목차

소개

문제

솔루션

확인

소개

이 문서에서는 Nexus 스위치 IP에 대한 ping 또는 traceroute 'To' 또는 'From'의 레이턴시 예상치에 대해 설명합니다. 스위치에서 지연된 응답은 예상 동작입니다.

문제

Nexus 스위치의 스위치 IP에서 또는 스위치로 ping할 때 레이턴시가 관찰됩니다.

Nexus-1# ping6 fc00::2

64 bytes from fc00::2: icmp_seq=47 time=12.067 ms

64 bytes from fc00::2: icmp_seq=48 time=12.452 ms

64 bytes from fc00::2: icmp_seq=49 time=12.575 ms

64 bytes from fc00::2: icmp_seq=50 time=12.903 ms

64 bytes from fc00::2: icmp_seq=51 time=14.532 ms

64 bytes from fc00::2: icmp_seq=52 time=15.029 ms

64 bytes from fc00::2: icmp_seq=53 time=15.188 ms

64 bytes from fc00::2: icmp_seq=54 time=15.447 ms

64 bytes from fc00::2: icmp_seq=55 time=15.788 ms

64 bytes from fc00::2: icmp_seq=56 time=16.136 ms

64 bytes from fc00::2: icmp_seq=57 time=16.29 ms

----------------------------------------------------------------------------

Nexus-1# ping 10.1.1.1

64 bytes from 10.1.1.1: icmp_seq=21 ttl=254 time=17.397 ms

64 bytes from 10.1.1.1: icmp_seq=22 ttl=254 time=17.977 ms

64 bytes from 10.1.1.1: icmp_seq=23 ttl=254 time=18.668 ms

64 bytes from 10.1.1.1: icmp_seq=24 ttl=254 time=19.613 ms

64 bytes from 10.1.1.1: icmp_seq=25 ttl=254 time=20.018 ms

64 bytes from 10.1.1.1: icmp_seq=26 ttl=254 time=20.539 ms

64 bytes from 10.1.1.1: icmp_seq=27 ttl=254 time=20.647 ms

64 bytes from 10.1.1.1: icmp_seq=28 ttl=254 time=21.02 ms

64 bytes from 10.1.1.1: icmp_seq=29 ttl=254 time=21.504 ms

64 bytes from 10.1.1.1: icmp_seq=30 ttl=254 time=21.622 ms

솔루션

IP를 전환하기 위해 ping 테스트를 수행하는 대신 최종 디바이스/호스트 간에 ping 테스트를 수행하여 레이턴시를 확인하는 것이 좋습니다.

- 스위치에 ICMP 요청이 수신되면 스위치 CPU/수퍼바이저에 의해 처리됩니다.

- ICMP 패킷은 스위치에 대한 낮은 우선순위 또는 중요하지 않은 트래픽입니다.

- 스위치 CPU/수퍼바이저는 우선 순위에서 STP BPDU, UDLD, BFD, LACP, OSFP, BGP 및 기타 컨트롤 플레인 트래픽과 같은 기타 중요 트래픽을 처리해야 합니다.

- 따라서 스위치 IP에 ping할 때 레이턴시가 발생할 수 있습니다.

확인

- ethanalyzer 명령을 사용하면 스위치에서 수신한 비정상적인 ICMP 트래픽이 있는지 확인할 수 있습니다.

- 아래 출력에서는 IP를 전환하기 위해 여러 호스트/소스에서 수신된 ICMP 요청을 볼 수 있습니다.

NEXUS# show ip interface brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Vlan10               10.1.1.1        protocol-up/link-up/admin-up

NEXUS# ethanalyzer local interface inband display-filter icmp limit-c 0

Capturing on 'ps-inb'

1 2024-05-13 13:05:49.296574516    10.1.1.35 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

2 2024-05-13 13:05:49.298725978    10.1.1.51 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

3 2024-05-13 13:05:49.299935463    10.1.1.60 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

4 2024-05-13 13:05:49.303159980    10.1.1.84 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

5 2024-05-13 13:05:49.305450067   10.1.1.101 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

6 2024-05-13 13:05:49.307596053    10.1.1.17 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

7 2024-05-13 13:05:49.309881152    10.1.1.34 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

8 2024-05-13 13:05:49.313239980    10.1.1.59 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

9 2024-05-13 13:05:49.315391183    10.1.1.75 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

10 2024-05-13 13:05:49.317675859    10.1.1.92 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

11 2024-05-13 13:05:49.319960319   10.1.1.109 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

12 2024-05-13 13:05:49.323185627    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

13 2024-05-13 13:05:49.325471951    10.1.1.50 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

14 2024-05-13 13:05:49.327622826    10.1.1.66 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

15 2024-05-13 13:05:49.329906456    10.1.1.83 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

16 2024-05-13 13:05:49.332057200    10.1.1.99 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

17 2024-05-13 13:05:49.334341820    10.1.1.16 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

18 2024-05-13 13:05:49.336626919    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64