목차

소개

문제

솔루션

관련 정보

소개

이 문서에서는 다이얼러 인터페이스를 통해 PPP(Point-to-Point Protocol) 세션이 있음을 추적하는 새로운 CLI에 대해 설명합니다.

문제

다이얼러 인터페이스는 DSL(Digital Subscriber Line) 환경에서 널리 사용되며, PPPoE(Point-to-Point Protocol over Ethernet), PPPoA(Point-to-Point Protocol over Asynchronous Transfer Mode) 등과 같은 다양한 구축 유형에서 사용됩니다.다이얼러 인터페이스 상단의 PPP 세션이 작동 또는 중단되더라도 항상 작동 상태를 유지합니다.이 동작의 알려진 문제 중 하나는 여러 발신 연결이 있는 경우 라우팅에 블랙홀이 발생할 수 있다는 것입니다. IP SLA(Internet Protocol Service Level Agreement) 추적과 같은 추가 기능을 사용하여 다이얼러 인터페이스를 통한 연결성을 확인하지 않는 한 말입니다.

솔루션

최근 IOS 버전에서 vInterface를 사용한 새 CLI 다이얼러가 도입되어 PPP 세션이 중단되면 다이얼러 인터페이스가 다운됩니다.

DSL 라우터의 구성 조각:

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco@cisco.com

ppp chap password 0 cisco

PPPoE 세션이 다운된 경우에도 다이얼러 인터페이스가 작동 상태입니다.

Router#show pppoe session

1 client session

Uniq ID  PPPoE  RemMAC          Port                    VT  VA         State

SID  LocMAC                                      VA-st      Type

N/A     58  00c1.64d5.41d1  Gi0/1                   Di1 N/A        PADISNT

0006.f657.67b1

Router#show interface dialer1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:49:48

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

CLIENT(config-if)

다음과 같이 다이얼러 인터페이스 컨피그레이션에서 새 CLI를 추가할 수 있습니다.

Router(config)#int dialer1

Router(config-if)# dialer down-with-vInterface

다이얼러 down-with-vInterface CLI를 입력한 후 다음 예와 같이 다이얼러 인터페이스가 다운 상태일 때 다이얼러 인터페이스가 down 상태로 전환되었습니다.

Router#show interface dialer1

Dialer1 is down, line protocol is down (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:50:36

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

이를 통해 다이얼러 인터페이스를 사용하는 동안 라우팅 장애 조치가 작동하려면 IP SLA, 추적 등의 추가 컨피그레이션이 필요하지 않습니다.

관련 정보

- PPPoE 컨피그레이션 가이드