목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

Catalyst 6500

Catalyst 4500

Supervisor Engine 2가 포함된 Catalyst 4500

Catalyst 4500 Supervisor Engine II+/III/IV

Catalyst 3750

Catalyst 3560

Catalyst 3550

Catalyst 2950/2970/2940

Catalyst 2900XL/3500XL

Catalyst 2948GL3/4908G-L3/4980G-L3

Catalyst 9000

관련 정보

소개

이 문서에서는 Cisco Catalyst 스위치에서 교체 가능한 다양한 구성 요소의 일련 번호를 확인하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- 다양한 Catalyst 스위치

- 다양한 소프트웨어 버전

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

배경 정보

일련 번호는 네트워크에 있는 부품의 데이터베이스를 작성하는 데 필요합니다. Cisco 기술 지원에서 서비스 요청을 생성할 때, 영향을 받는 장비의 일련 번호가 있어야 합니다. 이러한 요구 사항은 교체 부품 또는 RMA(Return Materials Authorization)가 필요한 경우에 특히 그렇습니다.

Cisco Catalyst 스위치의 일련 번호는 수정할 수 없습니다. 관리를 위해 Cisco IOS® 소프트웨어를 실행하는 Cisco Catalyst 스위치에서 사용자 지정 문자열을 반환하도록 구성할 수 있습니다. 사용자 지정 문자열을 생성하려면 전역 컨피그레이션 모드에서 snmp-server chassis-id 명령을 실행합니다.

참고: show 명령에 대한 자세한 내용은 Show Commands를 참조하십시오.

Catalyst 6500

섀시 및 기타 구성 요소의 일련 번호를 확인하려면  show idprom   명령을 사용합니다:

6506#show idprom ?

all           selects all FRU-types

backplane     specify backplane

clock         specify clock <number>

earl          specify earl <slot>

fan-tray      specify fan-tray <number>

interface     interface name

module        specify module <slot>

power-supply  specify power-supply <number>

rp            specify RP (MSFC) <slot>

supervisor    specify supervisor <slot>

vtt           specify VTT <number>

섀시 일련 번호를 가져오려면 show idprom backplane 명령을 실행합니다.

6506#show idprom backplane

IDPROM for backplane #0

(FRU is 'Catalyst 6500 6-slot backplane')

OEM String = 'Cisco Systems'

Product Number = 'WS-C6506'

Serial Number = 'TBA03270652'

Manufacturing Assembly Number = '73-3436-01'

Manufacturing Assembly Revision = 'A0'

Hardware Revision = 1.0

Current supplied (+) or consumed (-) =  -A

모듈 일련 번호를 얻으려면 show idprom module slot <slot number> 명령을 실행합니다. 또는 다음과 같이 show module 명령을 실행할 수 있습니다.

6506#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1    2  Catalyst 6000 supervisor 2 (Active)    WS-X6K-S2U-MSFC2   SAD055006NE

3    0  2 port adapter FlexWAN                 WS-X6182-2PA       SAD04350EEU

4   48  SFM-capable 48-port 10/100 Mbps RJ45   WS-X6548-RJ-45     SAD055108C2

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  0001.6415.a602 to 0001.6415.a603   3.2   6.1(3)       7.5(0.6)HUB6 Ok

3  0001.6413.c86b to 0001.6413.c8aa   1.5   12.1(13)E1   12.1(13)E1   Ok

4  0001.63d3.e77a to 0001.63d3.e7a9   4.0   6.3(1)       7.5(0.6)HUB6 Ok

Mod Sub-Module                  Model           Serial           Hw     Status

--- --------------------------- --------------- --------------- ------- -------

1 Policy Feature Card 2       WS-F6K-PFC2     SAD055004VA      3.0    Ok

1 Cat6k MSFC 2 daughterboard  WS-F6K-MSFC2    SAD055006VF      2.0    Ok

Mod Online Diag Status

--- -------------------

1 Pass

3 Not Supported

4 Pass

참고:  show diagbus  명령을 사용하여 Flex WAN 모듈의 포트 어댑터 일련 번호를 확인합니다.

Catalyst 4500

Supervisor Engine 2가 포함된 Catalyst 4500

Catalyst 4500/4000 Supervisor 2에서 섀시 일련 번호는 버전 5.5(10), 6.3(2) 이상에서 CLI를 통해 사용할 수 있습니다. 이전 버전의 경우 show version 명령은 섀시 일련 번호 대신 Supervisor Engine 일련 번호를 표시합니다. 이전 버전에서 섀시의 일련 번호를 얻으려면 섀시의 외부 스티커를 확인하십시오.

Catalyst 4500 Supervisor Engine II+/III/IV

섀시 및 기타 구성 요소의 일련 번호를 확인하려면 show idprom 명령을 사용합니다.

Switch#show idprom ?

all           show all non-interface IDPROMs

chassis       show IDPROM for chassis

fan-tray      show IDPROM for system fan tray

interface     show contents of gbic connected to this interface

module        show IDPROM for module

power-supply  show IDPROM for power supply

supervisor    show IDPROM for supervisor

섀시 일련 번호를 가져오려면  show idprom chassis  명령을 사용합니다:

Switch#show idprom chassis

Chassis Idprom :

Common Block Signature = 0xABAB

Common Block Version = 1

Common Block Length = 144

Common Block Checksum = 4081

Idprom Size = 256

Block Count = 2

FRU Major Type = 0x4001

FRU Minor Type = 37

OEM String = Cisco Systems, Inc.

Product Number = WS-C4506

Serial Number = FOX0627A001

Part Number = 73-8107-04

Part Revision = 01

Manufacturing Deviation String = 0

Hardware Revision = 0.4

Manufacturing Bits = 0x0000

Engineering Bits = 0x0000

Snmp OID = 0.0.0.0.0.0.0.0

Power Consumption = 0

RMA Failure Code = 0 0 0 0

Chassis Block Signature = 0x4001

Chassis Block Version = 1

Chassis Block Length = 22

Chassis Block Checksum = 628

Feature Bits = 0x0000000000000000

MAC Base = 000a.4172.df40

MAC Count = 64

전원 공급 장치 일련 번호를 얻으려면 show idprom power-supply {1 | 2} 명령:

Switch#show idprom power-supply 1

Power Supply 1 Idprom :

Common Block Signature = 0xABAB

Common Block Version = 1

Common Block Length = 144

Common Block Checksum = 5857

Idprom Size = 256

Block Count = 2

FRU Major Type = 0x4501

FRU Minor Type = 1

OEM String = Cisco Systems, Inc.

Product Number = PWR-C4K-1400AC

Serial Number = ABC06260005

Part Number = 34-1846-01

Part Revision = 45

Manufacturing Deviation String =

Hardware Revision = 1.0

Manufacturing Bits = 0x0000

Engineering Bits = 0x0000

Snmp OID = 22616.22616.22616.22616.22616.22616.22616.22616

Power Consumption = 1400

RMA Failure Code = 0 0 0 0

Power Supply  Block Signature = 0x4501

PowerSupply Block Version = 1

PowerSupply Block Length = 20

PowerSupply Block Checksum = 293

Feature Bits = 0x0000000000000000

Current @ 110V = 17

Current @ 220V = 9

StackMIB OID = 22616

모듈 일련 번호를 가져오려면 show idprom module slot <slot number> 명령을 사용합니다. 또는 show module 명령을 사용할 수 있습니다.

Switch#show module

Mod  Ports Card Type                              Model             Serial No.

----+-----+--------------------------------------+-----------------+-----------

1      2  1000BaseX (GBIC) Supervisor(active)    WS-X4014          JAB054109H1

3     48  10/100BaseTX (RJ45)                    WS-X4148          JAB025202M6

4      6  1000BaseX (GBIC)                       WS-X4306          JAB023403BG

M MAC addresses                    Hw  Fw           Sw               Status

--+--------------------------------+---+------------+----------------+---------

1 000a.4172.df40 to 000a.4172.df41 0.5 12.1(12r)EW  12.1(13)EW(0.34) Ok

3 0050.730b.2340 to 0050.730b.236f 1.0                               Ok

4 0010.7bfa.7ca4 to 0010.7bfa.7ca9 2.0                               Ok

Catalyst 3750

여기 예와 같이 show version 명령을 사용하여 섀시 일련 번호 및 스위치 모델 유형을 결정할 수 있습니다. 출력에서 모든 스위치 스택 멤버, 섀시 및 일련 번호 정보를 찾을 수 있습니다.

3750#show version

Cisco Internetwork Operating System Software

Cisco IOS (tm) C3750 Software (C3750-I5-M), Version 12.1(14)EA1, RELEASE SOFTWARE (fc1

)

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 22-Jul-03 13:17 by antonino

Image text-base: 0x00003000, data-base: 0x008F0CF8

ROM: Bootstrap program is C3750 boot loader

BOOTLDR: C3750 Boot Loader (C3750-HBOOT-M) Version 12.1(11r)AX, RELEASE SOFTWARE

(fc1)

3750RJ uptime is 1 hour, 29 minutes

System returned to ROM by power-on

System image file is "flash:c3750-i5-mz.121.14-EA1/c3750-i5-mz.121.14-EA1.bin"

cisco WS-C3750-24TS (PowerPC405) processor (revision A0) with 120822K/10240K byt

es of memory.

Processor board ID CAT0726R0ZU

Last reset from power-on

Bridging software.

2 Virtual Ethernet/IEEE 802.3 interface(s)

48 FastEthernet/IEEE 802.3 interface(s)

16 Gigabit Ethernet/IEEE 802.3 interface(s)

The password-recovery mechanism is enabled.

512K bytes of flash-simulated non-volatile configuration memory.

Base ethernet MAC Address : 00:0D:29:B4:18:00

Motherboard assembly number : 73-7055-06

Power supply part number : 341-0034-01

Motherboard serial number : CAT0726043V

Power supply serial number : PHI0708009K

Model revision number : A0

Motherboard revision number : A0

Model number : WS-C3750-24TS-E

System serial number : CAT0726R0ZU

Switch Ports Model SW Version SW Image

------ ----- ----- ---------- ----------

* 1 26 WS-C3750-24TS 12.1(14)EA1 C3750-I5-M

2 26 WS-C3750-24TS 12.1(14)EA1 C3750-I5-M

3 12 WS-C3750G-12S 12.1(14)EA1 C3750-I5-M

Switch 02

---------

Switch Uptime : 1 hour, 29 minutes

Base ethernet MAC Address : 00:0D:29:B4:3F:00

Motherboard assembly number : 73-7055-06

Power supply part number : 341-0034-01

Motherboard serial number : CAT07260438

Power supply serial number : PHI0708008X

Model revision number : A0

Motherboard revision number : A0

Model number : WS-C3750-24TS-E

System serial number : CAT0726R10A

Switch 03

---------

Switch Uptime : 1 hour, 29 minutes

Base ethernet MAC Address : 00:0D:BD:6A:3E:00

Motherboard assembly number : 73-8307-06

Power supply part number : 341-0048-01

Motherboard serial number : CAT073205S2

Power supply serial number : DTH0731055Z

Model revision number : A0

Motherboard revision number : A0

Model number : WS-C3750G-12S-E

System serial number : CAT0732R0M4

Top assembly part number : 800-23419-01

Top assembly revision number : A0

Configuration register is 0xF

3750#

Catalyst 3560

섀시 일련 번호 및 스위치 모델 유형을 확인하려면 show version 명령을 사용합니다.

3560#show version

Cisco Internetwork Operating System Software

Cisco IOS (tm) C3560 Software (C3560-I5-M), Version 12.1(19)EA1c, RELEASE SOFTWARE (fc

2)

Copyright (c) 1986-2004 by cisco Systems, Inc.

Compiled Tue 03-Feb-04 05:56 by yenanh

Image text-base: 0x00003000, data-base: 0x0091D404

ROM: Bootstrap program is C3560 boot loader

BOOTLDR: C3560 Boot Loader (C3560-HBOOT-M) Version 12.1(19r)EA1b, RELEASE SOFTWA

RE (fc2)

3-8-03-CATS3560 uptime is 8 weeks, 4 days, 18 hours, 16 minutes

System returned to ROM by power-on

System image file is "flash:c3560-i5-mz.121-19.EA1c.bin"

cisco WS-C3560-24PS (PowerPC405) processor (revision D0) with 118776K/12288K byt

es of memory.

Processor board ID CSG0802P0G4

Last reset from power-on

Bridging software.

1 Virtual Ethernet/IEEE 802.3 interface(s)

24 FastEthernet/IEEE 802.3 interface(s)

2 Gigabit Ethernet/IEEE 802.3 interface(s)

The password-recovery mechanism is enabled.

512K bytes of flash-simulated non-volatile configuration memory.

Base ethernet MAC Address : 00:0E:39:E9:32:80

Motherboard assembly number : 73-9299-01

Power supply part number : 341-0029-03

Motherboard serial number : CAT075108EK

Power supply serial number : LIT074900K3

Model revision number : D0

Motherboard revision number : C0

Model number : WS-C3560-24PS-E

System serial number : CSG0802P0G4

Top Assembly Part Number : 800-24814-01

Top Assembly Revision Number : D0

Version ID : N/A

Hardware Board Revision Number : 0x08

Catalyst 3550

섀시 일련 번호 및 스위치 모델 유형을 확인하려면 show version 명령을 사용합니다.

Cat3550#show version

Cisco Internetwork Operating System Software

Cisco IOS (tm) C3550 Software (C3550-I5Q3L2-M), Version 12.1(12c)EA1, RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Mon 25-Nov-02 00:07 by antonino

Image text-base: 0x00003000, data-base: 0x0075FE48

ROM: Bootstrap program is C3550 boot loader

Cat3550 uptime is 4 days, 2 hours, 57 minutes

System returned to ROM by power-on

System image file is "flash:c3550-i5q3l2-mz.121-12c.EA1.bin"

cisco WS-C3550-48 (PowerPC) processor (revision G0) with 65526K/8192K bytes of memory.

Processor board ID CHK0642W02B

Last reset from warm-reset

Bridging software.

Running Layer2/3 Switching Image

Ethernet-controller 1 has 12 Fast Ethernet/IEEE 802.3 interfaces

Ethernet-controller 2 has 12 Fast Ethernet/IEEE 802.3 interfaces

Ethernet-controller 3 has 12 Fast Ethernet/IEEE 802.3 interfaces

Ethernet-controller 4 has 12 Fast Ethernet/IEEE 802.3 interfaces

Ethernet-controller 5 has 1 Gigabit Ethernet/IEEE 802.3 interface

Ethernet-controller 6 has 1 Gigabit Ethernet/IEEE 802.3 interface

48 FastEthernet/IEEE 802.3 interface(s)

2 Gigabit Ethernet/IEEE 802.3 interface(s)

The password-recovery mechanism is enabled.

384K bytes of flash-simulated non-volatile configuration memory.

Base ethernet MAC Address: 00:0B:46:8A:2F:80

Motherboard assembly number: 73-5701-07

Power supply part number: 34-0967-01

Motherboard serial number: CAT0641027L

Power supply serial number: DCA06392BU2

Model revision number: G0

Motherboard revision number: A0

Model number: WS-C3550-48-SMI

System serial number: CHK0642W02B

Configuration register is 0x10F

Catalyst 2950/2970/2940

섀시 일련 번호 및 스위치 모델 유형을 확인하려면 show version 명령을 사용합니다:

Cat2950#show version

Cisco Internetwork Operating System Software

Cisco IOS (tm) C2950 Software (C2950-I6Q4L2-M), Version 12.1(12c)EA1, RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Sun 24-Nov-02 23:31 by antonino

Image text-base: 0x80010000, data-base: 0x80562000

ROM: Bootstrap program is CALHOUN boot loader

Cat2950 uptime is 4 days, 2 hours, 52 minutes

System returned to ROM by power-on

System image file is "flash:c2950-i6q4l2-mz.121-12c.EA1.bin"

cisco WS-C2950G-48-EI (RC32300) processor (revision C0) with 21002K bytes of memory.

Processor board ID FHK0624W0HS

Last reset from system-reset

Running Enhanced Image

48 FastEthernet/IEEE 802.3 interface(s)

2 Gigabit Ethernet/IEEE 802.3 interface(s)

32K bytes of flash-simulated non-volatile configuration memory.

Base ethernet MAC Address: 00:09:E8:89:4A:40

Motherboard assembly number: 73-7409-08

Power supply part number: 34-0965-01

Motherboard serial number: FOC06230ERQ

Power supply serial number: DAB062143BP

Model revision number: C0

Motherboard revision number: B0

Model number: WS-C2950G-48-EI

System serial number: FHK0624W0HS

Configuration register is 0xF

Catalyst 2900XL/3500XL

섀시 일련 번호 및 스위치 모델 유형을 확인하려면 show version 명령을 사용합니다:

Switch#show version

Cisco Internetwork Operating System Software

Cisco IOS (tm) C3500XL Software (C3500XL-C3H2S-M), Version 12.0(5.2)XU, MAINTENANCE

INTERIM SOFTWARE

Copyright (c) 1986-2000 by cisco Systems, Inc.

Compiled Mon 17-Jul-00 18:29 by ayounes

Image text-base: 0x00003000, data-base: 0x00301F3C

ROM: Bootstrap program is C3500XL boot loader

Switch uptime is 4 days, 3 hours, 4 minutes

System returned to ROM by power-on

System image file is "flash:c3500XL-c3h2s-mz-120.5.2-XU.bin"

Cisco WS-C3548-XL (PowerPC403) processor (revision 0x01) with 16384K/1024K bytes

of memory. Processor board ID FOC0616X0RG, with hardware revision 0x00

Last reset from power-on

Processor is running Enterprise Edition Software

Cluster command switch capable

Cluster member switch capable

48 FastEthernet/IEEE 802.3 interface(s)

2 Gigabit Ethernet/IEEE 802.3 interface(s)

32K bytes of flash-simulated non-volatile configuration memory.

Base ethernet MAC Address: 00:09:7C:8E:78:80

Motherboard assembly number: 73-3903-09

Power supply part number: 34-0971-02

Motherboard serial number: FOC06160L07

Power supply serial number: APQ061200VZ

Model revision number: M0

Motherboard revision number: A0

Model number: WS-C3548-XL-EN

System serial number: FOC0616X0RG

Configuration register is 0xF

Catalyst 2948GL3/4908G-L3/4980G-L3

섀시 일련 번호를 확인하려면  show hardware  명령을 사용합니다:

2948g-l3#show hardware

Model: Cat-2948G-L3 Date: 17:49:42 UTC Tue Mar 18 2003

XPIF FPGA File:         xpif_fpga_0_72b_CClk.rbt

XPIF FPGA Date:         Wed Dec  8 17:05:42 1999

Slot 0/0:

Chip 0  Reset Count: 0       Chip 1  Reset Count: 0

Chip 2  Reset Count: 0       Chip 3  Reset Count: 0

Chip 4  Reset Count: 0       Chip 5  Reset Count: 0

Chip 6  Reset Count: 0       Chip 7  Reset Count: 0

Chip 8  Reset Count: 0       Chip 9  Reset Count: 0

Chip 10 Reset Count: 0       Chip 11 Reset Count: 0

EPIF Version     : 0                     CAM size: 32 KB

Ucode Version    : 1.0

Ucode Image      : EPIF_UCODE_RUNTIME

Port Phy Setup

Port1 :DONE      Port2 :DONE      Port3 :DONE      Port4 :DONE

Port5 :DONE      Port6 :DONE      Port7 :DONE      Port8 :DONE

Port9 :DONE      Port10:DONE      Port11:DONE      Port12:DONE

Port13:DONE      Port14:DONE      Port15:DONE      Port16:DONE

Port17:DONE      Port18:DONE      Port19:DONE      Port20:DONE

Port21:DONE      Port22:DONE      Port23:DONE      Port24:DONE

Port25:DONE      Port26:DONE      Port27:DONE      Port28:DONE

Port29:DONE      Port30:DONE      Port31:DONE      Port32:DONE

Port33:DONE      Port34:DONE      Port35:DONE      Port36:DONE

Port37:DONE      Port38:DONE      Port39:DONE      Port40:DONE

Port41:DONE      Port42:DONE      Port43:DONE      Port44:DONE

Port45:DONE      Port46:DONE      Port47:DONE      Port48:DONE

Slot 0/1:

XPIF Version     : 0                     CAM size: 128 KB

Ucode Version    : 1.0

Ucode Image      : XPIF_UCODE_RUNTIME

Port Phy Setup

Port49:DONE      Port50:DONE

IDPROM Contents        :

FRU Type            : 0x0.0x0

OEM String          : Cisco_Systems

Product Number      : WS-C2948G-L3

Serial Number       : FOX05330ADH

Mfg. Assembly No.   : 73-4083-07

Mfg. Assembly Ver.  : A0

Hardware Version    : 1.7

FPGA Version        : 0

SNMP IOD            : 9.5.1.3.1.1.2.275

RMA Code            : 0

Feature Bits        : 0x00000000

MAC Address Base    : 00:07:85:07:DC:00

Total MAC Addrs.    : 1024

Catalyst 9000

섀시 일련 번호를 확인하려면 show version 명령을 사용합니다. 또는 다음과 같이 show module 명령을 사용하여 더 작은 출력을 표시할 수 있습니다.

C9300#show version

Cisco IOS XE Software, Version 17.06.04

Cisco IOS Software [Bengaluru], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.6.4, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2022 by Cisco Systems, Inc.

Compiled Sun 14-Aug-22 08:58 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2022 by cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

BOOTLDR: System Bootstrap, Version 17.8.1r[FC2], RELEASE SOFTWARE (P)

C9300 uptime is 1 week, 2 days, 17 hours, 51 minutes

Uptime for this control processor is 1 week, 2 days, 17 hours, 54 minutes

System returned to ROM by Reload Command at 07:14:20 jst Wed Aug 2 2023

System restarted at 07:29:56 jst Wed Aug 2 2023

System image file is "flash:packages.conf"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Technology Package License Information:

------------------------------------------------------------------------------

Technology-package                                     Technology-package

Current                        Type                       Next reboot

------------------------------------------------------------------------------

network-advantage       Smart License                    network-advantage

dna-advantage           Subscription Smart License       dna-advantage

AIR License Level: AIR DNA Advantage

Next reload AIR license Level: AIR DNA Advantage

Smart Licensing Status: Registration Not Applicable/Not Applicable

cisco C9300-24UX (X86) processor with 1317097K/6147K bytes of memory.

Processor board ID FJC2325E0HB

5 Virtual Ethernet interfaces

8 Gigabit Ethernet interfaces

64 Ten Gigabit Ethernet interfaces

4 TwentyFive Gigabit Ethernet interfaces

4 Forty Gigabit Ethernet interfaces

2048K bytes of non-volatile configuration memory.

8388608K bytes of physical memory.

1638400K bytes of Crash Files at crashinfo:.

11264000K bytes of Flash at flash:.

Base Ethernet MAC Address          : c4:c6:03:9a:bd:80

Motherboard Assembly Number        : 73-18276-03

Motherboard Serial Number          : FJZ23210BTF

Model Revision Number              : D0

Motherboard Revision Number        : B0

Model Number : C9300-24UX

System Serial Number : FJC2325E0HB

CLEI Code Number                   :

Switch Ports Model              SW Version        SW Image              Mode

------ ----- -----              ----------        ----------            ----

*    1 41    C9300-24UX         17.06.04          CAT9K_IOSXE           INSTALL

C9300#show module

Switch  Ports    Model                Serial No.   MAC address     Hw Ver.       Sw Ver.

------  -----   ---------             -----------  --------------  -------       --------

1       41     C9300-24UX            FJC2325E0HB  c4c6.039a.bd80  V02           17.06.04

C9300#

관련 정보

- 명령 표시

- Cisco 기술 지원 및 다운로드