목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 네트워크 전체에서 원격 모니터링을 제공하는 IP 네트워크를 통해 미러 트래픽을 전송하는 캡슐화된 ERSPAN(remote switched port analyzer) 세션을 Nexus 5000 Series 스위치에서 구성하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

이 구성을 시도하기 전에 다음 요구 사항을 충족해야 합니다.

- Nexus 5000 Series 스위치에 대한 컨피그레이션에 대한 기본적인 지식 보유

- Nexus 7000 Series 스위치에 대한 컨피그레이션에 대한 기본적인 지식 보유

- ERSPAN에 대한 기본적인 지식 보유

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Nexus 5000 스위치: Cisco NX-OS 소프트웨어 릴리스 5.1(3)N1(1) 이상의 Cisco Nexus 5010 Series 스위치

- Nexus 7000 스위치: Cisco NX-OS 소프트웨어 릴리스 5.1(3) 이상의 Cisco Nexus 7018 Series 스위치

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 규칙을 참조하십시오.

배경 정보

- ERSPAN을 사용하면 네트워크 전반에 걸쳐 여러 스위치를 원격으로 모니터링할 수 있습니다.

- Cisco Nexus 5000 Series 스위치는 ERSPAN 소스 세션만 지원합니다. 대상 세션은 Nexus 5000 스위치에서 지원되지 않습니다. 이 문서에서 Nexus 7000 스위치는 Nexus 5000 스위치에서 미러링된 트래픽을 모니터링하는 ERSPAN 대상 세션으로 사용됩니다.

- ERSPAN은 ERSPAN 소스 세션, 라우팅 가능한 ERSPAN GRE(Generic Routing Encapsulation) 캡슐화된 트래픽 및 ERSPAN 대상 세션으로 구성됩니다.

- ERSPAN은 서로 다른 스위치의 소스 포트에서 네트워크 분석기가 연결된 대상 포트로 미러링된 트래픽을 전송합니다. 트래픽은 소스 스위치에서 캡슐화되고 목적지 스위치로 전송됩니다. 목적지 스위치에서는 패킷이 캡슐화된 다음 목적지 포트로 전송됩니다.

- 서로 다른 스위치에서 ERSPAN 소스 세션 및 대상 세션을 별도로 구성할 수 있습니다.

ERSPAN 소스

- 트래픽을 모니터링할 수 있는 인터페이스를 ERSPAN 소스라고 합니다.

- 수신(인그레스), 전송(이그레스) 또는 양방향(둘 다)인 소스 포트에 대한 모든 패킷을 모니터링할 수 있습니다.

- ERSPAN 소스에는 소스 포트, 소스 VLAN 또는 소스 VSAN이 포함됩니다. VLAN을 ERSPAN 소스로 지정하면 VLAN에서 지원되는 모든 인터페이스가 ERSPAN 소스가 됩니다.

ERSPAN 대상

- 대상 포트는 ERSPAN 소스에서 복사된 트래픽을 수신합니다.

- 대상 포트는 SwitchProbe 디바이스 또는 기타 RMON(Remote Monitoring) 프로브 또는 단일 또는 다중 소스 포트에서 복사된 패킷을 수신하고 분석할 수 있는 보안 디바이스와 같은 디바이스에 연결된 포트입니다.

- 대상 포트는 스패닝 트리 인스턴스 또는 레이어 3 프로토콜에 참여하지 않습니다.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 섹션에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- Nexus 5000 스위치

- Nexus 7000 스위치

Nexus 5000 스위치

Nexus 5000#configure terminal

!--- Configures an ERSPAN source session

Nexus 5000(config)#monitor session 3 type erspan-source

!--- Configure the sources and traffic direction

Nexus 5000(config-erspan-src)#source interface Ethernet1/10 both

!--- Configure the destination IP address in the ERSPAN session

Nexus 5000(config-erspan-src)#destination ip 10.23.21.8

!--- Configure the ERSPAN ID

Nexus 5000(config-erspan-src)#erspan-id 903

!--- Configure the VRF

Nexus 5000(config-erspan-src)#vrf default

!--- Enable the ERSPAN source session (by default the session is in shutdown state)

Nexus 5000(config-erspan-src)#no shut

Nexus 5000(config-erspan-src)#exit

!--- Configure the ERSPAN global origin IP address

Nexus 5000(config)#monitor erspan origin ip-address 10.254.254.30 global

!--- Configure the IP address for loopback interface, which is used as source of the ERSPAN traffic

Nexus 5000(config)#interface loopback1

Nexus 5000(config-if)#ip address 10.254.254.30/32

Nexus 5000(config-if)#exit

Nexus 5000(config)#interface Ethernet1/1

Nexus 5000(config-if)#switchport

Nexus 5000(config-if)#switchport mode trunk

Nexus 5000(config-if)#no shutdown

Nexus 5000(config)#feature interface-vlan

Nexus 5000(config)#interface Vlan 12

Nexus 5000(config-if)#ip address 10.23.21.7/29

Nexus 5000(config-if)#no ip redirects

Nexus 5000(config-if)#no shutdown

Nexus 5000(config-if)#exit

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

Nexus 7000 스위치

Nexus 7000#configure terminal

!--- Configures an ERSPAN destination session

Nexus 7000(config)#monitor session 4 type erspan-destination

!--- Configures the source IP address

Nexus 7000(config-erspan-src)#source ip 10.23.21.8

!--- Configures a destination for copied source packets

Nexus 7000(config-erspan-src)#destination interface Ethernet1/24

!--- Configure the ERSPAN ID

Nexus 7000(config-erspan-src)#erspan-id 903

!--- Configure the VRF

Nexus 7000(config-erspan-src)#vrf default

!--- Enable the ERSPAN destination session (by default the session is in shutdown state)

Nexus 7000(config-erspan-src)#no shutdown

Nexus 7000(config-erspan-src)#exit

Nexus 7000(config)#interface Ethernet1/24

Nexus 7000(config-if)#switchport monitor

Nexus 7000(config-if)#exit

Nexus 7000(config)#feature interface-vlan

Nexus 7000(config)#interface Vlan 12

Nexus 7000(config-if)#ip address 10.23.21.8/29

Nexus 7000(config-if)#no ip redirects

Nexus 7000(config-if)#no shutdown

Nexus 7000(config-if)#exit

Nexus 7000(config)#interface Ethernet1/1

Nexus 7000(config-if)#switchport

Nexus 7000(config-if)#switchport mode trunk

Nexus 7000(config-if)#no shutdown

Nexus 7000(config-if)#exit

!--- Save the configurations in the device.

Nexus 7000(config)#copy running-config startup-config

Nexus 7000(config)#exit

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. OIT를 사용하여 show 명령 출력의 분석을 봅니다.

Nexus 5000 Series 스위치:

ERSPAN 세션 상태를 표시하려면 show monitor 명령을 사용합니다.

Nexus 5000# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

3        up           The session is up

ERSPAN 세션 컨피그레이션을 표시하려면 show monitor session [session_number] 명령을 사용합니다.

Nexus 5000# show monitor session 3

session 3

---------------

type              : erspan-source

state             : up

erspan-id         : 903

vrf-name          : default

destination-ip    : 10.23.21.8

ip-ttl            : 255

ip-dscp           : 0

origin-ip         : 10.254.254.30 (global)

source intf       :

rx            : Eth1/10

tx            : Eth1/10

both          : Eth1/10

source VLANs      :

rx            :

실행 중인 ERSPAN 컨피그레이션을 표시하려면 show running-config monitor 명령을 사용합니다.

Nexus 5000# show running-config monitor

!Command: show running-config monitor

!Time: Thu Apr 19 09:32:27 2012

version 5.1(3)N1(1)

monitor session 3 type erspan-source

erspan-id 903

vrf default

destination ip 10.23.21.8

source interface Ethernet1/10 both

no shut

monitor erspan origin ip-address 10.254.254.30 global

Nexus 7000 Series 스위치:

ERSPAN 세션 상태를 표시하려면 show monitor 명령을 사용합니다.

Nexus 7000# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

4        up           The session is up

ERSPAN 세션 컨피그레이션을 표시하려면 show monitor session [session_number] 명령을 사용합니다.

Nexus 7000# show monitor session 4

session 4

---------------

type              : erspan-destination

state             : up

erspan-id         : 903

vrf-name          : default

source-ip         : 10.23.21.8

destination ports : Eth1/24

Legend: f = forwarding enabled, l = learning enabled

실행 중인 ERSPAN 컨피그레이션을 표시하려면 show running-config monitor 명령을 사용합니다.

Nexus 7000# show running-config monitor

!Command: show running-config monitor

!Time: Thu Apr 19 11:13:28 2012

version 5.1(3)

monitor session 4 type erspan-destination

erspan-id 903

vrf default

source ip 10.23.21.8

destination interface Ethernet1/24

no shut

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- Cisco Nexus 5000 Series 스위치 지원

- Cisco Nexus 7000 Series 스위치 지원

- 스위치 제품 지원

- LAN 스위칭 기술 지원

- 기술 지원 및 문서 − Cisco Systems