목차

소개

문제

솔루션

관련 Cisco 지원 커뮤니티 토론

소개

이 문서에서는 Cisco Nexus 7000(N7k) Cisco Nexus 7000 48-Port 1 및 10 Gigabit Ethernet F2-Series Module(F2) 및 Cisco Nexus 7000 Enhanced F2-Series 48-Port Fiber 1 and 10 Gigabit Ethernet Module(F2E) Virtual Linaard의 인그레스 버퍼를 수정하는 방법을 보여 줍니다. 레인 3(VL3).

또한 이러한 값을 수정한 후 VL3에 대해 얻는 인그레스 버퍼링 용량의 양을 볼 수 있습니다.

문제

데이터 센터 간 2km 이상의 거리를 두고 FCoE(Fibre Channel over Ethernet) 멀티홉을 사용하면 입력 손실이 발생할 수 있습니다.기본적으로 F2/F2e 라인 카드에는 일시 중지 전송 후 패킷을 대기열에 넣기 위해 레이턴시 버퍼에 0개의 페이지가 있으며, 이로 인해 장거리 FCoE 다중 hop 인터페이스에 입력 드롭이 발생합니다.

레이턴시 버퍼는 다음과 같이 정의됩니다.

PL_STOP - HWM(PL_Pause) = LB(레이턴시 버퍼)

위에 언급된 값이 페이지로 표시됩니다.각 페이지는 대략 384바이트입니다.

아래의 알림: 기본 FCoE QoS 정책을 사용하는 VL3의 인그레스 버퍼 용량:

EX

module-10# show hardware internal mac port 1 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0    1107 (  425088)   1035 (  397440)     0     1107   1035    100

1       2 (     768)      1 (     384)     0        2      1      1

2       2 (     768)      1 (     384)     0        2      1      1

3    1053 (  404352)   1029 (  395136)     0     1053   1029    100

4    1107 (  425088)   1083 (  415872)     0     1107   1083    100

5     231 (   88704)    159 (   61056)     0      231    159     57

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

PL_STOP 및 HWM(High Water Mark)의 값이 동일합니다.레이턴시 버퍼에는 기본적으로 0페이지가 있습니다.장거리 FCoE를 지원하려면 이 값을 수정해야 합니다.

솔루션

먼저 'default-4q-7e-in-policy' QoS(Quality of Service) 정책 맵을 복제해야 합니다.

Switch(config)# qos copy policy-map type queuing ?

*** No matching command found in current mode, matching in (exec) mode ***

default-4q-7e-in-policy   Default 7-ethernet input queuing policy

default-4q-7e-out-policy  Default 7-ethernet output queuing policy

Switch(config)# qos copy policy-map type queuing default-4q-7e-in-policy prefix 7I_

아래에는 서비스 정책을 수정한 후 VL3의 레이턴시 버퍼에 할당된 바이트 양이 표시됩니다.

참고:queue-limit의 60%를 "ndrop" 정책에 할당할 때까지 레이턴시 버퍼가 표시되지 않습니다.

정책은 최대 99%, 10% 단위로 수정됩니다.

60/40 ingess buffer allocation

==============================

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 40

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 60

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     624 (  239616)    576 (  221184)     0      624    576    100

1       2 (     768)      1 (     384)     0        2      1      1

2     624 (  239616)    576 (  221184)     0      624    576    100

3    1913 (  734592)   1889 (  725376)     0     2126   1889    100

4       2 (     768)      1 (     384)     0        2      1      1

5     124 (   47616)     52 (   19968)     0      124     52     31

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

60/40은 vl3 레이턴시 버퍼에 81792바이트를 할당합니다.

PL_STOP - HWM * 384바이트

2126 - 1913 = 213페이지 * 384 = 81792바이트

70/30 ingress buffer allocation

===============================

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 30

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 70

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     463 (  177792)    415 (  159360)     0      463    415    100

1       2 (     768)      1 (     384)     0        2      1      1

2     463 (  177792)    415 (  159360)     0      463    415    100

3    1987 (  763008)   1963 (  753792)     0     2484   1963    100

4       2 (     768)      1 (     384)     0        2      1      1

5      88 (   33792)     16 (    6144)     0       88     16     22

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

70/30은 VL3 레이턴시 버퍼에 190848바이트를 할당합니다.

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 20

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 80

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     302 (  115968)    254 (   97536)     0      302    254     75

1       2 (     768)      1 (     384)     0        2      1      1

2     302 (  115968)    254 (   97536)     0      302    254     75

3    1875 (  720000)   1851 (  710784)     0     2841   1851    100

4       2 (     768)      1 (     384)     0        2      1      1

5      52 (   19968)     46 (   17664)     0       52     46     13

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

80/20은 VL3 레이턴시 버퍼에 370944바이트를 할당합니다.

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 10

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 90

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0     141 (   54144)     93 (   35712)     0      141     93     35

1       2 (     768)      1 (     384)     0        2      1      1

2     141 (   54144)     93 (   35712)     0      141     93     35

3    1055 (  405120)   1031 (  395904)     0     3199   1031    100

4       2 (     768)      1 (     384)     0        2      1      1

5      16 (    6144)     10 (    3840)     0       16     10      4

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

90/10은 VL3 레이턴시 버퍼에 823296바이트를 할당합니다.

policy-map type queuing 7I_4q-7e-in

class type queuing c-4q-7e-drop-in

service-policy type queuing 7I_4q-7e-drop-in

queue-limit percent 1

class type queuing c-4q-7e-ndrop-in

service-policy type queuing 7I_4q-7e-ndrop-in

queue-limit percent 99

interface Ethernet2/5

service-policy type queuing input 7I_4q-7e-in

module-2# show hardware internal mac port 5 qos configuration | begin IB | end EB

IB

Port page limit : 3584 (1376256 Bytes)

VL#  HWM pages(bytes)  LWM pages(bytes) Used PL_STOP(HWM & LWM) SPAN

pages                    THR

0      15 (    5760)      9 (    3456)     0       15      9      3

1       2 (     768)      1 (     384)     0        2      1      1

2      15 (    5760)      9 (    3456)     0       15      9      3

3    1161 (  445824)   1137 (  436608)     0     3521   1137    100

4       2 (     768)      1 (     384)     0        2      1      1

5       3 (    1152)      0 (       0)     0        3      0      1

6       2 (     768)      1 (     384)     0        2      1      1

7       2 (     768)      1 (     384)     0        2      1      1

Credited DWRR WT: 216 (0xd8) Uncredited DWRR WT: 144 (0x90)

DWRR honor UC = FALSE

Leak Lo weight = 0xd8, enabled = FALSE

EB

99/1은 906240바이트를 VL3 레이턴시 버퍼에 할당합니다.

참고:각 클리퍼 소스에는 6MB의 버퍼 용량이 있습니다.Clipper당 4개의 포트가 있으므로 포트당 최대 1.5MB 버퍼 용량입니다.99/1에서는 ~.9MB가 VL3 레이턴시 버퍼에 할당되고 나머지는 HWM에서 각 VL(대부분 - VL3)에 사용됩니다. VL3의 LB를 사용하여 각 VL HWM을 추가할 경우 최대 1.35MB의 버퍼 용량과 같습니다.