=32 time=170ms TTL=255

Reply from 192.168.39.1: bytes=32 time=111ms TTL=255

Reply from 192.168.39.1: bytes=32 time=110ms TTL=255

Reply from 192.168.39.1: bytes=32 time=100ms TTL=255

Ping statistics for 192.168.39.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 100ms, Maximum = 170ms, Average = 122ms

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug ppp negotiation - 클라이언트가 PPP 협상을 통과하고 있는지 확인합니다. 이는 주소 협상을 확인할 때입니다.

- debug ppp authentication - 클라이언트가 인증을 통과하는지 확인합니다.

- debug ppp error - PPP 연결 협상 및 작업과 관련된 프로토콜 오류 및 오류 통계를 표시합니다.

- 디버그 모뎀 - 라우터가 모뎀에서 올바른 신호를 수신하는지 확인합니다.

- show line [# tty line] - 모뎀 하드웨어 상태를 찾습니다.

다음 출력이 Cisco 2511 라우터에서 가져왔습니다. Cisco 2511의 PSTN 링크에 대한 Windows 2000 서버 다이얼링 및 PPP 연결 설정을 보여줍니다.

router1#debug ppp negotiation

PPP protocol negotiation debugging is on

router1#debug vtemplate

Virtual Template debugging is on

router1#show debug

PPP:

PPP protocol negotiation debugging is on

Dec 10 18:43:59.079: As1 LCP: I CONFREQ [Closed] id 1 len 50

Dec 10 18:43:59.083: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.087: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.087: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.091: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.091: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.095: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.099: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.099: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.103: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.107: As1 LCP: Lower layer not up, Fast Starting

Dec 10 18:43:59.107: As1 PPP: Treating connection as a dedicated line

Dec 10 18:43:59.111: As1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 0 load]

Dec 10 18:43:59.115: As1 LCP: O CONFREQ [Closed] id 3 len 25

Dec 10 18:43:59.119: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.123: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.127: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.127: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.131: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.135: As1 LCP: O CONFREJ [REQsent] id 1 len 11

Dec 10 18:43:59.139: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.139: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.155: %LINK-3-UPDOWN: Interface Async1,

changed state to up

Dec 10 18:43:59.263: As1 LCP: I CONFACK [REQsent] id 3 len 25

Dec 10 18:43:59.267: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.267: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.271: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.275: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.275: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.279: As1 LCP: I CONFREQ [ACKrcvd] id 2 len 43

Dec 10 18:43:59.283: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.287: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.287: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.291: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.291: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.295: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.299: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.303: As1 LCP: O CONFACK [ACKrcvd] id 2 len 43

Dec 10 18:43:59.307: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.311: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.311: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.315: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.315: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.319: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.323: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.327: As1 LCP: State is Open

Dec 10 18:43:59.327: As1 PPP: Phase is AUTHENTICATING,

by this end [0 sess, 1 load]

Dec 10 18:43:59.331: As1 CHAP: O CHALLENGE id 2 len 25 from "router1"

Dec 10 18:43:59.459: As1 LCP: I IDENTIFY [Open] id 3 len 18 magic

0x59F402A1 MSRASV5.00

Dec 10 18:43:59.463: As1 LCP: I IDENTIFY [Open] id 4 len 28 magic

0x59F402A1

MSRAS-1-LAB-WIN2K-PC

Dec 10 18:43:59.467: As1 CHAP: I RESPONSE id 2 len 26 from "jason"

Dec 10 18:43:59.479: As1 CHAP: O SUCCESS id 2 len 4

Dec 10 18:43:59.483: As1 PPP: Phase is UP [0 sess, 1 load]

Dec 10 18:43:59.487: As1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 10 18:43:59.491: As1 IPCP:    Address 192.168.39.1

(0x0306C0A82701)

Dec 10 18:43:59.567: As1 CCP: I CONFREQ [Not negotiated] id 5 len 10

Dec 10 18:43:59.571: As1 CCP:    MS-PPC supported bits 0x00000001

(0x120600000001)

Dec 10 18:43:59.575: As1 LCP: O PROTREJ [Open] id 4 len 16 protocol CCP

(0x80FD0105000A120600000001)

Dec 10 18:43:59.599: As1 IPCP: I CONFREQ [REQsent] id 6 len 40

Dec 10 18:43:59.603: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.607: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.611: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.615: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.615: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.619: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.623: As1 IPCP: O CONFREJ [REQsent] id 6 len 34

Dec 10 18:43:59.627: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.631: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.635: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.639: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.643: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.647: As1 IPCP: I CONFACK [REQsent] id 1 len 10

Dec 10 18:43:59.651: As1 IPCP:    Address 192.168.39.1 (0x0306C0A82701)

Dec 10 18:43:59.735: As1 IPCP: I CONFREQ [ACKrcvd] id 7 len 10

Dec 10 18:43:59.739: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.743: As1 IPCP: O CONFNAK [ACKrcvd] id 7 len 10

Dec 10 18:43:59.747: As1 IPCP:    Address 192.168.39.240

(0x0306C0A827F0)

Dec 10 18:43:59.835: As1 IPCP: I CONFREQ [ACKrcvd] id 8 len 10

Dec 10 18:43:59.839: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.843: As1 IPCP: O CONFACK [ACKrcvd] id 8 len 10

Dec 10 18:43:59.847: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.851: As1 IPCP: State is Open

Dec 10 18:43:59.863: As1 IPCP: Install route to 192.168.39.240

Dec 10 18:44:00.483: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Async1, changed state to up

관련 정보

- 액세스-다이얼 기술 지원 페이지

- modemcap 항목

- 모뎀-라우터 연결 가이드

- Technical Support - Cisco Systems